Inhalt

Einführung

Voraussetzungen

Anforderungen

Verwendete Komponenten

Konventionen

Konfigurieren

Netzwerkdiagramm

Konfigurationen

Überprüfen

Fehlerbehebung

Befehle zur Fehlerbehebung

Sicherheitszuordnungen löschen

Zugehörige Informationen

Einführung

Diese Konfiguration ermöglicht es einer zentralen Cisco Secure PIX Firewall, über VPN-Tunnel über das Internet oder ein beliebiges öffentliches Netzwerk mit IPsec mit Netzwerken hinter zwei anderen PIX-Firewall-Boxen zu kommunizieren. Die beiden Netzwerke in äußerster Randlage müssen nicht miteinander kommunizieren, es besteht jedoch eine Verbindung zum zentralen Netzwerk. Die beiden ausgelagerten Netzwerke können nicht miteinander kommunizieren, indem sie den zentralen PIX durchlaufen, da der PIX-Datenverkehr, der an einer Schnittstelle empfangen wird, nicht über dieselbe Schnittstelle weiterleitet. Wenn die Netzwerke in der Außenwelt miteinander kommunizieren müssen, benötigen Sie statt der Hub-and-Spoke-Konfiguration in diesem Dokument eine vollständig vernetzte Konfiguration. Möglicherweise gibt es bereits Nat 1-, Global-, statische und Kabelrohranweisungen auf den PIXs. Dieses Beispiel zeigt nur das Hinzufügen einer Verschlüsselung.

Voraussetzungen

Anforderungen

Damit IPsec funktioniert, müssen Sie vor Beginn dieser Konfiguration Verbindungen zwischen Tunnelendpunkten herstellen.

Verwendete Komponenten

Die Informationen in diesem Dokument basieren auf den PIX Firewall-Versionen 5.1.x, 5.2.x und 6.3.3.

Hinweis: Der Befehl show version muss anzeigen, dass die Verschlüsselung aktiviert ist.

Die Informationen in diesem Dokument wurden von den Geräten in einer bestimmten Laborumgebung erstellt. Alle in diesem Dokument verwendeten Geräte haben mit einer leeren (Standard-)Konfiguration begonnen. Wenn Ihr Netzwerk in Betrieb ist, stellen Sie sicher, dass Sie die potenziellen Auswirkungen eines Befehls verstehen.

Konventionen

Weitere Informationen zu Dokumentkonventionen finden Sie in den Cisco Technical Tips Conventions (Technische Tipps zu Konventionen von Cisco).

Konfigurieren

In diesem Abschnitt erhalten Sie Informationen zum Konfigurieren der in diesem Dokument beschriebenen Funktionen.

Hinweis: Verwenden Sie das Command Lookup Tool (nur registrierte Kunden), um weitere Informationen zu den in diesem Abschnitt verwendeten Befehlen zu erhalten.

Netzwerkdiagramm

In diesem Dokument wird die folgende Netzwerkeinrichtung verwendet:

Konfigurationen

In diesem Dokument werden folgende Konfigurationen verwendet:

- PIX Central

- PIX 2

- PIX 3

PIX Central

Building configuration...

: Saved

:

PIX Version 6.3(3)

interface ethernet0 auto

interface ethernet1 auto

nameif ethernet0 outside security0

nameif ethernet1 inside security100

enable password 8Ry2YjIyt7RRXU24 encrypted

passwd 2KFQnbNIdI.2KYOU encrypted

hostname pix-central

fixup protocol dns maximum-length 512

fixup protocol ftp 21

fixup protocol h323 h225 1720

fixup protocol h323 ras 1718-1719

fixup protocol http 80

fixup protocol rsh 514

fixup protocol rtsp 554

fixup protocol sip 5060

fixup protocol sip udp 5060

fixup protocol skinny 2000

fixup protocol smtp 25

fixup protocol sqlnet 1521

fixup protocol tftp 69

names

!--- This is traffic to PIX 2.

access-list 120 permit ip 10.1.1.0 255.255.255.0 10.2.2.0 255.255.255.0

!--- This is traffic to PIX 3.

access-list 130 permit ip 10.1.1.0 255.255.255.0 10.3.3.0 255.255.255.0

!--- Do not do Network Address Translation (NAT) on traffic to other PIXes.

access-list 100 permit ip 10.1.1.0 255.255.255.0 10.2.2.0 255.255.255.0

access-list 100 permit ip 10.1.1.0 255.255.255.0 10.3.3.0 255.255.255.0

pager lines 24

logging on

mtu outside 1500

mtu inside 1500

ip address outside 172.18.124.153 255.255.255.0

ip address inside 10.1.1.1 255.255.255.0

ip audit info action alarm

ip audit attack action alarm

pdm history enable

arp timeout 14400

!--- Do not do NAT on traffic to other PIXes.

nat (inside) 0 access-list 100

route outside 0.0.0.0 0.0.0.0 172.18.124.1 1

timeout xlate 3:00:00

timeout conn 1:00:00 half-closed 0:10:00 udp 0:02:00 rpc 0:10:00 h225 1:00:00

timeout h323 0:05:00 mgcp 0:05:00 sip 0:30:00 sip_media 0:02:00

timeout uauth 0:05:00 absolute

aaa-server TACACS+ protocol tacacs+

aaa-server RADIUS protocol radius

aaa-server LOCAL protocol local

no snmp-server location

no snmp-server contact

snmp-server community public

snmp-server enable traps

floodguard enable

sysopt connection permit-ipsec

crypto ipsec transform-set myset esp-des esp-md5-hmac

!--- This is traffic to PIX 2.

crypto map newmap 20 ipsec-isakmp

crypto map newmap 20 match address 120

crypto map newmap 20 set peer 172.18.124.154

crypto map newmap 20 set transform-set myset

!--- This is traffic to PIX 3.

crypto map newmap 30 ipsec-isakmp

crypto map newmap 30 match address 130

crypto map newmap 30 set peer 172.18.124.157

crypto map newmap 30 set transform-set myset

crypto map newmap interface outside

isakmp enable outside

isakmp key ******** address 172.18.124.154 netmask 255.255.255.255

no-xauth no-config-mode

isakmp key ******** address 172.18.124.157 netmask 255.255.255.255

no-xauth no-config-mode

isakmp identity address

isakmp policy 10 authentication pre-share

isakmp policy 10 encryption des

isakmp policy 10 hash md5

isakmp policy 10 group 1

isakmp policy 10 lifetime 1000

telnet timeout 5

ssh timeout 5

console timeout 0

terminal width 80

Cryptochecksum:d41d8cd98f00b204e9800998ecf8427e

: end

PIX 2

Building configuration...

: Saved

:

PIX Version 6.3(3)

interface ethernet0 auto

interface ethernet1 auto

nameif ethernet0 outside security0

nameif ethernet1 inside security100

enable password 8Ry2YjIyt7RRXU24 encrypted

passwd 2KFQnbNIdI.2KYOU encrypted

hostname pix2

fixup protocol dns maximum-length 512

fixup protocol ftp 21

fixup protocol h323 h225 1720

fixup protocol h323 ras 1718-1719

fixup protocol http 80

fixup protocol rsh 514

fixup protocol rtsp 554

fixup protocol sip 5060

fixup protocol sip udp 5060

fixup protocol skinny 2000

fixup protocol smtp 25

fixup protocol sqlnet 1521

fixup protocol tftp 69

names

!--- This is traffic to PIX Central.

access-list 110 permit ip 10.2.2.0 255.255.255.0 10.1.1.0 255.255.255.0

!--- Do not do NAT on traffic to PIX Central.

access-list 100 permit ip 10.2.2.0 255.255.255.0 10.1.1.0 255.255.255.0

pager lines 24

logging on

mtu outside 1500

mtu inside 1500

ip address outside 172.18.124.154 255.255.255.0

ip address inside 10.2.2.1 255.255.255.0

ip audit info action alarm

ip audit attack action alarm

no failover

failover timeout 0:00:00

failover poll 15

no failover ip address outside

no failover ip address inside

pdm history enable

arp timeout 14400

!--- Do not do NAT on traffic to PIX Central.

nat (inside) 0 access-list 100

route outside 0.0.0.0 0.0.0.0 172.18.124.1 1

timeout xlate 3:00:00

timeout conn 1:00:00 half-closed 0:10:00 udp 0:02:00 rpc 0:10:00 h225 1:00:00

timeout h323 0:05:00 mgcp 0:05:00 sip 0:30:00 sip_media 0:02:00

timeout uauth 0:05:00 absolute

aaa-server TACACS+ protocol tacacs+

aaa-server RADIUS protocol radius

aaa-server LOCAL protocol local

no snmp-server location

no snmp-server contact

snmp-server community public

no snmp-server enable traps

floodguard enable

sysopt connection permit-ipsec

crypto ipsec transform-set myset esp-des esp-md5-hmac

!--- This is traffic to PIX Central.

crypto map newmap 10 ipsec-isakmp

crypto map newmap 10 match address 110

crypto map newmap 10 set peer 172.18.124.153

crypto map newmap 10 set transform-set myset

crypto map newmap interface outside

isakmp enable outside

isakmp key ******** address 172.18.124.153 netmask 255.255.255.255

no-xauth no-config-mode

isakmp identity address

isakmp policy 10 authentication pre-share

isakmp policy 10 encryption des

isakmp policy 10 hash md5

isakmp policy 10 group 1

isakmp policy 10 lifetime 1000

telnet timeout 5

ssh timeout 5

console timeout 0

terminal width 80

Cryptochecksum:d41d8cd98f00b204e9800998ecf8427e

: end

PIX 3

Building configuration...

: Saved

:

PIX Version 6.3(3)

interface ethernet0 auto

interface ethernet1 auto

nameif ethernet0 outside security0

nameif ethernet1 inside security100

enable password 8Ry2YjIyt7RRXU24 encrypted

passwd 2KFQnbNIdI.2KYOU encrypted

hostname pix3

fixup protocol dns maximum-length 512

fixup protocol ftp 21

fixup protocol h323 h225 1720

fixup protocol h323 ras 1718-1719

fixup protocol http 80

fixup protocol rsh 514

fixup protocol rtsp 554

fixup protocol sip 5060

fixup protocol sip udp 5060

fixup protocol skinny 2000

fixup protocol smtp 25

fixup protocol sqlnet 1521

fixup protocol tftp 69

names

!--- This is traffic to PIX Central.

access-list 110 permit ip 10.3.3.0 255.255.255.0 10.1.1.0 255.255.255.0

!--- Do not do NAT on traffic to PIX Central.

access-list 100 permit ip 10.3.3.0 255.255.255.0 10.1.1.0 255.255.255.0

pager lines 24

logging on

mtu outside 1500

mtu inside 1500

ip address outside 172.18.124.157 255.255.255.0

ip address inside 10.3.3.1 255.255.255.0

ip audit info action alarm

ip audit attack action alarm

no failover

failover timeout 0:00:00

failover poll 15

no failover ip address outside

no failover ip address inside

pdm history enable

arp timeout 14400

!--- Do not do NAT on traffic to PIX Central.

nat (inside) 0 access-list 100

route outside 0.0.0.0 0.0.0.0 172.18.124.1 1

timeout xlate 3:00:00

timeout conn 1:00:00 half-closed 0:10:00 udp 0:02:00 rpc 0:10:00 h225 1:00:00

timeout h323 0:05:00 mgcp 0:05:00 sip 0:30:00 sip_media 0:02:00

timeout uauth 0:05:00 absolute

aaa-server TACACS+ protocol tacacs+

aaa-server RADIUS protocol radius

aaa-server LOCAL protocol local

no snmp-server location

no snmp-server contact

snmp-server community public

no snmp-server enable traps

floodguard enable

sysopt connection permit-ipsec

crypto ipsec transform-set myset esp-des esp-md5-hmac

!--- This is traffic to PIX Central.

crypto map newmap 10 ipsec-isakmp

crypto map newmap 10 match address 110

crypto map newmap 10 set peer 172.18.124.153

crypto map newmap 10 set transform-set myset

crypto map newmap interface outside

isakmp enable outside

isakmp key ******** address 172.18.124.153 netmask 255.255.255.255

no-xauth no-config-mode

isakmp identity address

isakmp policy 10 authentication pre-share

isakmp policy 10 encryption des

isakmp policy 10 hash md5

isakmp policy 10 group 1

isakmp policy 10 lifetime 1000

telnet timeout 5

ssh timeout 5

console timeout 0

terminal width 80

Cryptochecksum:aa3bbd8c6275d214b153e1e0bc0173e4

: end

Überprüfen

In diesem Abschnitt überprüfen Sie, ob Ihre Konfiguration ordnungsgemäß funktioniert.

Das Output Interpreter Tool (nur registrierte Kunden) (OIT) unterstützt bestimmte show-Befehle. Verwenden Sie das OIT, um eine Analyse der Ausgabe des Befehls show anzuzeigen.

- show crypto ipsec sa: Zeigt den aktuellen Status der IPsec-Sicherheitszuordnungen (SAs) an und ist hilfreich, um festzustellen, ob Datenverkehr verschlüsselt wird.

pix-central#show crypto ipsec sa

interface: outside

Crypto map tag: newmap, local addr. 172.18.124.153

local  ident (addr/mask/prot/port): (10.1.1.0/255.255.255.0/0/0)

remote ident (addr/mask/prot/port): (10.3.3.0/255.255.255.0/0/0)

current_peer: 172.18.124.157:500

PERMIT, flags={origin_is_acl,}

!--- This verifies that encrypted packets are sent !--- and received without any errors.

#pkts encaps: 4, #pkts encrypt: 4, #pkts digest 4

#pkts decaps: 4, #pkts decrypt: 4, #pkts verify 4

#pkts compressed: 0, #pkts decompressed: 0

#pkts not compressed: 0, #pkts compr. failed: 0,

#pkts decompress failed: 0, #send errors 0, #recv errors 0

local crypto endpt.: 172.18.124.153,

remote crypto endpt.: 172.18.124.157

path mtu 1500, ipsec overhead 56, media mtu 1500

current outbound spi: 3bcb6913

!--- Shows inbound SAs that are established.

inbound esp sas:

spi: 0x3efbe540(1056695616)

transform: esp-des esp-md5-hmac ,

in use settings ={Tunnel, }

slot: 0, conn id: 3, crypto map: newmap

sa timing: remaining key lifetime (k/sec): (4607999/27330)

IV size: 8 bytes

replay detection support: Y

inbound ah sas:

inbound pcp sas:

!--- Shows outbound SAs that are established.

outbound esp sas:

spi: 0x3bcb6913(1003186451)

transform: esp-des esp-md5-hmac ,

in use settings ={Tunnel, }

slot: 0, conn id: 4, crypto map: newmap

sa timing: remaining key lifetime (k/sec): (4607999/27321)

IV size: 8 bytes

replay detection support: Y

outbound ah sas:

outbound pcp sas:

local  ident (addr/mask/prot/port): (10.1.1.0/255.255.255.0/0/0)

remote ident (addr/mask/prot/port): (10.2.2.0/255.255.255.0/0/0)

current_peer: 172.18.124.154:500

PERMIT, flags={origin_is_acl,}

!--- This verifies that encrypted packets are sent !--- and received without any errors.

#pkts encaps: 4, #pkts encrypt: 4, #pkts digest 4

#pkts decaps: 4, #pkts decrypt: 4, #pkts verify 4

#pkts compressed: 0, #pkts decompressed: 0

#pkts not compressed: 0, #pkts compr. failed: 0,

#pkts decompress failed: 0, #send errors 0, #recv errors 0

local crypto endpt.: 172.18.124.153,

remote crypto endpt.: 172.18.124.154

path mtu 1500, ipsec overhead 56, media mtu 1500

current outbound spi: da8d556

!--- Shows inbound SAs that are established.

inbound esp sas:

spi: 0x53835c96(1401117846)

transform: esp-des esp-md5-hmac ,

in use settings ={Tunnel, }

slot: 0, conn id: 1, crypto map: newmap

sa timing: remaining key lifetime (k/sec): (4607999/27319)

IV size: 8 bytes

replay detection support: Y

inbound ah sas:

inbound pcp sas:

!--- Shows outbound SAs that are established.

outbound esp sas:

spi: 0xda8d556c(3666695532)

transform: esp-des esp-md5-hmac ,

in use settings ={Tunnel, }

slot: 0, conn id: 2, crypto map: newmap

sa timing: remaining key lifetime (k/sec): (4607999/27319)

IV size: 8 bytes

replay detection support: Y

outbound ah sas:

outbound pcp sas:

- show crypto isakmp sa: Zeigt den aktuellen Zustand der Internet Key Exchange (IKE)-SAs an.

pix-central#show crypto isakmp sa

Total     : 2

Embryonic : 0

dst               src       state     pending   created

172.18.124.153   172.18.124.154   QM_IDLE         0         0

172.18.124.153   172.18.124.157   QM_IDLE         0         0

Fehlerbehebung

Dieser Abschnitt enthält Informationen zur Fehlerbehebung in Ihrer Konfiguration.

Befehle zur Fehlerbehebung

Hinweis: Beachten Sie vor der Verwendung von Debug-Befehlen die Informationen zu Debug-Befehlen.

Auf dem PIX (wobei die Befehle zum Debuggen oder Protokollieren von Protokollüberwachungs-Befehlen ausgeführt werden):

- debug crypto ipsec - Debuggt die IPsec-Verarbeitung.

- debug crypto isakmp - Debugs Internet Security Association and Key Management Protocol (ISAKMP) Processing.

- debug crypto engine - Zeigt Debugmeldungen über Krypto Engines an, die Verschlüsselung und Entschlüsselung durchführen.

Sicherheitszuordnungen löschen

Verwenden Sie diese Befehle im Konfigurationsmodus des PIX:

- clear [crypto] ipsec sa: Löscht die aktiven IPsec-SAs. Das Schlüsselwort crypto ist optional.

- clear [crypto] isakmp sa: Löscht die aktiven IKE-SAs. Das Schlüsselwort crypto ist optional.

Zugehörige Informationen

- Cisco PIX Firewall-Software

- Cisco Secure PIX Firewall - Befehlsreferenzen

- Problemhinweise zu Sicherheitsprodukten (einschließlich PIX)

- Anforderungen für Kommentare (RFCs)

- IPsec-Aushandlung/IKE-Protokolle

- Technischer Support und Dokumentation - Cisco Systems