المحتويات

المقدمة

المتطلبات الأساسية

المتطلبات

المكونات المستخدمة

الاصطلاحات

معلومات أساسية

عملية التكوين

مثال على التكوين والإخراج

معلومات ذات صلة

المقدمة

يصف هذا وثيقة كيف أن يسترد كلمة مرور مفقود على مادة حفازة 4500/4900 مفتاح أن يتلقى مشرف محرك أن يركض cisco ios ® برمجية.

المتطلبات الأساسية

المتطلبات

لا توجد متطلبات خاصة لهذا المستند.

المكونات المستخدمة

لا يقتصر هذا المستند على إصدارات برامج ومكونات مادية معينة.

تم إنشاء المعلومات الواردة في هذا المستند من الأجهزة الموجودة في بيئة معملية خاصة. بدأت جميع الأجهزة المُستخدمة في هذا المستند بتكوين ممسوح (افتراضي). إذا كانت شبكتك قيد التشغيل، فتأكد من فهمك للتأثير المحتمل لأي أمر.

الاصطلاحات

راجع اصطلاحات تلميحات Cisco التقنية للحصول على مزيد من المعلومات حول اصطلاحات المستندات.

معلومات أساسية

ملاحظة: في محولات Catalyst 4500/4000 Series Switches، تدعم محركات المشرف II+ و II+10GE و II+TS و III و IV و V و V-10GE فقط برنامج Cisco IOS ومحركات المشرف I و II برنامج Catalyst OS. أحلت in order to إستردت الكلمة على المشرف محرك i أو II، كلمة إستعادة إجراء للمادة حفازة أن يركض CatOS.

يوضح هذا المستند كيفية إستعادة كلمة مرور مفقودة أو غير معروفة على محول Catalyst 4500/4000 مع محرك مشرف II-Plus (WS-X4013+)، محرك المشرف II-Plus-TS (WS-X4013+TS)، محرك المشرف II-Plus-10GE (WS-X4013+10GE)، Supervisor Engine III (WS-X4014)، Supervisor Engine IV (WS-X4515)، مشرف محرك v (WS-X4516)، مشرف محرك v-10GE (WS-X4516-10GE) وحدة نمطية، cisco مادة حفازة 4948، cisco مادة حفازة 4948 10GE، و cisco مادة حفازة 4900m مفتاح.

عملية التكوين

أن يسترد كلمة مرورك على المادة حفازة 4500/4900 مفتاح:

ملاحظة: تأكد من حصولك على وصول فعلي إلى المحول ومن إستخدام وصول وحدة التحكم إلى وحدة Supervisor Engine (محرك المشرف) أثناء تنفيذ هذه الخطوات. للحصول على تفاصيل حول اتصال وحدة تحكم المحول، ارجع إلى توصيل مودم بمنفذ وحدة التحكم في محولات Catalyst.

تلميح: لا يتم فقد تكوين المحول إذا تم اتباع الإجراء كما هو مذكور. كأفضل ممارسة، توصي Cisco بأن يكون لديك نسخة إحتياطية من تكوين جميع أجهزة Cisco في خادم TFTP أو خادم إدارة شبكة.

1. قم بدورة طاقة الجهاز.

من أجل دورة الطاقة، قم بإيقاف تشغيل الجهاز، ثم أعد تشغيله.

اضغط على Ctrl-C في غضون 5 ثوان لمنع التمهيد التلقائي. يضعك هذا الإجراء في وضع المطالبة الخاص بشاشة ROMmon.

!--- Here, you power cycle the switch.

**********************************************************

*                                                        *

* Welcome to ROM Monitor for WS-X4014 System.            *

* Copyright (c) 1999-2000, 2001 by Cisco Systems, Inc.   *

* All rights reserved.                                   *

*                                                        *

**********************************************************

ROM Monitor Program Version 12.1(10r)EY(1.21)

Board type 1, Board revision 7

Swamp FPGA revision 16, Dagobah FPGA revision 43

Timer interrupt test passed.

MAC Address  : 00-02-b9-83-af-fe

IP Address   : 172.16.84.122

Netmask      : 255.255.255.0

Gateway      : 172.16.84.1

TftpServer   : Not set.

Main Memory  : 256 MBytes

***** The system will autoboot in 5 seconds *****  Type control-C to prevent autobooting.

!--- At this point, press Ctrl-C.

Autoboot cancelled......... please wait!!!

Autoboot cancelled......... please wait!!!

rommon 1 > [interrupt]

!--- The module ended in the ROMmon.

rommon 1 > [interrupt]

2. قم بإصدار confreg القيادة على rommon  موجه أوامر.

قم بعمل التحديدات التي تظهر هنا في واجهة سطر الأوامر لاسترداد كلمة المرور:

rommon 1 > set

rommon 1 > confreg

Configuration Summary :

=> load ROM after netboot fails

=> console baud: 9600

=> autoboot from: commands specified in 'BOOT' environment variable

do you wish to change the configuration? y/n  [n]:  y

enable  "diagnostic mode"? y/n  [n]:  n

enable  "use net in IP bcast address"? y/n  [n]:  n

disable "load ROM after netboot fails"? y/n  [n]:  n

enable  "use all zero broadcast"? y/n  [n]:  n

enable  "break/abort has effect"? y/n  [n]:  n

enable  "ignore system config info"? y/n  [n]:  y

change console baud rate? y/n  [n]:  n

change the boot characteristics? y/n  [n]:  n

Configuration Summary :

=> load ROM after netboot fails

=> ignore system config info

=> console baud: 9600

=> autoboot from: commands specified in 'BOOT' environment variable

do you wish to save this configuration? y/n  [n]:   y

You must reset or power cycle for new configuration to take effect

ملاحظة: يمكنك أيضا إستخدامconfreg 0x2142الأمر في موجه الأمر ROMmon لتعيين قيمة سجل التكوين لتخطي تكوين بدء التشغيل المخزن في ذاكرة NVRAM.

rommon 1 > confreg 0x2142

You must reset or power cycle for the new configuration to take effect.

3. قم بإصدار reset الأمر الذي يسمح بإعادة تشغيل الوحدة النمطية.

نظرا للتغييرات التي قمت بها في الخطوة 2، تتم إعادة تمهيد الوحدة النمطية ولكنها تتجاهل التكوين المحفوظ.

rommon 2 > reset

Resetting .......

rommon 3 >

**********************************************************

*                                                        *

* Welcome to ROM Monitor for WS-X4014 System.            *

* Copyright (c) 1999-2000, 2001 by Cisco Systems, Inc.   *

* All rights reserved.                                   *

*                                                        *

**********************************************************

!--- Output suppressed.

Press RETURN to get started!

!--- Press Return.

00:00:21: %SYS-5-RESTART: System restarted --

Cisco Internetwork Operating System Software

IOS (tm) Catalyst 4000 L3 Switch Software (cat4000-IS-M),

Version 12.1(8a)EW,  RELEASE SOFTWARE (fc1)

TAC Support: http://www.cisco.com/tac

Copyright (c) 1986-2002 by cisco Systems, Inc.

Compiled Thu 24-Jan-02 17:34 by ccai

00:00:21: %SNMP-5-COLDSTART: SNMP agent on host Switch

is undergoing a cold start

Switch>

4. تأكد من أن قيمة سجل التكوين هي 0x2142.

تعمل هذه القيمة على تمهيد الوحدة النمطية من Flash (الذاكرة المؤقتة) دون تحميل التكوين المحفوظ. قم بإصدار الأمر enable في نافذة مطالبة Switch للانتقال إلى وضع التمكين. ثم قم بإصدار الأمر show version للتحقق من قيمة سجل التكوين.

Switch>enable

Switch#show version

Cisco Internetwork Operating System Software

IOS (TM) Catalyst 4000 L3 Switch Software (cat4000-IS-M),

Version 12.1(8a)EW,  RELEASE SOFTWARE (fc1)

TAC Support: http://www.cisco.com/tac

Copyright (c) 1986-2002 by cisco Systems, Inc.

Compiled Thu 24-Jan-02 17:34 by ccai

Image text-base: 0x00000000, data-base: 0x00AA2B8C

ROM: 12.1(10r)EY(1.21)

Switch uptime is 5 minutes

System returned to ROM by reload

Running default software

cisco WS-C4006 (MPC8245) processor (revision 7) with 262144K bytes of memory.

Processor board ID FOX04183666

Last reset from Reload

32 Gigabit Ethernet/IEEE 802.3 interface(s)

467K bytes of non-volatile configuration memory.

Configuration register is 0x2142

Switch#

5. قم بإصدار configure memory  الأمر أو copy startup-config running-config  لنسخ ذاكرة NVRAM في الذاكرة.

عدم إصدار الأمر configure terminal الأمر، الذي يعرض التكوين الافتراضي على الوحدة النمطية.

Switch#configure memory

Uncompressed configuration from 1307 bytes to 3014 bytes

Switch#

00:13:52: %SYS-5-CONFIG_I: Configured from memory by console

c-4006-SUPIII#

6. قم بإصدار show ip interface brief   أمر أن يتأكد أن القارن أن كان يستعمل سابقا يبدي up/up وضع.

إن any of the قارن أن كان يستعمل قبل الكلمة إستعادة يبدي down، ال ما من إيقاف عمل أمر على أن قارن أن يجلب القارن فوق.

7. قم بإصدار الأمر write terminal أو الأمر show running-config لعرض التكوين المحفوظ على الوحدة النمطية.

c-4006-SUPIII# show running-config

Building configuration...

Current configuration : 3014 bytes

!

version 12.1

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

service compress-config

!

hostname c-4006-SUPIII

!

boot system flash bootflash:

!

vtp mode transparent

!--- Output suppressed.

line con 0

stopbits 1

line vty 0 4

login

!

end

c-4006-SUPIII#

أنت الآن جاهز لتغيير كلمة المرور على الوحدة النمطية.

8. أصدرت هذا أمر أن يغير الكلمة:

c-4006-SUPIII#configure terminal

Enter configuration commands, one per line.  End with CNTL/Z.

c-4006-SUPIII(config)#no enable secret

!--- This step is necessary if the switch had an enable secret password.

c-4006-SUPIII(config)#enable secret < password >

[Choose a strong password with at least one capital letter,

one number, and one special character.]

!--- This command sets the new password.

9. تأكد من إعادة قيمة سجل التكوين إلى 0x2102.

أكمل هذه الخطوات في موجه الأمر ConfigPrompt لتغيير قيمة سجل التكوين والتحقق منها.

c-4006-SUPIII(config)#config-register 0x2102

c-4006-SUPIII(config)# ^Z

c-4006-SUPIII#

00:19:01: %SYS-5-CONFIG_I: Configured from console by console

c-4006-SUPIII#write memory

!--- This step saves the configuration.

Building  configuration...

Compressed configuration from 3061 bytes to 1365 bytes[OK]

c-4006-SUPIII#show version

!--- This step verifies the value change.

Cisco Internetwork Operating System Software

IOS (TM) Catalyst 4000 L3 Switch Software (cat4000-IS-M),

Version 12.1(8a)EW,  RELEASE SOFTWARE (fc1)

TAC Support: http://www.cisco.com/tac

Copyright (c) 1986-2002 by cisco Systems, Inc.

Compiled Thu 24-Jan-02 17:34 by ccai

Image text-base: 0x00000000, database: 0x00AA2B8C

ROM: 12.1(10r)EY(1.21)

c-4006-SUPIII uptime is 20 minutes

System returned to ROM by reload

Running default software

cisco WS-C4006 (MPC8245) processor (revision 7) with 262144K bytes of memory.

Processor board ID FOX04183666

Last reset from Reload

32 Gigabit Ethernet/IEEE 802.3 interface(s)

467K bytes of nonvolatile configuration memory.

Configuration register is 0x2142 (will be 0x2102 at next reload)

c-4006-SUPIII#

عند هذه النقطة، قمت بتغيير كلمة المرور.

مثال على التكوين والإخراج

هذا مثال إنتاج النتيجة من الكلمة إستعادة إجراء على مادة حفازة 4000 مشرف محرك iii.

c-4006-SUPIII> enable

Password:

Password:

Password:

% Bad secrets

!--- Here, you power cycle the switch.

**********************************************************

*                                                        *

* Welcome to ROM Monitor for WS-X4014 System.            *

* Copyright (c) 1999-2000, 2001 by Cisco Systems, Inc.   *

* All rights reserved.                                   *

*                                                        *

**********************************************************

ROM Monitor Program Version 12.1(10r)EY(1.21)

Board type 1, Board revision 7

Swamp FPGA revision 16, Dagobah FPGA revision 43

Timer interrupt test passed.

MAC Address  : 00-02-b9-83-af-fe

IP Address   : 172.16.84.122

Netmask      : 255.255.255.0

Gateway      : 172.16.84.1

TftpServer   : Not set.

Main Memory  : 256 Mbytes

***** The system  will  autoboot in 5 seconds *****

Type control-C to prevent autobooting.

!--- At this point, press Ctrl-C.

Autoboot cancelled......... please wait!!!

Autoboot cancelled......... please wait!!!

rommon 1 > [interrupt]

rommon 1 > [interrupt]

rommon 1 > confreg

Configuration Summary :

=> load ROM after netboot fails

=> console baud: 9600

=> autoboot from: commands specified in 'BOOT' environment variable

do you wish to change the configuration? y/n [n]: y

enable "diagnostic mode"? y/n [n]: n

enable "use net in IP bcast address"? y/n [n]: n

disable "load ROM after netboot fails"? y/n [n]: n

enable "use all zero broadcast"? y/n [n]: n

enable "break/abort has effect"? y/n [n]: n

enable "ignore system config info"? y/n [n]: y

change console baud rate? y/n [n]: n

change the boot characteristics? y/n [n]: n

Configuration Summary :

=> load ROM after netboot fails

=> ignore system config info

=> console baud: 9600

=> autoboot from: commands specified in 'BOOT' environment variable

do you wish to save this configuration? y/n [n]: y

You must reset or power cycle for new configuration to take effect

rommon 2 > reset

Resetting .......

rommon 3 >

**********************************************************

*                                                        *

* Welcome to ROM Monitor for WS-X4014 System.            *

* Copyright (c) 1999-2000, 2001 by Cisco Systems, Inc.   *

* All rights reserved.                                   *

*                                                        *

**********************************************************

ROM Monitor Program Version 12.1(10r)EY(1.21)

Board type 1, Board revision 7

Swamp FPGA revision 16,

Dagobah FPGA revision 43

Timer interrupt test passed.

MAC Address : 00-02-b9-83-af-fe

IP Address : 172.16.84.122

Netmask : 255.255.255.0

Gateway : 172.16.84.1

TftpServer : Not set.

Main Memory : 256 Mbytes

***** The system will autoboot in 5 seconds *****

Type control-C to prevent autobooting.

. . . . .

******** The system will autoboot now ********

config-register = 0x2142

Autobooting using BOOT variable specified file.....

Current BOOT file is --- bootflash:

Rommon reg: 0x2B004180

Decompressing the image : ###########################

#####################################################

####################################### [OK]

k2diags version 1.6

prod: WS-X4014 part: 73-6854-07 serial: JAB0546060Z

Power-on-self-test for Module 1: WS-X4014

Status: (. = Pass, F = Fail)

Traffic using serdes loopback (L2; one port at a time)...

switch port 0: . switch port 1: . switch port 2: .

switch port 3: . switch port 4: . switch port 5: .

switch port 6: . switch port 7: . switch port 8: .

!--- Output suppressed.

Module 1 Passed

Exiting to ios...

Rommon reg: 0x2B000180

Decompressing the image : ##########################

!--- Output suppressed.

######################################################### [OK]

Restricted Rights Legend

Use, duplication, or disclosure by the Government is

subject to restrictions as set forth in subparagraph

(c) of the Commercial Computer Software - Restricted

Rights clause at FAR sec. 52.227-19 and subparagraph

(c) (1) (ii) of the Rights in Technical Data and Computer

Software clause at DFARS sec. 252.227-7013.

cisco Systems, Inc.

170 West Tasman Drive

San Jose, California 95134-1706

Cisco Internetwork Operating System Software

IOS (TM) Catalyst 4000 L3 Switch Software (cat4000-IS-M),

Version 12.1(8a)EW,  RELEASE SOFTWARE (fc1)

TAC Support: http://www.cisco.com/tac

Copyright (c) 1986-2002 by cisco Systems, Inc.

Compiled Thu 24-Jan-02 17:34 by ccai

Image text-base: 0x00000000, database: 0x00AA2B8C

cisco WS-C4006 (MPC8245) processor (revision 7) with 262144K bytes of memory.

Processor board ID FOX04183666

Last reset from Reload

32 Gigabit Ethernet/IEEE 802.3 interface(s)

467K bytes of nonvolatile configuration memory.

Press RETURN to get started!

00:00:21: %SYS-5-RESTART: System restarted --

Cisco Internetwork Operating System Software

IOS (TM) Catalyst 4000 L3 Switch Software (cat4000-IS-M),

Version 12.1(8a)EW,  RELEASE SOFTWARE (fc1)

TAC Support: http://www.cisco.com/tac

Copyright (c) 1986-2002 by cisco Systems, Inc.

Compiled Thu 24-Jan-02 17:34 by ccai

00:00:21: %SNMP-5-COLDSTART: SNMP agent on host Switch is undergoing a cold start

Switch>enable

Switch#show version

Cisco Internetwork Operating System Software

IOS (TM) Catalyst 4000 L3 Switch Software (cat4000-IS-M),

Version 12.1(8a)EW, RELEASE SOFTWARE (fc1)

TAC Support: http://www.cisco.com/tac

Copyright (c) 1986-2002 by cisco Systems, Inc.

Compiled Thu 24-Jan-02 17:34 by ccai

Image text-base: 0x00000000, database: 0x00AA2B8C

ROM: 12.1(10r)EY(1.21)

Switch uptime is 5 minutes

System returned to ROM by reload

Running default software

cisco WS-C4006 (MPC8245) processor (revision 7) with 262144K bytes of memory.

Processor board ID FOX04183666

Last reset from Reload

32 Gigabit Ethernet/IEEE 802.3 interface(s)

467K bytes of nonvolatile configuration memory.

Configuration register is 0x2142

Switch#

Switch#configure memory

Uncompressed configuration from 1307 bytes to 3014 bytes

c-4006-SUPIII#

00:13:52: %SYS-5-CONFIG_I: Configured from memory by console

c-4006-SUPIII#show running-config

Building configuration...

Current configuration : 3014 bytes

!

version 12.1

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

service compress-config

!

hostname c-4006-SUPIII

!

boot system flash bootflash:

!

vtp mode transparent

!

vlan 20

private-vlan primary

!

vlan 100

!

vlan 202

private-vlan association 440

!

vlan 440

private-vlan isolated

!

vlan 500

ip subnet-zero

no ip domain-lookup

!

ip multicast-routing

!

!

interface GigabitEthernet1/1

no switchport

ip address 10.1.1.1 255.255.255.0

ip pim dense-mode

!

interface GigabitEthernet1/2

no switchport

ip address 10.2.2.2 255.255.255.0

!

!--- Output suppressed.

!

interface Vlan1

ip address 172.16.84.140 255.255.255.0

ip pim dense-mode

!

interface Vlan2

no ip address

shutdown

!

interface Vlan20

no ip address

shutdown

!

!--- Output suppressed.

!

line con 0

stopbits 1

line vty 0 4

login

!

end

c-4006-SUPIII#configure terminal

Enter configuration commands, one per line. End with CNTL/Z.

c-4006-SUPIII(config)#no enable secret

!--- This step is necessary if the switch had an enable secret password.

c-4006-SUPIII(config)#enable secret < password >

[Choose a strong password with at least one capital letter,

one number, and one special character.]

c-4006-SUPIII(config)#config-register 0x2102

c-4006-SUPIII(config)#^Z

c-4006-SUPIII#

00:19:01: %SYS-5-CONFIG_I: Configured from console by console

c-4006-SUPIII#write memory

Building configuration...

Compressed configuration from 3061 bytes to 1365 bytes[OK]

c-4006-SUPIII#show version

Cisco Internetwork Operating System Software

IOS (TM) Catalyst 4000 L3 Switch Software (cat4000-IS-M),

Version 12.1(8a)EW,  RELEASE SOFTWARE (fc1)

TAC Support: http://www.cisco.com/tac

Copyright (c) 1986-2002 by cisco Systems, Inc.

Compiled Thu 24-Jan-02 17:34 by ccai

Image text-base: 0x00000000, database: 0x00AA2B8C

ROM: 12.1(10r)EY(1.21)

c-4006-SUPIII uptime is 20 minutes

System returned to ROM by reload

Running default software

cisco WS-C4006 (MPC8245) processor (revision 7) with 262144K bytes of memory.

Processor board ID FOX04183666

Last reset from Reload

32 Gigabit Ethernet/IEEE 802.3 interface(s)

467K bytes of nonvolatile configuration memory.

Configuration register is 0x2142 (will be 0x2102 at next reload)

c-4006-SUPIII#

معلومات ذات صلة

- مجموعات تسلسل مفاتيح Break القياسية أثناء إسترداد كلمة المرور

- إجراءات استرداد كلمة المرور

- دعم منتجات محولات LAN

- الدعم التقني والمستندات - Cisco Systems