Inhalt

Einleitung

Voraussetzungen

Anforderungen

Verwendete Komponenten

Konventionen

Hintergrundinformationen

Konfigurieren

Netzwerkdiagramm

Konfiguration

Überprüfung

Fehlerbehebung

Zugehörige Informationen

Einleitung

In diesem Dokument wird beschrieben, wie Open Shortest Path First (OSPF) Version 3 für IPv6 auf einer Schnittstelle aktiviert wird.

Voraussetzungen

Anforderungen

Bevor Sie OSPF für IPv6 auf einer Schnittstelle aktivieren, müssen Sie:

- Vervollständigen Sie die OSPF-Netzwerkstrategie, und planen Sie Ihr IPv6-Netzwerk. Sie müssen beispielsweise entscheiden, ob mehrere Bereiche erforderlich sind.

- Aktivieren Sie IPv6-Unicast-Routing.

- Aktivieren Sie IPv6 auf der Schnittstelle.

- Konfigurieren Sie die IP Security (IPsec) Secure Socket Application Program Interface (API) auf OSPF für IPv6, um die Authentifizierung und Verschlüsselung zu aktivieren.

Verwendete Komponenten

Dieses Dokument ist nicht auf bestimmte Software- und Hardware-Versionen beschränkt.

Die Informationen in diesem Dokument beziehen sich auf Geräte in einer speziell eingerichteten Testumgebung. Alle Geräte, die in diesem Dokument benutzt wurden, begannen mit einer gelöschten (Nichterfüllungs) Konfiguration. Wenn Ihr Netzwerk in Betrieb ist, stellen Sie sicher, dass Sie die möglichen Auswirkungen aller Befehle kennen.

Konventionen

Weitere Informationen zu Dokumentkonventionen finden Sie unter Cisco Technical Tips Conventions (Technische Tipps von Cisco zu Konventionen).

Hintergrundinformationen

Open Shortest Path First (OSPF) ist ein Routing-Protokoll für IP. Es ist ein Link-State-Protokoll, im Gegensatz zu einem Distanzvektor-Protokoll. Ein Link-State-Protokoll trifft Routing-Entscheidungen basierend auf den Status der Verbindungen, die Quell- und Zielcomputer verbinden. Der Status einer Verbindung ist eine Beschreibung dieser Schnittstelle und der Beziehung zu den benachbarten Netzwerkgeräten. Zu den Schnittstelleninformationen gehören das IPv6-Präfix der Schnittstelle, die Netzwerkmaske, der Netzwerktyp, mit dem die Verbindung besteht, die mit dem Netzwerk verbundenen Router usw. Diese Informationen werden in verschiedenen Arten von Link-State-Ankündigungen (LSAs) propagiert. OSPF-Version 3, die in RFC 2740 beschrieben wird, unterstützt IPv6.

Konfigurieren

In diesem Abschnitt erfahren Sie, wie Sie die in diesem Dokument beschriebenen Funktionen konfigurieren können.

Hinweis: Verwenden Sie das Tool zur Befehlssuche /a>, um weitere Informationen zu den in diesem Dokument verwendeten Befehlen zu erhalten.

Hinweis: Nur registrierte Cisco Benutzer haben Zugriff auf interne Tools und Informationen von Cisco.

Netzwerkdiagramm

In diesem Dokument wird die folgende Netzwerkeinrichtung verwendet:

Netzwerkdiagramm

Konfiguration

Dies ist die OSPFv3-Konfiguration für die Router im Diagramm:

Stub-Router

ipv6 unicast-routing

ipv6 cef

!

interface GigabitEthernet0/0

no ip address

ipv6 address FD01:ABAB::/64 eui-64

ipv6 enable

ipv6 ospf 1 area 2

ipv6 ospf network point-to-point

!

ipv6 router ospf 1

router-id 10.3.3.3

area 2 stub

!

ABR1-Router

ipv6 unicast-routing

ipv6 cef

!

interface GigabitEthernet1

no ip address

speed auto

ipv6 address FD03::1/124

ipv6 enable

ipv6 ospf 1 area 0

!

interface GigabitEthernet2

no ip address

ipv6 address FD02:ABAB::/64 eui-64

ipv6 enable

ipv6 ospf 1 area 2

ipv6 ospf network point-to-point

!

ipv6 router ospf 1

router-id 10.1.1.1

area 2 stub no-summary

!

ASBR Router

ipv6 unicast-routing

ipv6 cef

!

interface GigabitEthernet1

no ip address

ipv6 address FD03::2/124

ipv6 enable

ipv6 ospf 1 area 0

!

interface GigabitEthernet2

no ip address

ipv6 address FD03::1:1/124

ipv6 enable

ipv6 rip EXT enable

!

ipv6 router ospf 1

router-id 10.2.2.2

default-metric 25

redistribute rip EXT metric-type 1 include-connected

!

ipv6 router rip EXT

redistribute ospf 1 match internal external 1 external 2 include-connected

!

Externer Router

ipv6 unicast-routing

ipv6 cef

!

interface Loopback0

no ip address

ipv6 address FD04:ABAB::/64 eui-64

ipv6 enable

ipv6 rip EXT enable

!

interface GigabitEthernet0/0

no ip address

ipv6 address FD03::1:2/124

ipv6 enable

ipv6 rip EXT enable

!

ipv6 router rip EXT

Überprüfung

Nutzen Sie diesen Abschnitt, um zu überprüfen, ob Ihre Konfiguration ordnungsgemäß funktioniert.

Das Output Interpreter Tool unterstützt bestimmte show-Befehle. Verwenden Sie das OIT, um eine Analyse der show-Befehlsausgabe anzuzeigen.

Der Befehl show ipv6 ospf database zeigt die Link State Database (LSDB) des Routers an.

Hinweis: Nur registrierte Cisco Benutzer können auf interne Tools und Informationen von Cisco zugreifen.

Stub_Router#show ipv6 ospf database

OSPFv3 Router with ID (10.3.3.3) (Process ID 1)

Router Link States (Area 2)

ADV Router       Age         Seq#        Fragment ID  Link count  Bits

10.1.1.1        5           0x8000000F  0            1           B

10.3.3.3        38          0x8000000E  0            1           None

Inter Area Prefix Link States (Area 2)

ADV Router       Age         Seq#        Prefix

10.1.1.1        5           0x80000002  ::/0

Link (Type-8) Link States (Area 2)

ADV Router       Age         Seq#        Link ID    Interface

10.1.1.1        5           0x8000000A  8          Gi0/0

10.3.3.3        292         0x80000005  2          Gi0/0

Intra Area Prefix Link States (Area 2)

ADV Router       Age         Seq#        Link ID    Ref-lstype  Ref-LSID

10.1.1.1        5           0x8000000B  0          0x2001      0

10.3.3.3        548         0x80000002  0          0x2001      0

Der Befehl show ipv6 ospf database router gibt die Router-LSAs an, von denen der Router stammt und empfängt. Die Router-LSAs enthalten keine Adress- oder Präfixinformationen.

Stub_Router#show ipv6 ospf database router

OSPFv3 Router with ID (10.3.3.3) (Process ID 1)

Router Link States (Area 2)

Routing Bit Set on this LSA

LS age: 141

Options: (V6-Bit, R-Bit, DC-Bit)

LS Type: Router Links

Link State ID: 0

Advertising Router: 10.1.1.1

LS Seq Number: 8000000F

Checksum: 0x9C2C

Length: 40

Area Border Router

Number of Links: 1

Link connected to: another Router (point-to-point)

Link Metric: 1

Local Interface ID: 8

Neighbor Interface ID: 2

Neighbor Router ID: 10.3.3.3

LS age: 174

Options: (V6-Bit, R-Bit, DC-Bit)

LS Type: Router Links

Link State ID: 0

Advertising Router: 10.3.3.3

LS Seq Number: 8000000E

Checksum: 0xBBF

Length: 40

Number of Links: 1

Link connected to: another Router (point-to-point)

Link Metric: 1

Local Interface ID: 2

Neighbor Interface ID: 8

Neighbor Router ID: 10.1.1.1

Die LSAs enthalten ein Optionsfeld mit folgenden Bits:

- V6-Bit: Gibt an, ob der Router/Link für die Routing-Berechnung verwendet werden muss.

- R bit: Dies ist das "Router-Bit". Sie zeigt an, ob der Ausgangspunkt ein aktiver Router ist.

- DC bit (Gleichstrom-Bit): Zeigt an, wie der Router die Demand Circuit handhabt.

Der Befehl show ipv6 ospf database link self-originate gibt an, dass Link-LSAs verknüpfungsspezifische Adressen übertragen.

Stub_Router#show ipv6 ospf database link self-originate

OSPFv3 Router with ID (10.3.3.3) (Process ID 1)

Link (Type-8) Link States (Area 2)

LS age: 650

Options: (V6-Bit, R-Bit, DC-Bit)

LS Type: Link-LSA (Interface: GigabitEthernet0/0)

Link State ID: 2 (Interface ID)

Advertising Router: 10.3.3.3

LS Seq Number: 80000005

Checksum: 0x8578

Length: 56

Router Priority: 1

Link Local Address: FE80::5054:FF:FE00:3A

Number of Prefixes: 1

Prefix Address: FD01:ABAB::

Prefix Length: 64, Options: None

Da der Stub-Router zu einer Totally-Stub Area gehört, sendet der ABR1-Router nur die Standardroute an den Stub Router.

Stub_Router#show ipv6 route

IPv6 Routing Table - default - 5 entries

Codes: C - Connected, L - Local, S - Static, U - Per-user Static route

B - BGP, HA - Home Agent, MR - Mobile Router, R - RIP

H - NHRP, I1 - ISIS L1, I2 - ISIS L2, IA - ISIS interarea

IS - ISIS summary, D - EIGRP, EX - EIGRP external, NM - NEMO

ND - ND Default, NDp - ND Prefix, DCE - Destination, NDr - Redirect

RL - RPL, O - OSPF Intra, OI - OSPF Inter, OE1 - OSPF ext 1

OE2 - OSPF ext 2, ON1 - OSPF NSSA ext 1, ON2 - OSPF NSSA ext 2

la - LISP alt, lr - LISP site-registrations, ld - LISP dyn-eid

lA - LISP away, a - Application

OI ::/0 [110/2] via FE80::5054:FF:FE00:15, GigabitEthernet0/0

C   FD01:ABAB::/64 [0/0]

via GigabitEthernet0/0, directly connected

L   FD01:ABAB::5054:FF:FE00:3A/128 [0/0]

via GigabitEthernet0/0, receive

O   FD02:ABAB::/64 [110/2]

via FE80::5054:FF:FE00:15, GigabitEthernet0/0

L   FF00::/8 [0/0]

via Null0, receive

Der ABR1-Router ist der Area Border Router.

ABR1#show ipv6 ospf

Routing Process "ospfv3 1" with ID 10.1.1.1

Supports NSSA (compatible with RFC 3101)

Supports Database Exchange Summary List Optimization (RFC 5243)

Event-log enabled, Maximum number of events: 1000, Mode: cyclic

It is an area border router

Router is not originating router-LSAs with maximum metric

Initial SPF schedule delay 50 msecs

Minimum hold time between two consecutive SPFs 200 msecs

Maximum wait time between two consecutive SPFs 5000 msecs

Initial LSA throttle delay 50 msecs

Minimum hold time for LSA throttle 200 msecs

Maximum wait time for LSA throttle 5000 msecs

Minimum LSA arrival 100 msecs

LSA group pacing timer 240 secs

Interface flood pacing timer 33 msecs

Retransmission pacing timer 66 msecs

Retransmission limit dc 24 non-dc 24

EXCHANGE/LOADING adjacency limit: initial 300, process maximum 300

Number of external LSA 2. Checksum Sum 0x011699

Number of areas in this router is 2. 1 normal 1 stub 0 nssa

Graceful restart helper support enabled

Reference bandwidth unit is 100 mbps

RFC1583 compatibility enabled

Area BACKBONE(0)

Number of interfaces in this area is 1

SPF algorithm executed 17 times

Number of LSA 8. Checksum Sum 0x05579B

Number of DCbitless LSA 0

Number of indication LSA 0

Number of DoNotAge LSA 0

Flood list length 0

Area 2

Number of interfaces in this area is 1

It is a stub area, no summary LSA in this area

Generates stub default route with cost 1

SPF algorithm executed 20 times

Number of LSA 7. Checksum Sum 0x0380EA

Number of DCbitless LSA 0

Number of indication LSA 0

Number of DoNotAge LSA 0

Flood list length 0

Der ABR1-Router empfängt externe Routen (RIP-Routen) vom ASBR-Router.

ABR1#show ipv6 route

IPv6 Routing Table - default - 8 entries

Codes: C - Connected, L - Local, S - Static, U - Per-user Static route

B - BGP, R - RIP, H - NHRP, I1 - ISIS L1

I2 - ISIS L2, IA - ISIS interarea, IS - ISIS summary, D - EIGRP

EX - EIGRP external, ND - ND Default, NDp - ND Prefix, DCE - Destination

NDr - Redirect, RL - RPL, O - OSPF Intra, OI - OSPF Inter

OE1 - OSPF ext 1, OE2 - OSPF ext 2, ON1 - OSPF NSSA ext 1

ON2 - OSPF NSSA ext 2, la - LISP alt, lr - LISP site-registrations

ld - LISP dyn-eid, lA - LISP away, le - LISP extranet-policy

lp - LISP publications, a - Application, m - OMP

O   FD01:ABAB::/64 [110/2]

via FE80::5054:FF:FE00:3A, GigabitEthernet2

C   FD02:ABAB::/64 [0/0]

via GigabitEthernet2, directly connected

L   FD02:ABAB::5054:FF:FE00:15/128 [0/0]

via GigabitEthernet2, receive

C   FD03::/124 [0/0]

via GigabitEthernet1, directly connected

L   FD03::1/128 [0/0]

via GigabitEthernet1, receive

OE1 FD03::1:0/124 [110/26] via FE80::5054:FF:FE00:3E, GigabitEthernet1 OE1 FD04:ABAB::/64 [110/26] via FE80::5054:FF:FE00:3E, GigabitEthernet1

L   FF00::/8 [0/0]

via Null0, receive

Der ASBR-Router ist der autonome System Boundary Router für das Netzwerk. Er ist über eine serielle 0/0-Schnittstelle mit dem RIP-Netzwerk verbunden.

ASBR#show ipv6 ospf

Routing Process "ospfv3 1" with ID 10.2.2.2

Supports NSSA (compatible with RFC 3101)

Supports Database Exchange Summary List Optimization (RFC 5243)

Event-log enabled, Maximum number of events: 1000, Mode: cyclic

It is an autonomous system boundary router

Redistributing External Routes (with default metric 25) from,

rip EXT with metric-type 1 include-connected

Router is not originating router-LSAs with maximum metric

Initial SPF schedule delay 50 msecs

Minimum hold time between two consecutive SPFs 200 msecs

Maximum wait time between two consecutive SPFs 5000 msecs

Initial LSA throttle delay 50 msecs

Minimum hold time for LSA throttle 200 msecs

Maximum wait time for LSA throttle 5000 msecs

Minimum LSA arrival 100 msecs

LSA group pacing timer 240 secs

Interface flood pacing timer 33 msecs

Retransmission pacing timer 66 msecs

Retransmission limit dc 24 non-dc 24

EXCHANGE/LOADING adjacency limit: initial 300, process maximum 300

Number of external LSA 2. Checksum Sum 0x011699

Number of areas in this router is 1. 1 normal 0 stub 0 nssa

Graceful restart helper support enabled

Reference bandwidth unit is 100 mbps

RFC1583 compatibility enabled

Area BACKBONE(0)

Number of interfaces in this area is 1

SPF algorithm executed 10 times

Number of LSA 8. Checksum Sum 0x05579B

Number of DCbitless LSA 0

Number of indication LSA 0

Number of DoNotAge LSA 0

Flood list length 0

ASBR#show ipv6 rip

RIP process "EXT", port 521, multicast-group FF02::9, pid 678

Administrative distance is 120. Maximum paths is 16

Updates every 30 seconds, expire after 180

Holddown lasts 0 seconds, garbage collect after 120

Split horizon is on; poison reverse is off

Default routes are not generated

Periodic updates 267, trigger updates 11

Full Advertisement 1, Delayed Events 0

Interfaces:

GigabitEthernet2

Redistribution:

Redistributing protocol ospf 1 with transparent metric (internal, external 1 & 2, ) include-connected

Fehlerbehebung

Verwenden Sie diesen Abschnitt, um Probleme mit Ihrer Konfiguration zu beheben.

Hinweis: Lesen Sie vor der Verwendung von Debug-Befehlen wichtige Informationen zu Debug-Befehlen.

debug ipv6

Sobald OSPFv3 auf dem Stub-Router aktiviert ist, sendet dieser OSPFv3 Typ-1-Hello-Nachrichten an die FF02:5-Multicast-Adresse. Sobald er Hello-Pakete vom ABR1-Router empfängt, handelt er die primäre/sekundäre Beziehung aus und sendet dann DBD-Pakete.

Stub_Router#debug ipv6 ospf events

Stub_Router#debug ipv6 ospf packet

Stub_Router#debug ipv6 ospf adj

*Mar  8 17:47:01.324: OSPFv3-1-IPv6 PAK  : Gi0/0: OUT: FE80::5054:FF:FE00:3A->FF02::5: ver:3 type:1 len:36 rid:10.3.3.3 area:0.0.0.2 chksum:A0F9 inst:0

*Mar  8 17:47:03.307: OSPFv3-1-IPv6 PAK  : Gi0/0:  IN: FE80::5054:FF:FE00:15->FF02::5: ver:3 type:1 len:36 rid:10.1.1.1 area:0.0.0.2 chksum:A31C inst:0

*Mar  8 17:47:03.308: OSPFv3-1-IPv6 ADJ   Gi0/0: Added 10.1.1.1 to nbr list

*Mar  8 17:47:03.308: OSPFv3-1-IPv6 PAK  : Gi0/0: OUT: FE80::5054:FF:FE00:3A->FE80::5054:FF:FE00:15: ver:3 type:1 len:40 rid:10.3.3.3 area:0.0.0.2 chksum:470D inst:0

*Mar  8 17:47:03.320: OSPFv3-1-IPv6 PAK  : Gi0/0:  IN: FE80::5054:FF:FE00:15->FE80::5054:FF:FE00:3A: ver:3 type:1 len:40 rid:10.1.1.1 area:0.0.0.2 chksum:4707 inst:0

*Mar  8 17:47:03.321: OSPFv3-1-IPv6 ADJ   Gi0/0: 2 Way Communication to 10.1.1.1, state 2WAY

*Mar  8 17:47:03.321: OSPFv3-1-IPv6 ADJ   Gi0/0: Nbr 10.1.1.1: Prepare dbase exchange

*Mar  8 17:47:03.322: OSPFv3-1-IPv6 ADJ   Gi0/0: Send DBD to 10.1.1.1 seq 0x983C9C0 opt 0x11 flag 0x7 len 28

*Mar  8 17:47:03.322: OSPFv3-1-IPv6 PAK  : Gi0/0: OUT: FE80::5054:FF:FE00:3A->FE80::5054:FF:FE00:15: ver:3 type:2 len:28 rid:10.3.3.3 area:0.0.0.2 chksum:7A33 inst:0

*Mar  8 17:47:03.328: OSPFv3-1-IPv6 PAK  : Gi0/0:  IN: FE80::5054:FF:FE00:15->FE80::5054:FF:FE00:3A: ver:3 type:2 len:148 rid:10.1.1.1 area:0.0.0.2 chksum:141A inst:0

*Mar  8 17:47:03.329: OSPFv3-1-IPv6 ADJ   Gi0/0: Rcv DBD from 10.1.1.1 seq 0x983C9C0 opt 0x11 flag 0x2 len 148 mtu 1500 state EXSTART

*Mar  8 17:47:03.330: OSPFv3-1-IPv6 ADJ   Gi0/0: NBR Negotiation Done. We are the MASTER

*Mar  8 17:47:03.330: OSPFv3-1-IPv6 ADJ   Gi0/0: Nbr 10.1.1.1: Summary list built, size 7

*Mar  8 17:47:03.331: OSPFv3-1-IPv6 ADJ   Gi0/0: Send DBD to 10.1.1.1 seq 0x983C9C1 opt 0x11 flag 0x1 len 128

*Mar  8 17:47:03.331: OSPFv3-1-IPv6 PAK  : Gi0/0: OUT: FE80::5054:FF:FE00:3A->FE80::5054:FF:FE00:15: ver:3 type:2 len:128 rid:10.3.3.3 area:0.0.0.2 chksum:F771 inst:0

*Mar  8 17:47:03.334: OSPFv3-1-IPv6 PAK  : Gi0/0:  IN: FE80::5054:FF:FE00:15->FE80::5054:FF:FE00:3A: ver:3 type:3 len:64 rid:10.1.1.1 area:0.0.0.2 chksum:C6FA inst:0

*Mar  8 17:47:03.335: OSPFv3-1-IPv6 PAK  : Gi0/0:  IN: FE80::5054:FF:FE00:15->FE80::5054:FF:FE00:3A: ver:3 type:2 len:28 rid:10.1.1.1 area:0.0.0.2 chksum:7C3D inst:0

Nach dem Austausch der DBD-Pakete senden die Router Link-State Request (LS REQ)- und Link-State Update (LS UPD)-Nachrichten zum Erstellen ihrer LSDB. Nach aufeinander folgenden LS REQ- und LS UPD-Nachrichten und wenn der Status "FULL" erreicht, tauschen die Router weiterhin Hello-Pakete aus.

Stub_Router#

*Mar  8 17:47:03.337: OSPFv3-1-IPv6 ADJ   Gi0/0: Rcv LS REQ from 10.1.1.1 length 64 LSA count 4

*Mar  8 17:47:03.337: OSPFv3-1-IPv6 ADJ   Gi0/0: Send LS UPD to FE80::5054:FF:FE00:15 length 172 LSA count 4

*Mar  8 17:47:03.338: OSPFv3-1-IPv6 PAK  : Gi0/0: OUT: FE80::5054:FF:FE00:3A->FE80::5054:FF:FE00:15: ver:3 type:4 len:172 rid:10.3.3.3 area:0.0.0.2 chksum:D2CE inst:0

*Mar  8 17:47:03.339: OSPFv3-1-IPv6 ADJ   Gi0/0: Rcv DBD from 10.1.1.1 seq 0x983C9C1 opt 0x11 flag 0x0 len 28 mtu 1500 state EXCHANGE

*Mar  8 17:47:03.339: OSPFv3-1-IPv6 ADJ   Gi0/0: Exchange Done with 10.1.1.1 *Mar  8 17:47:03.340: OSPFv3-1-IPv6 ADJ   Gi0/0: Send LS REQ to 10.1.1.1 length 40

*Mar  8 17:47:03.340: OSPFv3-1-IPv6 PAK  : Gi0/0: OUT: FE80::5054:FF:FE00:3A->FE80::5054:FF:FE00:15: ver:3 type:3 len:40 rid:10.3.3.3 area:0.0.0.2 chksum:FD46 inst:0

*Mar  8 17:47:03.343: OSPFv3-1-IPv6 PAK  : Gi0/0:  IN: FE80::5054:FF:FE00:15->FE80::5054:FF:FE00:3A: ver:3 type:4 len:72 rid:10.1.1.1 area:0.0.0.2 chksum:825E inst:0

*Mar  8 17:47:03.345: OSPFv3-1-IPv6 ADJ   Gi0/0: Rcv LS UPD from Nbr ID 10.1.1.1 length 72 LSA count 2

*Mar  8 17:47:03.345: OSPFv3-1-IPv6 ADJ   Gi0/0: Synchronized with 10.1.1.1, state FULL

*Mar  8 17:47:03.346: %OSPFv3-5-ADJCHG: Process 1, Nbr 10.1.1.1 on GigabitEthernet0/0 from LOADING to FULL, Loading Done

Zugehörige Informationen

- Technologische Unterstützung für IP Version 6 (IPv6)

- OSPF-Technologie-Support (Open Shortest Path First)

- Technischer Support und Downloads von Cisco