Contents

- Communications failure with Cisco Smart License server

- ICSeverity

- Impact

- Description

- SyslogMessage

- MessageSample

- ProductFamily

- Regex

- Recommendation

- Commands

Communications failure with Cisco Smart License server

ICSeverity

5 - Notice

Impact

Device will retry connecting later once DNS is addressed.

Description

This error appears if there is Smart Licensing configured on the device. Smart Licensing is a cloud-based unified license management system for managing licenses across Cisco products. Depending on your network type and setup, you could be using different methods of communication with the CSSM (Cisco Smart Software Manager) portal.

The errors below appear if you are using a CSLU or an On-Prem method and there is a communication issue between device and server. It can be related to a DNS lookup issue or a configuration issue. %SMART_LIC-3-COMM_FAILED: Communications failure with the Cisco Smart License Utility (CSLU) : Unable to resolve server hostname/domain name.

Sometimes this error can also appear if the device booting up after a reload or an upgrade. If the device registers correctly with the portal once it books up, the this error can be ignored. Please check Remediation steps to resolve this

SyslogMessage

%SMART_LIC-3-COMM_FAILED

MessageSample

Apr 10 10:10:10 <> %SMART_LIC-3-COMM_FAILED: Communications failure with the Cisco Smart License Utility (CSLU) : Unable to resolve server hostname/domain name  THIS IS A SAMPLE MESSAGE

ProductFamily

- Cisco Catalyst 9200 Series Switches

- Cisco Catalyst 9300 Series Switches

- Cisco Catalyst 9400 Series Switches

- Cisco Catalyst 9500 Series Switches

- Cisco Catalyst 9500H Series Switches

- Cisco Catalyst 9600 Series Switches

Regex

N/A

Recommendation

Verify that device can ping the CSLU IP address If domain names are being used for communication, ensure DNS server is configured correctly. You need to specify the correct "source-interface" that you are using for communicating with the CSSM portal. Command: Switch(config)#ip name-server Switch(config)#ip domain-lookup [source-interface] If this is a VRF set-up, use commands below depending on the VRF being used (config)#ip domain-lookup [source-interface ] <<-- "ip vrf forwarding " defined on the interface (config)#ip name-server vrf Verify that the HTTPs client source-interface is defined for the correct interface Command: ip http client source-interface If VRF is used, use the command below: Command: Switch(config)#ip http client source-interface Ensure the transport mode for Smart licensing is set to cslu via below command: Command: Switch(config)# license smart transport cslu

Verify the correct CSLU IP/Hostname is confgured as per URL below: URL: http://:8182/cslu/v1/pi Note: The default URL is configured for "cslu-local" to enable automatic discovery. IF you want to use this option, configure the name server with an entry where hostname cslu-local is mapped to the CSLU IP address (the windows host where you installed CSLU), no other configuration is required. The product instance automatically discovers hostname cslu-local. If all the above configurations are verified and correct, you can manually initiate a license sync with CSLU via the command "license smart sync all". This will cause the device to manually attempt a re-sync with the CSLU utility. With the releases of Cisco IOS XE 17.3.2 and 17.4.1 and above, Smart Licensing using Policy was introduced. So if you started seeing the errors after a recent upgrade to these codes, then please refer to the Migration Document below that explains the different options: https://www.cisco.com/c/en/us/support/docs/switches/catalyst-9300-series-switches/216520-migrate-catalyst-license-to-smart-licens.html

Commands

#show version

#show logging

#show license all

#show license summary

#show call-home profile all

#show tech-support license