المحتويات

المقدمة

المتطلبات الأساسية

المتطلبات

المكونات المستخدمة

الاصطلاحات

معلومات أساسية

التكوين

الرسم التخطيطي للشبكة

التكوينات

التحقق من الصحة

أوامر show Catalyst 2948G-L3

أوامر show Catalyst 6500

استكشاف الأخطاء وإصلاحها

ملخص الأوامر

معلومات ذات صلة

المقدمة

يزود هذا وثيقة عينة تشكيل ل IEEE 802.1Q شنطة بين مادة حفازة 6500 sery مفتاح أن يركض مادة حفازة os (CatOS)، والمادة حفازة 2948g-l3 مفتاح. يحتوي هذا المستند على شبكة نموذجية تحتوي على محول Catalyst 2948G-L3 كمحول أساسي و Catalyst 6500 كمحول طبقة الوصول. بعد وصف موجز ال 802.1Q trunking آلية، التشكيل على المادة حفازة 6500 مفتاح ومادة حفازة 2948g-l3 مفتاح يصف.

المتطلبات الأساسية

المتطلبات

لا توجد متطلبات خاصة لهذا المستند.

المكونات المستخدمة

تستند المعلومات الواردة في هذا المستند إلى إصدارات البرامج والمكونات المادية التالية:

- مادة حفازة 2948g-l3 مفتاح مسحاج تخديد أن يركض cisco ios ® برمجية إطلاق 12.0(18)W5(22b)

- مادة حفازة 6500 sery مفتاح أن يركض CatOS 8،5 برمجية

الاصطلاحات

راجع اصطلاحات تلميحات Cisco التقنية للحصول على مزيد من المعلومات حول اصطلاحات المستندات.

معلومات أساسية

يحمل trunking حركة مرور من عدة VLANs عبر إرتباط من نقطة إلى نقطة بين الجهازين. هناك طريقتان للربط بين المحولات وهما بروتوكول الارتباط بين المحولات (ISL)، وهو بروتوكول خاص من Cisco، أو بروتوكول 802.1Q (معيار IEEE). يتناول هذا المستند بشكل خاص توصيل 802.1Q. في هذا مثال، VLANs في المادة حفازة 6500 مددت إلى مادة حفازة 2948g-l3 عن طريق 802.1Q شنطة خطوة.

مادة حفازة 2948g-l3 مسحاج تخديد أن يركض cisco ios، وكل قارن يتم توجيهها قارن افتراضيا. أنت ينبغي استعملت جسر مجموعة in order to استعملت المفهوم من VLANs على المادة حفازة 2948g-l3. كل جسر اعتبرت VLAN منفصل. تتوافق مجموعات الجسر هذه مع رقم شبكة VLAN الخاص بالمحول المتصل. من أجل دعم التوجيه بين شبكات VLAN على Catalyst 2948G-L3، يتم تكوين التوجيه والربط المدمج (IRB) وواجهات الجسر الظاهرية (BVIs) لتوجيه IP بين شبكات VLAN المختلفة.

لا يساند المادة حفازة 2948g-l3 عدة طبقة 2-direction بروتوكول، مثل فعلي انتهائية بروتوكول (VTP)، يوزع تشخيصات وخدمة شبكة (DDSN) نقل بروتوكول (DTP)، وميناء تراكم بروتوكول (PAgP). لا يدعم برنامج Catalyst 2948G-L3 Cisco IOS الإصدار 12.0(7)W5(15d) والإصدارات الأقدم التوصيل على الواجهات الفرعية 802.1Q.

وصل المادة حفازة 2948g-l3 إلى نهاية الحياة (EoL). راجع EoL / EoS للمحولات Cisco Catalyst 2948G-L3 و 4908G-L3 Switches للحصول على المعلومات والمنتجات البديلة الموصى بها.

التكوين

في هذا المثال، يتم نشر المادة حفازة 2948g-l3 كموجه بين شبكات VLAN. يركض مادة حفازة 6500 CatOS ويستخدم 802.1Q شنطة خطوة أن يربط إلى المادة حفازة 2948g-l3 مفتاح. شكلت مادة حفازة 6500 كمنفذ طبقة مفتاح أي يتلقى إثنان VLANs، 20 و 30. يتم توفير التوجيه بين شبكتي VLAN هاتين بواسطة Catalyst 2948G-L3. ال 802.1Q شنطة تشكيل بين المادة حفازة 6500 والمادة حفازة 2948g-l3، وال inter-VLAN تحشد تشكيل على المادة حفازة 2948g-l3 مفتاح، يصف في هذا وثيقة.

في هذا القسم، تُقدّم لك معلومات تكوين الميزات الموضحة في هذا المستند.

ملاحظة: أستخدم أداة بحث الأوامر (للعملاء المسجلين فقط) للحصول على مزيد من المعلومات حول الأوامر المستخدمة في هذا القسم.

الرسم التخطيطي للشبكة

يستخدم هذا المستند إعداد الشبكة التالي:

التكوينات

يستخدم هذا المستند التكوينات التالية:

- Catalyst 6500

- Catalyst 2948G-L3

Catalyst 6500

Current configuration:

!

version 8.1

!

hostname 6500

!

Catalyst 6500(enable)#

set vtp mode transparent

!--- In this example, the VTP mode is set to be transparent. !--- Set the VTP mode accordingly. This depends on your network.

!

#module 3 : 48-port 10/100BaseTX Ethernet

set vlan 20 3/20

set vlan 30 3/40

!--- The ports are assigned to the single VLAN and are !--- used as access ports.

set trunk 3/30 nonegotiate dot1q

!--- Port 3/30 is configured as dot1q trunk port and !--- the trunk mode is set to nonegotiate. !--- Trunk mode should be nonegotiate because 2948G-L3 does not support DTP.

set port enable 3/20,3/30,3/40

!--- Use the set port enable command !--- to enable a port or a range of ports.

!--- Output is suppressed.

Catalyst 2948G-L3

Current configuration:

!

version 12.0

hostname 2948G-L3

!

interface FastEthernet 20

no ip address

no ip directed-broadcast

bridge-group 20

!--- The bridge-group 20 command adds the !--- Fast Ethernet 20 interface to bridge group 20.

interface FastEthernet 40

no ip address

no ip directed-broadcast

bridge-group 30

!--- The bridge-group 30 command adds the !--- Fast Ethernet 40 interface to bridge group 30.

!

interface Fast Ethernet 30

no ip address

no ip redirects

no ip directed-broadcast

int fast ethernet 30.1

encapsulation dot1q 30

bride-group 30

exit

int fast ethernet 30.2

encapsulation dot1q 20

bridge-group 20

exit

int fast ethernet 30.3

encapsultion dot1q 1 native

bridge-group 1

exit

!--- Fast Ethernet 30 acts as a trunk port that carries VLANs 30 and 20. !--- Subinterfaces that belong to the same VLAN (network or subnet) must !--- be configured to belong to the same bridge group.

!--- VLAN 1 is the native VLAN by default.

bridge irb

!--- The bridge irb command enables IRB on !--- the router, which allows you to route traffic within the bridge groups.

bridge 30 protocol ieee

bridge 20 protocol ieee

!--- Choose IEEE as the Spanning Tree Protocol (STP).

bridge 30 route ip

bridge 20 route ip

!--- The bridge number route ip command allows you !--- to route IP traffic between the BVI interface !--- and the other IP interfaces on the router.

interface bvi 20

ip address 192.168.20.1 255.255.255.0

exit

interface bvi 30

ip address 192.168.30.1 255.255.255.0

exit

!--- Creates BVI interfaces for bridges 20 and 30. These interfaces act !--- as the gateway for VLANs 20 and 30.

!--- Output is suppressed.

ملاحظة: يجب أن تستخدم أربعة منافذ متجاورة على المادة حفازة 2948g-l3، مثل f1 through f4 أو f45 through f48، على واجهة 10/100، نفس عملية كبسلة VLAN. ال VLAN عملية كبسلة إما ISL أو 802.1Q.

التحقق من الصحة

استخدم هذا القسم لتأكيد عمل التكوين بشكل صحيح.

تدعم أداة مترجم الإخراج (للعملاءالمسجلين فقط) بعض أوامر show. استخدم أداة مترجم الإخراج (OIT) لعرض تحليل مُخرَج الأمر show .

أوامر show Catalyst 2948G-L3

- 2948G-L3#show vlan

virtual LAN ID:  30 (IEEE 802.1Q Encapsulation)

vLAN Trunk Interface:   FastEthernet30.1

This is configured as native Vlan for the following interface(s) :

FastEthernet30

Protocols Configured:   Address:              Received:        Transmitted:

Bridging        Bridge Group 20                 1                   0

Virtual LAN ID:  20 (IEEE 802.1Q Encapsulation)

vLAN Trunk Interface:   FastEthernet30.2

Protocols Configured:   Address:              Received:        Transmitted:

Bridging        Bridge Group 30               921                   0

- 2948G-L3#show bridge 20

Total of 300 station blocks, 298 free

Codes: P - permanent, S - self

Bridge Group 20:

Address       Action    Interface

0009.11b9.1a75    forward   Fa30.2

أوامر show Catalyst 6500

- show trunk— يتحقق هذا الأمر من تكوين خط الاتصال، كما هو موضح في هذا الإخراج:

Console> (enable) show trunk 3/30

* - indicates vtp domain mismatch

# - indicates dot1q-all-tagged enabled on the port

$ - indicates non-default dot1q-ethertype value

Port      Mode         Encapsulation  Status        Native vlan

--------  -----------  -------------  ------------  -----------

3/30     nonegotiate  dot1q          trunking      1

Port      Vlans allowed on trunk

--------  ---------------------------------------------------------------------

3/30     1-1005,1025-4094

Port      Vlans allowed and active in management domain

--------  ---------------------------------------------------------------------

3/30     1,20,30

- show vlan— يعرض هذا أمر الميناء أن يكون ربطت إلى VLANs يماثل:

VLAN Name                             Status    IfIndex Mod/Ports, Vlans

---- -------------------------------- --------- ------- ------------------------

1    default                          active    6       1/1-2

3/1-19,3/21-39,3/41-48

20   VLAN0020                         active    71      3/20

30   VLAN0030                         active    69      3/40

1002 fddi-default                     active    7

1003 token-ring-default               active    10

1004 fddinet-default                  active    8

1005 trnet-default                    active    9

استكشاف الأخطاء وإصلاحها

يوفر هذا القسم معلومات يمكنك استخدامها لاستكشاف أخطاء التكوين وإصلاحها.

تدعم أداة مترجم الإخراج (للعملاءالمسجلين فقط) بعض أوامر show. استخدم أداة مترجم الإخراج (OIT) لعرض تحليل مُخرَج الأمر show .

ملاحظة: ارجع إلى معلومات مهمة حول أوامر التصحيح قبل إستخدام أوامر debug.

PC2#ping 192.168.20.3

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 192.168.20.3, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/4/4 ms

PC1#ping 192.168.30.2

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 192.168.30.2, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/4/4 ms

PC1#ping 192.168.20.2

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 192.168.20.2, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/4/4 ms

ملخص الأوامر

- ضبط الواجهة

- خط اتصال مجموعة

- set vlan

- show interface

- show port

- show port capabilities

- show trunk

- show vtp domain

معلومات ذات صلة

- يشكل EtherChannel و 802.1Q trunking مع مادة حفازة 2948G-L3s و CatOS baser مفتاح

- 802.1Q trunking بين محولات Catalyst التي تشغل نظام التشغيل CatOS وبرنامج Cisco IOS System

- نموذج تكوينات Catalyst 2948G-L3

- دعم منتجات المحولات

- دعم تقنية تحويل شبكات LAN

- الدعم التقني والمستندات - Cisco Systems