Inhalt

Einführung

Voraussetzungen

Anforderungen

Verwendete Komponenten

Konventionen

Hintergrundinformationen

Konfigurieren

Netzwerkdiagramm

Konfiguration für IPSec mithilfe eines Layer-2-Zugriffs- oder Trunk-Ports

Konfiguration für IPSec mit einem gerouteten Port

Überprüfen

Fehlerbehebung

Fehlerbehebung bei Befehlen

Zugehörige Informationen

Einführung

Dieses Dokument beschreibt die Erstellung eines IPSec LAN-to-LAN-Tunnels zwischen einem Cisco Catalyst Switch der Serie 6500 mit dem IPSec VPN-Dienstmodul (W) und einer Cisco PIX-Firewall.

Voraussetzungen

Anforderungen

Für dieses Dokument bestehen keine speziellen Anforderungen.

Verwendete Komponenten

Die Informationen in diesem Dokument basieren auf den folgenden Software- und Hardwareversionen:

- Cisco IOS® Softwareversion 12.2(14)SY2 für die Catalyst Supervisor Engine der Serie 6000 mit IPSec VPN-Servicemodul

- Cisco PIX Firewall-Software Version 6.3(3)

Die Informationen in diesem Dokument wurden von den Geräten in einer bestimmten Laborumgebung erstellt. Alle in diesem Dokument verwendeten Geräte haben mit einer leeren (Standard-)Konfiguration begonnen. Wenn Ihr Netzwerk in Betrieb ist, stellen Sie sicher, dass Sie die potenziellen Auswirkungen eines Befehls verstehen.

Konventionen

Weitere Informationen zu Dokumentkonventionen finden Sie in den Cisco Technical Tips Conventions.

Hintergrundinformationen

Das Catalyst 6500 VPN-Servicemodul verfügt über zwei Gigabit Ethernet (GE)-Ports ohne von außen sichtbare Anschlüsse. Diese Ports können nur zu Konfigurationszwecken adressiert werden. Port 1 ist immer der interne Port. Dieser Port verarbeitet den gesamten Datenverkehr vom und zum internen Netzwerk. Der zweite Port (Port 2) verarbeitet den gesamten Datenverkehr vom und zum WAN oder zu externen Netzwerken. Diese beiden Ports werden immer im 802.1Q-Trunking-Modus konfiguriert. Das VPN-Servicemodul verwendet eine Technik, die als Bump In The Wire (BITW) für den Paketfluss bezeichnet wird.

Pakete werden von einem Paar VLANs, einem Layer-3-VLAN innerhalb und einem Layer-2-VLAN außerhalb verarbeitet. Die Pakete von innen nach außen werden über eine Methode mit dem Namen Encoded Address Recognition Logic (EARL) an das interne VLAN weitergeleitet. Nachdem die Pakete verschlüsselt wurden, verwendet das VPN-Servicemodul das entsprechende externe VLAN. Beim Entschlüsselungsprozess werden die Pakete von außen nach innen mithilfe des externen VLAN zum VPN-Dienstmodul überbrückt. Nachdem das VPN-Servicemodul das Paket entschlüsselt und dem entsprechenden internen VLAN zugeordnet hat, leitet EARL das Paket an den entsprechenden LAN-Port weiter. Das Layer-3-interne VLAN und die Layer-2-externen VLANs sind mit dem Befehl crypto connect vlan verbunden. Die Catalyst Switches der Serie 6500 verfügen über drei Port-Typen:

- Geroutete Ports - Standardmäßig sind alle Ethernet-Ports geroutete Ports in Cisco IOS. Diesen Ports ist ein verborgenes VLAN zugeordnet.

- Access Ports - Diesen Ports ist ein externes oder VTP-VLAN (VLAN Trunk Protocol) zugeordnet. Sie können einem definierten VLAN mehrere Ports zuordnen.

- Trunk-Ports - Diese Ports enthalten viele externe oder VTP-VLANs, auf denen alle Pakete mit einem 802.1Q-Header gekapselt sind.

Konfigurieren

In diesem Abschnitt erhalten Sie Informationen zum Konfigurieren der in diesem Dokument beschriebenen Funktionen.

Hinweis: Verwenden Sie das Command Lookup Tool (nur registrierte Kunden), um weitere Informationen zu den in diesem Dokument verwendeten Befehlen zu erhalten.

Netzwerkdiagramm

In diesem Dokument wird die folgende Netzwerkeinrichtung verwendet:

Konfiguration für IPSec mithilfe eines Layer-2-Zugriffs- oder Trunk-Ports

Führen Sie diese Schritte durch, um IPSec mithilfe eines Layer-2-Zugriffs- oder Trunk-Ports für die physische Außenschnittstelle zu konfigurieren.

1. Fügen Sie die internen VLANs dem internen Port des VPN-Dienstmoduls hinzu.

Nehmen Sie an, das VPN-Servicemodul befindet sich in Steckplatz 4. Verwenden Sie VLAN 100 als internes VLAN und VLAN 209 als externes VLAN. Konfigurieren Sie die GE-Ports des VPN-Dienstmoduls wie folgt:

interface GigabitEthernet4/1

no ip address

flowcontrol receive on

flowcontrol send off

switchport

switchport trunk encapsulation dot1q

switchport trunk allowed vlan 1,100,1002-1005

switchport mode trunk

cdp enable

interface GigabitEthernet4/2

no ip address

flowcontrol receive on

flowcontrol send off

switchport

switchport trunk encapsulation dot1q

switchport trunk allowed vlan 1,209,1002-1005

switchport mode trunk

cdp enable

spanning-tree portfast trunk

2. Fügen Sie die VLAN 100-Schnittstelle und die Schnittstelle hinzu, an der der Tunnel terminiert wird (in diesem Fall die Schnittstelle VLAN 209, wie hier gezeigt).

interface Vlan100

ip address 10.66.79.180 255.255.255.224

interface Vlan209

no ip address

crypto connect vlan 100

3. Konfigurieren Sie den externen physischen Port als Zugriffs- oder Trunk-Port (in diesem Fall FastEthernet 2/48, wie hier gezeigt).

!--- This is the configuration that uses an access port.

interface FastEthernet2/48

no ip address

switchport

switchport access vlan 209

switchport mode access

!--- This is the configuration that uses a trunk port.

interface FastEthernet2/48

no ip address switchport

switchport trunk encapsulation dot1q

switchport mode trunk

4. Erstellen Sie die NAT umgehen. Fügen Sie diese Einträge der no nat-Anweisung hinzu, um die Verschachtelung zwischen diesen Netzwerken auszunehmen:

access-list inside_nat0_outbound permit ip 192.168.5.0 0.0.0.255

192.168.6.0 0.0.0.255

global (outside) 1 interface

nat (inside) 0 access-list inside_nat0_outbound

nat (inside) 1 192.168.5.0 255.255.255.0

5. Erstellen Sie Ihre Crypto-Konfiguration und die Zugriffskontrollliste (ACL), die den zu verschlüsselnden Datenverkehr definiert.

1. Erstellen Sie eine Crypto ACL (in diesem Fall ACL 100 - Interesting Traffic), die den Datenverkehr vom internen Netzwerk 192.168.5.0/24 zum Remote-Netzwerk 192.168.6.0/24 definiert. Beispiel:

access-list 100 permit ip 192.168.5.0 0.0.0.255 192.168.6.0 0.0.0.255

2. Definieren Sie Ihre Richtlinienvorschläge für die Internet Security Association und das Key Management Protocol (ISAKMP):

crypto isakmp policy 1

hash md5

authentication pre-share

group 2

3. Geben Sie diesen Befehl (in diesem Beispiel) ein, um vorinstallierte Schlüssel zu verwenden und zu definieren:

crypto isakmp key cisco address 10.66.79.73

4. Legen Sie Ihre IPSec-Vorschläge wie folgt fest:

crypto ipsec transform-set cisco esp-des esp-md5-hmac

5. Erstellen Sie Ihre Crypto Map-Anweisung wie folgt:

crypto map cisco 10 ipsec-isakmp

set peer 10.66.79.73

set transform-set cisco

match address 100

6. Wenden Sie die Crypto Map auf die VLAN 100-Schnittstelle an. Beispiel:

interface vlan100

crypto map cisco

Diese Konfigurationen werden verwendet:

- Catalyst 6500

- PIX-Firewall

Catalyst 6500

!--- Define the Phase 1 policy.

crypto isakmp policy 1

hash md5

authentication pre-share

group 2

crypto isakmp key cisco address 10.66.79.73

!

!

!--- Define the encryption policy for this setup.

crypto ipsec transform-set cisco esp-des esp-md5-hmac

!

!--- Define a static crypto map entry for the peer !--- with mode ipsec-isakmp. !--- This indicates that Internet Key Exchange (IKE) !--- is used to establish the IPSec !--- security associations (SAs) to protect the traffic !--- specified by this crypto map entry.

crypto map cisco 10 ipsec-isakmp

set peer 10.66.79.73

set transform-set cisco

match address 100

!

!

no spanning-tree vlan 100

!

!

!

interface FastEthernet2/1

ip address 192.168.5.1 255.255.255.0

!

!--- This is the outside Layer 2 port that allows !--- VLAN 209 traffic to enter.

interface FastEthernet2/48

no ip address

switchport

switchport trunk encapsulation dot1q

switchport mode trunk

!

interface GigabitEthernet4/1

no ip address

flowcontrol receive on

flowcontrol send off

switchport

switchport trunk encapsulation dot1q

!--- VLAN 100 is defined as the Interface VLAN (IVLAN).

switchport trunk allowed vlan 1,100,1002-1005

switchport mode trunk

cdp enable

!

interface GigabitEthernet4/2

no ip address

flowcontrol receive on

flowcontrol send off

switchport

switchport trunk encapsulation dot1q

!--- The Port VLAN (PVLAN) configuration is handled transparently by !--- the VPN service module without user configuration !--- or involvement. It also is not shown in the configuration. !--- Note: For every IVLAN, a corresponding PVLAN exists.

switchport trunk allowed vlan 1,209,1002-1005

switchport mode trunk

cdp enable

spanning-tree portfast trunk

!

interface Vlan1

no ip address

shutdown

!

!--- This is the IVLAN that is configured to intercept the traffic !--- destined to the secure port on which the inside port !--- of the VPN service module is the only port present.

interface Vlan100

ip address 10.66.79.180 255.255.255.224

crypto map cisco

!--- This is the secure port that is a virtual Layer 3 interface. !--- This interface purposely does not have a Layer 3 IP address !--- configured. This is normal for the BITW process. !--- The IP address is moved from this interface to the VLAN 100 to !--- accomplish BITW. This brings the VPN service module into !--- the packet path.

interface Vlan209

no ip address

crypto connect vlan 100

!

ip classless

global (outside) 1 interface

!--- NAT 0 prevents NAT for networks specified in the ACL inside_nat0_outbound.

nat (inside) 0 access-list inside_nat0_outbound

nat (inside) 1 192.168.5.0 255.255.255.0

!--- Configure the routing so that the device !--- is directed to reach its destination network.

ip route 0.0.0.0 0.0.0.0 10.66.79.161

!--- This access list (inside_nat0_outbound) is used with the nat zero command. !--- This prevents traffic which matches the access list from undergoing !--- network address translation (NAT). The traffic specified by this ACL is !--- traffic that is to be encrypted and !--- sent across the VPN tunnel. This ACL is intentionally !--- the same as (100). !--- Two separate access lists should always be used in this configuration. access-list inside_nat0_outbound permit ip 192.168.5.0 0.0.0.255 192.168.6.0 0.0.0.255

!--- This is the crypto ACL.

access-list 100 permit ip 192.168.5.0 0.0.0.255 192.168.6.0 0.0.0.255

PIX-Firewall

SV2-8(config)# show run

: Saved

:

PIX Version 6.3(3)

interface ethernet0 auto

interface ethernet1 auto

interface ethernet2 auto shutdown

interface ethernet3 auto shutdown

interface ethernet4 auto shutdown

interface ethernet5 auto shutdown

interface ethernet6 auto shutdown

nameif ethernet0 outside security0

nameif ethernet1 inside security100

nameif ethernet2 intf2 security10

nameif ethernet3 intf3 security15

nameif ethernet4 intf4 security20

nameif ethernet5 intf5 security25

nameif ethernet6 intf6 security30

enable password 8Ry2YjIyt7RRXU24 encrypted

passwd 2KFQnbNIdI.2KYOU encrypted

hostname SV2-8

domain-name cisco.com

fixup protocol dns maximum-length 512

fixup protocol ftp 21

fixup protocol h323 h225 1720

fixup protocol h323 ras 1718-1719

fixup protocol http 80

fixup protocol ils 389

fixup protocol rsh 514

fixup protocol rtsp 554

fixup protocol sip 5060

fixup protocol sip udp 5060

fixup protocol skinny 2000

fixup protocol smtp 25

fixup protocol sqlnet 1521

fixup protocol tftp 69

names

!--- This is the traffic to the router.

access-list 100 permit ip 192.168.6.0 255.255.255.0 192.168.5.0 255.255.255.0

access-list nonat permit ip 192.168.6.0 255.255.255.0 192.168.5.0 255.255.255.0

pager lines 24

mtu outside 1500

mtu inside 1500

mtu intf2 1500

mtu intf3 1500

mtu intf4 1500

mtu intf5 1500

mtu intf6 1500

ip address outside 10.66.79.73 255.255.255.224

ip address inside 192.168.6.1 255.255.255.0

ip address intf2 127.0.0.1 255.255.255.255

no ip address intf3

no ip address intf4

no ip address intf5

no ip address intf6

ip audit info action alarm

ip audit attack action alarm

no failover

failover timeout 0:00:00

failover poll 15

no failover ip address outside

no failover ip address inside

no failover ip address intf2

no failover ip address intf3

no failover ip address intf4

no failover ip address intf5

no failover ip address intf6

pdm history enable

arp timeout 14400

global (outside) 1 interface

nat (inside) 0 access-list nonat

nat (inside) 1 192.168.6.0 255.255.255.0 0 0

route outside 0.0.0.0 0.0.0.0 10.66.79.65 1

timeout xlate 3:00:00

timeout conn 1:00:00 half-closed 0:10:00 udp 0:02:00 rpc 0:10:00 h225 1:00:00

timeout h323 0:05:00 mgcp 0:05:00 sip 0:30:00 sip_media 0:02:00

timeout uauth 0:05:00 absolute

aaa-server TACACS+ protocol tacacs+

aaa-server RADIUS protocol radius

aaa-server LOCAL protocol local

no snmp-server location

no snmp-server contact

snmp-server community public

no snmp-server enable traps

floodguard enable

!--- These are IPSec policies.

sysopt connection permit-ipsec

crypto ipsec transform-set cisco esp-des esp-md5-hmac

crypto map cisco 10 ipsec-isakmp

crypto map cisco 10 match address 100

crypto map cisco 10 set peer 10.66.79.180

crypto map cisco 10 set transform-set cisco

crypto map cisco interface outside

!--- These are IKE policies.

isakmp enable outside

isakmp key ******** address 10.66.79.180 netmask 255.255.255.255

isakmp policy 1 authentication pre-share

isakmp policy 1 encryption des

isakmp policy 1 hash md5

isakmp policy 1 group 2

isakmp policy 1 lifetime 86400

telnet timeout 5

ssh timeout 5

console timeout 0

terminal width 80

Cryptochecksum:244c86c9beab00bda8f790502ca74db9

: end

Konfiguration für IPSec mit einem gerouteten Port

Führen Sie diese Schritte durch, um IPSec mithilfe eines gerouteten Layer-3-Ports für die physische Außenschnittstelle zu konfigurieren.

1. Fügen Sie die internen VLANs dem internen Port des VPN-Dienstmoduls hinzu.

Nehmen Sie an, das VPN-Servicemodul befindet sich in Steckplatz 4. Verwenden Sie VLAN 100 als internes VLAN und VLAN 209 als externes VLAN. Konfigurieren Sie die GE-Ports des VPN-Dienstmoduls wie folgt:

interface GigabitEthernet4/1

no ip address

flowcontrol receive on

flowcontrol send off

switchport

switchport trunk encapsulation dot1q

switchport trunk allowed vlan 1,100,1002-1005

switchport mode trunk

cdp enable

interface GigabitEthernet4/2

no ip address

flowcontrol receive on

flowcontrol send off

switchport

switchport trunk encapsulation dot1q

switchport trunk allowed vlan 1,209,1002-1005

switchport mode trunk

cdp enable

spanning-tree portfast trunk

2. Fügen Sie die VLAN 100-Schnittstelle und die Schnittstelle hinzu, an der der Tunnel terminiert wird (in diesem Fall FastEthernet2/48, wie hier gezeigt).

interface Vlan100

ip address 10.66.79.180 255.255.255.224

interface FastEthernet2/48

no ip address

crypto connect vlan 100

3. Erstellen Sie die NAT umgehen. Fügen Sie diese Einträge der no nat-Anweisung hinzu, um die Verschachtelung zwischen diesen Netzwerken auszunehmen:

access-list inside_nat0_outbound permit ip 192.168.5.0 0.0.0.255

192.168.6.0 0.0.0.255

global (outside) 1 interface

nat (inside) 0 access-list inside_nat0_outbound

nat (inside) 1 192.168.5.0 255.255.255.0

4. Erstellen Sie die Verschlüsselungskonfiguration und die ACL, die den zu verschlüsselnden Datenverkehr definiert.

1. Erstellen Sie eine ACL (in diesem Fall ACL 100), die den Datenverkehr vom internen Netzwerk 192.168.5.0/24 zum Remote-Netzwerk 192.168.6.0/24 definiert. Beispiel:

access-list 100 permit ip 192.168.5.0 0.0.0.255 192.168.6.0 0.0.0.255

2. Definieren Sie Ihre ISAKMP-Richtlinienvorschläge wie folgt:

crypto isakmp policy 1

hash md5

authentication pre-share

group 2

3. Geben Sie diesen Befehl (in diesem Beispiel) ein, um vorinstallierte Schlüssel zu verwenden und zu definieren:

crypto isakmp key cisco address 10.66.79.73

4. Legen Sie Ihre IPSec-Vorschläge wie folgt fest:

crypto ipsec transform-set cisco esp-des esp-md5-hmac

5. Erstellen Sie Ihre Crypto Map-Anweisung wie folgt:

crypto map cisco 10 ipsec-isakmp

set peer 10.66.79.73

set transform-set cisco

match address 100

5. Wenden Sie die Crypto Map auf die VLAN 100-Schnittstelle an. Beispiel:

interface vlan100

crypto map cisco

Diese Konfigurationen werden verwendet:

- Catalyst 6500

- PIX-Firewall

Catalyst 6500

!--- Define the Phase 1 policy.

crypto isakmp policy 1

hash md5

authentication pre-share

group 2

crypto isakmp key cisco address 10.66.79.73

!

!

!--- Define the encryption policy for this setup.

crypto ipsec transform-set cisco esp-des esp-md5-hmac

!

!--- Define a static crypto map entry for the peer !--- with mode ipsec-isakmp. !--- This indicates that IKE is used to establish the !--- IPSec SAs to protect the traffic !--- specified by this crypto map entry.

crypto map cisco 10 ipsec-isakmp

set peer 10.66.79.73

set transform-set cisco

match address 100

!

!

no spanning-tree vlan 100

!

!

!

interface FastEthernet2/1

ip address 192.168.5.1 255.255.255.0

!

!--- This is the secure port that is configured in routed port mode. !--- This routed port mode does not have a Layer 3 IP address !--- configured. This is normal for the BITW process. !--- The IP address is moved from this interface to the VLAN 100 to !--- accomplish BITW. This brings the VPN service module into !--- the packet path. This is the Layer 2 port VLAN on which the !--- outside port of the VPN service module also belongs.

!

interface FastEthernet2/48

no ip address

crypto connect vlan 100

!

interface GigabitEthernet4/1

no ip address

flowcontrol receive on

flowcontrol send off

switchport

switchport trunk encapsulation dot1q

!--- VLAN 100 is defined as the IVLAN.

switchport trunk allowed vlan 1,100,1002-1005

switchport mode trunk

cdp enable

!

interface GigabitEthernet4/2

no ip address

flowcontrol receive on

flowcontrol send off

switchport

switchport trunk encapsulation dot1q

!--- The PVLAN configuration is handled transparently by the !--- VPN service module without user configuration !--- or involvement. It also is not shown in the configuration. !--- Note: For every IVLAN, a corresponding PVLAN exists.

switchport trunk allowed vlan 1,209,1002-1005

switchport mode trunk

cdp enable

spanning-tree portfast trunk

!

interface Vlan1

no ip address

shutdown

!

!--- This is the IVLAN that is configured to intercept the traffic !--- destined to the secure port on which the inside port of the !--- VPN service module is the only port present.

interface Vlan100

ip address 10.66.79.180 255.255.255.224

crypto map cisco

!--- This is the secure port that is a virtual Layer 3 interface. !--- This interface purposely does not have a Layer 3 IP address !--- configured. This is normal for the BITW process. !--- The IP address is moved from this interface to the VLAN 100 to !--- accomplish BITW. This brings the VPN service module into !--- the packet path.

!

ip classless

global (outside) 1 interface

!--- NAT 0 prevents NAT for networks specified in the ACL inside_nat0_outbound.

nat (inside) 0 access-list inside_nat0_outbound

nat (inside) 1 192.168.6.0 255.255.255.0

!--- Configure the routing so that the device !--- is directed to reach its destination network.

ip route 0.0.0.0 0.0.0.0 10.66.79.161

!

!--- This access list (inside_nat0_outbound) is used with the nat zero command. !--- This prevents traffic which matches the access list from undergoing !--- network address translation (NAT). The traffic specified by this ACL is !--- traffic that is to be encrypted and !--- sent across the VPN tunnel. This ACL is intentionally !--- the same as (100). !--- Two separate access lists should always be used in this configuration.

access-list inside_nat0_outbound permit ip 192.168.5.0 0.0.0.255 192.168.6.0 0.0.0.255

!--- This is the crypto ACL.

access-list 100 permit ip 192.168.5.0 0.0.0.255 192.168.6.0 0.0.0.255

PIX-Firewall

SV2-8(config)# show run

: Saved

:

PIX Version 6.3(3)

interface ethernet0 auto

interface ethernet1 auto

interface ethernet2 auto shutdown

interface ethernet3 auto shutdown

interface ethernet4 auto shutdown

interface ethernet5 auto shutdown

interface ethernet6 auto shutdown

nameif ethernet0 outside security0

nameif ethernet1 inside security100

nameif ethernet2 intf2 security10

nameif ethernet3 intf3 security15

nameif ethernet4 intf4 security20

nameif ethernet5 intf5 security25

nameif ethernet6 intf6 security30

enable password 8Ry2YjIyt7RRXU24 encrypted

passwd 2KFQnbNIdI.2KYOU encrypted

hostname SV2-8

domain-name cisco.com

fixup protocol dns maximum-length 512

fixup protocol ftp 21

fixup protocol h323 h225 1720

fixup protocol h323 ras 1718-1719

fixup protocol http 80

fixup protocol ils 389

fixup protocol rsh 514

fixup protocol rtsp 554

fixup protocol sip 5060

fixup protocol sip udp 5060

fixup protocol skinny 2000

fixup protocol smtp 25

fixup protocol sqlnet 1521

fixup protocol tftp 69

names

!--- This is the traffic to the router.

access-list 100 permit ip 192.168.6.0 255.255.255.0 192.168.5.0 255.255.255.0

access-list nonat permit ip 192.168.6.0 255.255.255.0 192.168.5.0 255.255.255.0

pager lines 24

mtu outside 1500

mtu inside 1500

mtu intf2 1500

mtu intf3 1500

mtu intf4 1500

mtu intf5 1500

mtu intf6 1500

ip address outside 10.66.79.73 255.255.255.224

ip address inside 192.168.6.1 255.255.255.0

ip address intf2 127.0.0.1 255.255.255.255

no ip address intf3

no ip address intf4

no ip address intf5

no ip address intf6

ip audit info action alarm

ip audit attack action alarm

no failover

failover timeout 0:00:00

failover poll 15

no failover ip address outside

no failover ip address inside

no failover ip address intf2

no failover ip address intf3

no failover ip address intf4

no failover ip address intf5

no failover ip address intf6

pdm history enable

arp timeout 14400

global (outside) 1 interface

nat (inside) 0 access-list nonat

nat (inside) 1 192.168.6.0 255.255.255.0 0 0

route outside 0.0.0.0 0.0.0.0 10.66.79.65 1

timeout xlate 3:00:00

timeout conn 1:00:00 half-closed 0:10:00 udp 0:02:00 rpc 0:10:00 h225 1:00:00

timeout h323 0:05:00 mgcp 0:05:00 sip 0:30:00 sip_media 0:02:00

timeout uauth 0:05:00 absolute

aaa-server TACACS+ protocol tacacs+

aaa-server RADIUS protocol radius

aaa-server LOCAL protocol local

no snmp-server location

no snmp-server contact

snmp-server community public

no snmp-server enable traps

floodguard enable

!--- These are IPSec policies.

sysopt connection permit-ipsec

crypto ipsec transform-set cisco esp-des esp-md5-hmac

crypto map cisco 10 ipsec-isakmp

crypto map cisco 10 match address 100

crypto map cisco 10 set peer 10.66.79.180

crypto map cisco 10 set transform-set cisco

crypto map cisco interface outside

!--- These are IKE policies.

isakmp enable outside

isakmp key ******** address 10.66.79.180 netmask 255.255.255.255

isakmp policy 1 authentication pre-share

isakmp policy 1 encryption des

isakmp policy 1 hash md5

isakmp policy 1 group 2

isakmp policy 1 lifetime 86400

telnet timeout 5

ssh timeout 5

console timeout 0

terminal width 80

Cryptochecksum:244c86c9beab00bda8f790502ca74db9

: end

Überprüfen

Dieser Abschnitt enthält Informationen zur Bestätigung, dass Ihre Konfiguration ordnungsgemäß funktioniert.

Das Output Interpreter Tool (nur registrierte Kunden) (OIT) unterstützt bestimmte show-Befehle. Verwenden Sie das OIT, um eine Analyse der Ausgabe des Befehls show anzuzeigen.

- show crypto ipsec sa: Zeigt die Einstellungen an, die von den aktuellen IPSec SAs verwendet werden.

- show crypto isakmp sa - Zeigt alle aktuellen IKE-SAs in einem Peer an.

- show crypto vlan - Zeigt das VLAN an, das der Verschlüsselungskonfiguration zugeordnet ist.

- show crypto eli - Zeigt die Statistiken des VPN-Dienstmoduls an.

Weitere Informationen zum Überprüfen und Beheben von IPSec finden Sie unter IP Security Troubleshooting - Understanding and Using debug Commands.

Fehlerbehebung

Dieser Abschnitt enthält Informationen zur Fehlerbehebung in Ihrer Konfiguration.

Fehlerbehebung bei Befehlen

Hinweis: Bevor Sie Debugbefehle ausgeben, lesen Sie die Informationen Wichtige Informationen über Debug-Befehle.

- debug crypto ipsec - Zeigt die IPSec-Verhandlungen von Phase 2.

- debug crypto isakmp - Zeigt die ISAKMP-Verhandlungen von Phase 1.

- debug crypto engine - Zeigt den verschlüsselten Datenverkehr an.

- clear crypto isakmp: Löscht die SAs für Phase 1.

- clear crypto sa: Löscht die SAs für Phase 2.

Weitere Informationen zum Überprüfen und Beheben von IPSec finden Sie unter IP Security Troubleshooting - Understanding and Using debug Commands.

Zugehörige Informationen

- IPSec-Support-Seite

- Konfigurieren der IPSec-Netzwerksicherheit

- Konfigurieren des Internet Key Exchange Security Protocol

- Technischer Support - Cisco Systems