Inhalt

Einführung

Voraussetzungen

Anforderungen

Verwendete Komponenten

Konventionen

Hintergrundinformationen

Konfiguration

Netzwerkdiagramm

Konfigurationen

Überprüfung

Fehlerbehebung

Befehle zur Fehlerbehebung

Zugehörige Informationen

Einführung

Dieses Dokument zeigt eine grundlegende Konfiguration der Cisco IOS® Firewall mit Network Address Translation (NAT). Diese Konfiguration ermöglicht die Initiierung des Datenverkehrs aus den Netzwerken 10.1.1.x und 172.16.1.x ins Internet und NATed während des Vorgangs. Dem Tunnel-IP- und IPX-Datenverkehr zwischen zwei privaten Netzwerken wird ein Generic Routing Encapsulation (GRE)-Tunnel hinzugefügt. Wenn ein Paket an der ausgehenden Schnittstelle des Routers eingeht und über den Tunnel gesendet wird, wird es zuerst mithilfe der GRE gekapselt und dann mit IPsec verschlüsselt. Anders ausgedrückt: Der Datenverkehr, der in den GRE-Tunnel geleitet werden darf, wird ebenfalls über IPsec verschlüsselt.

Informationen zur Konfiguration des GRE-Tunnels über IPsec mit Open Shortest Path First (OSPF) finden Sie unter Konfigurieren eines GRE-Tunnels über IPSec mit OSPF.

Informationen zum Konfigurieren eines Hub-and-Spoke-IPsec-Designs zwischen drei Routern finden Sie unter Konfigurieren von IPsec-Router-zu-Router-Hub and Spoke mit der Kommunikation zwischen den Spokes.

Voraussetzungen

Anforderungen

Es gibt keine spezifischen Anforderungen für dieses Dokument.

Verwendete Komponenten

Die Informationen in diesem Dokument basierend auf folgenden Software- und Hardware-Versionen:

- Cisco IOS Softwareversion 12.2(21a) und 12.3(5a)

- Cisco 3725 und 3640

Die Informationen in diesem Dokument beziehen sich auf Geräte in einer speziell eingerichteten Testumgebung. Alle Geräte, die in diesem Dokument benutzt wurden, begannen mit einer gelöschten (Nichterfüllungs) Konfiguration. Wenn Ihr Netz Live ist, überprüfen Sie, ob Sie die mögliche Auswirkung jedes möglichen Befehls verstehen.

Konventionen

Weitere Informationen zu Dokumentkonventionen finden Sie unter Cisco Technical Tips Conventions (Technische Tipps von Cisco zu Konventionen).

Hintergrundinformationen

Die Tipps in diesem Abschnitt helfen Ihnen, die Konfiguration zu implementieren:

- Implementieren Sie NAT auf beiden Routern, um die Internetverbindung zu testen.

- Fügen Sie GRE zur Konfiguration und zum Test hinzu. Nicht verschlüsselter Datenverkehr sollte zwischen den privaten Netzwerken fließen.

- Fügen Sie der Konfiguration und dem Test IPsec hinzu. Der Datenverkehr zwischen den privaten Netzwerken sollte verschlüsselt werden.

- Fügen Sie die Cisco IOS Firewall zu den externen Schnittstellen, der Liste der ausgehenden Überprüfungen und der Liste der eingehenden Zugriffe hinzu, und testen Sie.

- Wenn Sie eine Cisco IOS Software-Version vor 12.1.4 verwenden, müssen Sie IP-Datenverkehr zwischen 172.16.1.x und - 10.0.0.0 in der Zugriffsliste 103 zulassen. Weitere Informationen finden Sie unter Cisco Bug ID CSCdu58486 (nur registrierte Kunden) und Cisco Bug ID CSCdm01118 (nur registrierte Kunden).

Konfiguration

In diesem Abschnitt erfahren Sie, wie Sie die in diesem Dokument beschriebenen Funktionen konfigurieren können.

Hinweis: Verwenden Sie das Command Lookup Tool (nur registrierte Kunden), um weitere Informationen zu den in diesem Dokument verwendeten Befehlen zu erhalten.

Hinweis: Die in dieser Konfiguration verwendeten IP-Adressierungsschemata sind im Internet nicht rechtlich routbar. Es handelt sich um RFC 1918-Adressen, die in einer Laborumgebung verwendet wurden.

Netzwerkdiagramm

In diesem Dokument wird diese Netzwerkeinrichtung verwendet.

Konfigurationen

In diesem Dokument werden diese Konfigurationen verwendet.

- DAPHNE-Konfiguration

- Konfiguration des Lüfters

DAPHNE-Konfiguration

version 12.3

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname daphne

!

boot-start-marker

boot-end-marker

!

enable secret 5 $1$r2sh$XKZR118vcId11ZGzhbz5C/

!

no aaa new-model

ip subnet-zero

!

!

!--- This is the Cisco IOS Firewall configuration and what to inspect. !--- This is applied outbound on the external interface.

ip inspect name myfw tcp

ip inspect name myfw udp

ip inspect name myfw ftp

ip inspect name myfw realaudio

ip inspect name myfw smtp

ip inspect name myfw streamworks

ip inspect name myfw vdolive

ip inspect name myfw tftp

ip inspect name myfw rcmd

ip inspect name myfw http

ip telnet source-interface FastEthernet0/0

!

ip audit notify log

ip audit po max-events 100

no ftp-server write-enable

!

!--- This is the IPsec configuration.

!

crypto isakmp policy 10

authentication pre-share

crypto isakmp key ciscokey address 192.168.2.2

!

!

crypto ipsec transform-set to_fred esp-des esp-md5-hmac

!

crypto map myvpn 10 ipsec-isakmp

set peer 192.168.2.2

set transform-set to_fred

match address 101

!

!

!

!

!

!--- This is one end of the GRE tunnel.

!

interface Tunnel0

ip address 192.168.3.1 255.255.255.0

!--- Associate the tunnel with the physical interface.

tunnel source FastEthernet0/1

tunnel destination 192.168.2.2

!--- This is the internal network.

interface FastEthernet0/0

ip address 10.0.0.2 255.255.255.0

ip nat inside

speed 100

full-duplex

!

!--- This is the external interface and one end of the GRE tunnel.

interface FastEthernet0/1

ip address 192.168.1.1 255.255.255.0

ip access-group 103 in

ip nat outside

ip inspect myfw out

speed 100

full-duplex

crypto map myvpn

!

!--- Define the NAT pool.

ip nat pool ourpool 192.168.1.10 192.168.1.20 netmask 255.255.255.0

ip nat inside source route-map nonat pool ourpool overload

ip classless

ip route 0.0.0.0 0.0.0.0 192.168.1.2

!--- Force the private network traffic into the tunnel.

-

ip route 172.16.1.0 255.255.255.0 192.168.3.2

ip http server

no ip http secure-server

!

!

!--- All traffic that enters the GRE tunnel is encrypted by IPsec. !--- Other ACE statements are not necessary.

access-list 101 permit gre host 192.168.1.1 host 192.168.2.2

!--- Access list for security reasons. Allow !--- IPsec and GRE traffic between the private networks.

access-list 103 permit gre host 192.168.2.2 host 192.168.1.1

access-list 103 permit esp host 192.168.2.2 host 192.168.1.1

access-list 103 permit udp host 192.168.2.2 eq isakmp host 192.168.1.1

access-list 103 deny   ip any any log

!--- See the Background Information section if you use !--- a Cisco IOS Software release earlier than 12.1.4 for access list 103.

access-list 175 deny   ip 10.0.0.0 0.0.0.255 172.16.1.0 0.0.0.255

access-list 175 permit ip 10.0.0.0 0.0.0.255 any

!--- Use access list in route-map to address what to NAT.

route-map nonat permit 10

match ip address 175

!

!

!

line con 0

exec-timeout 0 0

line aux 0

line vty 0 4

password ww

login

!

!

end

Konfiguration des Lüfters

version 12.2

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname fred

!

enable secret 5 $1$AtxD$MycLGaJvF/tAIFXkikCes1

!

ip subnet-zero

!

!

ip telnet source-interface FastEthernet0/0

!

ip inspect name myfw tcp

ip inspect name myfw udp

ip inspect name myfw ftp

ip inspect name myfw realaudio

ip inspect name myfw smtp

ip inspect name myfw streamworks

ip inspect name myfw vdolive

ip inspect name myfw tftp

ip inspect name myfw rcmd

ip inspect name myfw http

ip audit notify log

ip audit po max-events 100

!

crypto isakmp policy 10

authentication pre-share

-

crypto isakmp key ciscokey address 192.168.1.1

!

!

crypto ipsec transform-set to_daphne esp-des esp-md5-hmac

!

crypto map myvpn 10 ipsec-isakmp

set peer 192.168.1.1

set transform-set to_daphne

match address 101

!

call rsvp-sync

!

!

!

!

!

!

!

!

interface Tunnel0

-

ip address 192.168.3.2 255.255.255.0

tunnel source FastEthernet0/1

-

tunnel destination 192.168.1.1

!

interface FastEthernet0/0

ip address 172.16.1.1 255.255.255.0

ip nat inside

speed 100

full-duplex

!

interface Serial0/0

no ip address

clockrate 2000000

!

interface FastEthernet0/1

ip address 192.168.2.2 255.255.255.0

ip access-group 103 in

ip nat outside

ip inspect myfw out

speed 100

full-duplex

crypto map myvpn

!

!--- Output is supressed.

!

ip nat pool ourpool 192.168.2.10 192.168.2.20 netmask 255.255.255.0

ip nat inside source route-map nonat pool ourpool overload

ip classless

ip route 0.0.0.0 0.0.0.0 192.168.2.1

ip route 10.0.0.0 255.255.255.0 192.168.3.1

ip http server

!

access-list 101 permit gre host 192.168.2.2 host 192.168.1.1

access-list 103 permit gre host 192.168.1.1 host 192.168.2.2

access-list 103 permit udp host 192.168.1.1 eq isakmp host 192.168.2.2

access-list 103 permit esp host 192.168.1.1 host 192.168.2.2

access-list 175 deny   ip 172.16.1.0 0.0.0.255 10.0.0.0 0.0.0.255

access-list 175 permit ip 172.16.1.0 0.0.0.255 any

route-map nonat permit 10

match ip address 175

!

!

!

dial-peer cor custom

!

!

!

!

!

line con 0

exec-timeout 0 0

line aux 0

line vty 0 4

password ww

login

!

end

Überprüfung

In diesem Abschnitt überprüfen Sie, ob Ihre Konfiguration ordnungsgemäß funktioniert.

Das Output Interpreter Tool (nur registrierte Kunden) (OIT) unterstützt bestimmte show-Befehle. Verwenden Sie das OIT, um eine Analyse der Ausgabe des Befehls show anzuzeigen.

Versuchen Sie, von einem Host im Netzwerk 172.16.1.x einen Ping an den Host im Remote-Subnetz 10.0.0.x zu senden, um die VPN-Konfiguration zu überprüfen. Dieser Datenverkehr sollte den GRE-Tunnel durchlaufen und verschlüsselt werden.

Verwenden Sie den Befehl show crypto ipsec sa, um zu überprüfen, ob der IPsec-Tunnel aktiv ist. Überprüfen Sie zuerst, ob die SPI-Nummern größer als 0 sind. Außerdem sollte die Anzahl der Zähler für die Verschlüsselung von Paketen und die Entschlüsselung von Paketen zunehmen.

- show crypto ipsec sa - Überprüft, ob der IPsec-Tunnel aktiv ist.

- show access-lists 103 - Überprüft, ob die Konfiguration der Cisco IOS Firewall ordnungsgemäß funktioniert.

- show ip nat translations - Überprüft, ob NAT ordnungsgemäß funktioniert.

fred#show crypto ipsec sa

interface: FastEthernet0/1

Crypto map tag: myvpn, local addr. 192.168.2.2

local  ident (addr/mask/prot/port): (192.168.2.2/255.255.255.255/47/0)

remote ident (addr/mask/prot/port): (192.168.1.1/255.255.255.255/47/0)

current_peer: 192.168.1.1

PERMIT, flags={transport_parent,}

#pkts encaps: 0, #pkts encrypt: 0, #pkts digest 0

#pkts decaps: 0, #pkts decrypt: 0, #pkts verify 0

#pkts compressed: 0, #pkts decompressed: 0

#pkts not compressed: 0, #pkts compr. failed: 0, #pkts decompress failed: 0

#send errors 0, #recv errors 0

-

local crypto endpt.: 192.168.2.2, remote crypto endpt.: 192.168.1.1

path mtu 1500, media mtu 1500

current outbound spi: 0

inbound esp sas:

inbound ah sas:

inbound pcp sas:

outbound esp sas:

outbound ah sas:

outbound pcp sas:

-

local  ident (addr/mask/prot/port): (192.168.2.2/255.255.255.255/0/0)

remote ident (addr/mask/prot/port): (192.168.1.1/255.255.255.255/0/0)

current_peer: 192.168.1.1

PERMIT, flags={origin_is_acl,parent_is_transport,}

#pkts encaps: 42, #pkts encrypt: 42, #pkts digest 42

#pkts decaps: 39, #pkts decrypt: 39, #pkts verify 39

#pkts compressed: 0, #pkts decompressed: 0

#pkts not compressed: 0, #pkts compr. failed: 0, #pkts decompress failed: 0

#send errors 2, #recv errors 0

local crypto endpt.: 192.168.2.2, remote crypto endpt.: 192.168.1.1

path mtu 1500, media mtu 1500

current outbound spi: 3C371F6D

inbound esp sas:

spi: 0xF06835A9(4033361321)

transform: esp-des esp-md5-hmac ,

in use settings ={Tunnel, }

slot: 0, conn id: 940, flow_id: 1, crypto map: myvpn

sa timing: remaining key lifetime (k/sec): (4607998/2559)

IV size: 8 bytes

replay detection support: Y

inbound ah sas:

inbound pcp sas:

outbound esp sas:

spi: 0x3C371F6D(1010245485)

transform: esp-des esp-md5-hmac ,

in use settings ={Tunnel, }

slot: 0, conn id: 941, flow_id: 2, crypto map: myvpn

sa timing: remaining key lifetime (k/sec): (4607998/2559)

IV size: 8 bytes

replay detection support: Y

outbound ah sas:

outbound pcp sas:

Führen Sie zuerst diesen Befehl aus, um zu überprüfen, ob die Konfiguration der Cisco IOS Firewall ordnungsgemäß funktioniert.

fred#show access-lists 103

Extended IP access list 103

permit gre host 192.168.1.1 host 192.168.2.2 (4 matches)

permit udp host 192.168.1.1 eq isakmp host 192.168.2.2 (4 matches)

permit esp host 192.168.1.1 host 192.168.2.2 (4 matches)

Versuchen Sie dann von einem Host im Netzwerk 172.16.1.x zu Telnet zu einem Remotehost im Internet. Sie können zunächst überprüfen, ob NAT ordnungsgemäß funktioniert. Die lokale Adresse 172.16.1.2 wurde in 192.168.2.10 übersetzt.

fred#show ip nat translations

Pro Inside global       Inside local       Outside local      Outside global

tcp 192.168.2.10:11006  172.16.1.2:11006   192.168.2.1:23     192.168.2.1:23

Wenn Sie die Zugriffsliste erneut überprüfen, sehen Sie, dass eine zusätzliche Zeile dynamisch hinzugefügt wird.

fred#show access-lists 103

Extended IP access list 103

permit tcp host 192.168.2.1 eq telnet host 192.168.2.10 eq 11006 (11 matches)

permit gre host 192.168.1.1 host 192.168.2.2 (4 matches)

permit udp host 192.168.1.1 eq isakmp host 192.168.2.2 (4 matches)

permit esp host 192.168.1.1 host 192.168.2.2 (4 matches)

Fehlerbehebung

In diesem Abschnitt finden Sie Informationen zur Behebung von Fehlern in Ihrer Konfiguration.

Befehle zur Fehlerbehebung

Das Output Interpreter Tool (nur registrierte Kunden) (OIT) unterstützt bestimmte show-Befehle. Verwenden Sie das OIT, um eine Analyse der Ausgabe des Befehls show anzuzeigen.

Hinweis: Beachten Sie vor der Verwendung von Debug-Befehlen die Informationen zu Debug-Befehlen.

NAT:

- debug ip nat access-list number: Zeigt Informationen über IP-Pakete an, die durch die IP NAT-Funktion übersetzt wurden.

IPSec:

- debug crypto ipsec: Zeigt IPsec-Ereignisse an.

- debug crypto isakmp: Zeigt Meldungen über IKE-Ereignisse (Internet Key Exchange) an.

- debug crypto engine: Zeigt Informationen vom Crypto Engine an.

CBAC:

- debug ip inspect {protocol | detail}: Zeigt Meldungen über Cisco IOS Firewall-Ereignisse an.

Zugriffslisten:

- debug ip packet (ohne ip route-cache auf der Schnittstelle): Zeigt allgemeine IP-Debugging-Informationen und IPSO-Sicherheitstransaktionen (IP-Sicherheitsoption) an.

daphne#show version

Cisco Internetwork Operating System Software

IOS (tm) 3700 Software (C3725-ADVSECURITYK9-M), Version 12.3(5a), RELEASE SOFTWARE (fc1)

Copyright (c) 1986-2003 by cisco Systems, Inc.

Compiled Mon 24-Nov-03 20:36 by kellythw

Image text-base: 0x60008AF4, data-base: 0x613C6000

ROM: System Bootstrap, Version 12.2(8r)T2, RELEASE SOFTWARE (fc1)

daphne uptime is 6 days, 19 hours, 39 minutes

System returned to ROM by reload

System image file is "flash:c3725-advsecurityk9-mz.123-5a.bin"

This product contains cryptographic features and is subject to United

States and local country laws governing import, export, transfer and

use. Delivery of Cisco cryptographic products does not imply

third-party authority to import, export, distribute or use encryption.

Importers, exporters, distributors and users are responsible for

compliance with U.S. and local country laws. By using this product you

agree to comply with applicable laws and regulations. If you are unable

to comply with U.S. and local laws, return this product immediately.

A summary of U.S. laws governing Cisco cryptographic products may be found at:

http://www.cisco.com/wwl/export/crypto/tool/stqrg.html

If you require further assistance please contact us by sending email to

export@cisco.com.

cisco 3725 (R7000) processor (revision 0.1) with 196608K/65536K bytes of memory.

Processor board ID JHY0727K212

R7000 CPU at 240MHz, Implementation 39, Rev 3.3, 256KB L2 Cache

Bridging software.

X.25 software, Version 3.0.0.

2 FastEthernet/IEEE 802.3 interface(s)

1 Virtual Private Network (VPN) Module(s)

DRAM configuration is 64 bits wide with parity disabled.

55K bytes of non-volatile configuration memory.

125952K bytes of ATA System CompactFlash (Read/Write)

Configuration register is 0x2002

fred#show version

Cisco Internetwork Operating System Software

IOS (tm) 3600 Software (C3640-JK9O3S-M), Version 12.2(21a), RELEASE SOFTWARE (fc2)

Copyright (c) 1986-2004 by cisco Systems, Inc.

Compiled Fri 09-Jan-04 16:23 by kellmill

Image text-base: 0x60008930, data-base: 0x615DE000

ROM: System Bootstrap, Version 11.1(20)AA2, EARLY DEPLOYMENT RELEASE SOFTWARE (fc1)

fred uptime is 6 days, 19 hours, 36 minutes

System returned to ROM by reload

System image file is "flash:c3640-jk9o3s-mz.122-21a.bin"

This product contains cryptographic features and is subject to United

States and local country laws governing import, export, transfer and

use. Delivery of Cisco cryptographic products does not imply

third-party authority to import, export, distribute or use encryption.

Importers, exporters, distributors and users are responsible for

compliance with U.S. and local country laws. By using this product you

agree to comply with applicable laws and regulations. If you are unable

to comply with U.S. and local laws, return this product immediately.

A summary of U.S. laws governing Cisco cryptographic products may be found at:

http://www.cisco.com/wwl/export/crypto/tool/stqrg.html

If you require further assistance please contact us by sending email to

export@cisco.com.

cisco 3640 (R4700) processor (revision 0x00) with 124928K/6144K bytes of memory.

Processor board ID 25120505

R4700 CPU at 100Mhz, Implementation 33, Rev 1.0

Bridging software.

X.25 software, Version 3.0.0.

SuperLAT software (copyright 1990 by Meridian Technology Corp).

TN3270 Emulation software.

2 FastEthernet/IEEE 802.3 interface(s)

4 Serial network interface(s)

4 Serial(sync/async) network interface(s)

1 Virtual Private Network (VPN) Module(s)

DRAM configuration is 64 bits wide with parity disabled.

125K bytes of non-volatile configuration memory.

32768K bytes of processor board System flash (Read/Write)

Configuration register is 0x2002

Hinweis: Wenn diese Konfiguration schrittweise implementiert wird, hängt der zu verwendende Befehl debug vom fehlerhaften Teil ab.

Zugehörige Informationen

- IPsec-Aushandlung/IKE-Protokolle

- Technischer Support und Dokumentation für Cisco Systeme