المحتويات

المقدمة

قبل البدء

الاصطلاحات

المتطلبات الأساسية

المكونات المستخدمة

النظرية الأساسية

التكوين

إنشاء قناة منفذ

الرسم التخطيطي للشبكة

التكوينات

التحقق من الصحة

يبدي أمر لمادة حفازة 2950

أبديت أمر لمادة حفازة 2948g-l3

استكشاف الأخطاء وإصلاحها

معلومات ذات صلة

المقدمة

يصف هذا وثيقة الإعداد من EtherChannel و 802.1Q trunking بين مادة حفازة 2950 ومادة حفازة 2948g-l3 مفتاح. يمكن أن يسمى EtherChannel سريع EtherChannel (FEC) أو Gigabit EtherChannel (GEC) حسب سرعة القارن أو ميناء يستعمل أن يشكل EtherChannel.

ملاحظة: يدعم المحول Catalyst 2950 switch توصيل 802.1Q فقط، ولا يدعم توصيل بروتوكول الارتباط بين المحولات (ISL). تتشارك المحولات Catalyst 2948G-L3 و Catalyst 4908G-L3 switches في صورة البرنامج نفسها، لذلك فإن التكوين Catalyst 2948G-L3 المستخدم في هذا المستند يطبق أيضا على المحول Catalyst 4908G-L3 switch.

في مثال التكوين هذا، تم تجميع واجهات إيثرنت سريعة على محول Catalyst 2950 في وحدة تحكم في الوصول إلى البنية الأساسية (FEC) باستخدام واجهات إيثرنت سريعة من محول Catalyst 2948G-L3. يشير FEC، GEC، قناة المنفذ، ومجموعة القنوات إلى EtherChannel في هذا المستند.

قبل البدء

الاصطلاحات

للحصول على مزيد من المعلومات حول اصطلاحات المستندات، راجع اصطلاحات تلميحات Cisco التقنية.

المتطلبات الأساسية

يصف هذا وثيقة العينة تشكيل من المفتاح والمخرجات من العرض أمر ذو صلة. للحصول على التفاصيل والتحذيرات أو الإرشادات المحددة على محولات فردية، ارجع إلى المستندات التالية:

- مادة حفازة 2950 مفتاح يشكل EtherChannel

- مادة حفازة 2950 مفتاح يشكل VLAN شنطة

- مادة حفازة 2948g-l3 مفتاح يشكل EtherChannel

- مادة حفازة 2948g-l3 مفتاح يشكل VLAN عملية كبسلة

المكونات المستخدمة

تستند المعلومات الواردة في هذا المستند إلى إصدارات البرامج والمكونات المادية أدناه.

- المحول Catalyst 2948G-L3 switch الذي يشغل برنامج Cisco IOS® Software 12.0(14)W5(20)

- مادة حفازة 2950 مفتاح يركض cisco ios برمجية 12.1(12c)EA1

تم إنشاء المعلومات المُقدمة في هذا المستند من الأجهزة الموجودة في بيئة معملية خاصة. بدأت جميع الأجهزة المُستخدمة في هذا المستند بتكوين ممسوح (افتراضي). إذا كنت تعمل في شبكة مباشرة، فتأكد من فهمك للتأثير المحتمل لأي أمر قبل استخدامه.

النظرية الأساسية

من وجهة نظر تكوين، فإن المحول Catalyst 2948G-L3 switch هو موجه. وهو يستخدم سطر أمر Cisco IOS وبشكل افتراضي، تكون جميع الواجهات واجهات موجهة.

المادة حفازة 2948g-l3 لا يمدد مفتاح VLANs ك افتراضيا. بما أن جميع الواجهات هي واجهات موجهة، يجب أن تنتمي كل واجهة إلى شبكة أو شبكة فرعية مختلفة. إذا كنت ترغب في انتماء واجهتين أو أكثر إلى الشبكة الفرعية نفسها، يلزم تكوين التوصيل على هذه الواجهات.

لا يساند المادة حفازة 2948g-l3 مفتاح مفاوضة بروتوكول على آخر مادة حفازة مفتاح، مثل VLAN شنطة بروتوكول (VTP)، حركي trunking بروتوكول (DTP)، و ميناء اعتداء بروتوكول (PAgP). من المستحسن أن يتم إيقاف تشغيل هذه البروتوكولات على واجهات Catalyst 2950 التي تتصل بالمحول Catalyst 2948G-L3 switch.

على المادة حفازة 2948g-l3 مفتاح، كل حركة مرور يستلم على ال VLAN أهلي طبيعي على شنطة وجهت في برمجية. وهذا يعني أنه يتم إرسال حركة المرور هذه إلى وحدة المعالجة المركزية. عندما يتم إرسال قدر كبير من حركة المرور على شبكة VLAN هذه، قد ينتج عنها حمل مرتفع لوحدة المعالجة المركزية على المحول Catalyst 2948G-L3 switch ويكون لها تأثير ضار على أداء الشبكة. ينصح بإنشاء شبكة VLAN وهمية (مثل شبكة VLAN 99) والتي يمكن جعلها شبكة VLAN الأصلية لشنطة. يتم إرسال جميع حركة مرور المستخدم عبر شبكات VLAN الأخرى ويتم توجيهها في الأجهزة، مما يؤدي إلى تحسين الأداء.

التكوين

في هذا القسم، تُقدّم لك معلومات تكوين الميزات الموضحة في هذا المستند.

ملاحظة: للعثور على معلومات إضافية حول الأوامر المستخدمة في هذا المستند، أستخدم أداة بحث الأوامر (للعملاء المسجلين فقط).

إنشاء قناة منفذ

عند تكوين EtherChannel، من المستحسن أن تقوم بإنشاء قناة منفذ باتباع الخطوات أدناه. وهذا سيتجنب المشاكل المحتملة مع بروتوكول الشجرة المتفرعة (STP) أثناء عملية التكوين. يمكن أن تحدث حلقة STP إذا تم تكوين جانب واحد كقناة قبل تكوين الجانب الآخر كقناة. ونتيجة لذلك، يمكن أن يضع المحول الواجهات المعنية في الحلقة في وضع Errordisabled.الخطوات التالية هي إرشادات لسيناريو التكوين المحدد هذا.

على المادة حفازة 2948g-l3 مفتاح:

1. شكلت القارن أن يكون استعملت في ميناء يقني في إداريا إيقاف أسلوب.

2. قم بإنشاء قناة المنفذ (مجموعة قنوات). يحمل الميناء قناة مختلف VLANs، لذلك خلقت قارن فرعي لكل VLAN أن يكون حاضر على الشنطة. على شنطة 802.1Q، حددت كل الربط يمر عبر الشنطة ماعدا الحركة مرور على ال VLAN أهلي طبيعي. بسبب هذا، يحتاج أنت أن يميز القارن subinterface يماثل ال VLAN أهلي طبيعي ب يضع الكلمة المفتاح "أهلي طبيعي" في النهاية. كما تمت الإشارة مسبقا، من الأفضل إستخدام شبكة VLAN وهمية لا تحتوي على حركة مرور بيانات خاصة بالمستخدم.

3. المادة حفازة 2948g-l3 يتلقى مفتاح افتراضيا كل يوجه ميناء. لميناء في 2948G-L3 أن يستطيع اتصلت على VLANs مختلف على 2950، أنت يضطر طبقت يجسر. يجب تكوين الواجهات (والواجهات الفرعية) التي تنتمي إلى شبكة VLAN نفسها (الشبكة أو الشبكة الفرعية) لتنتمي إلى مجموعة الجسر نفسها. للتوجيه بين مجموعات الجسر المختلفة هذه، يجب تمكين التوجيه المتكامل والربط (IRB).

على المادة حفازة 2950 مفتاح:

1. قم بتكوين الواجهات التي ستنتمي إلى القناة كخط اتصال وتأكد من إيقاف تشغيل DTP. ويتم تحقيق ذلك من خلال إصدار الأمر switchport nonegotiate على الواجهات المادية. شكلت VLAN وهمي (VLAN 99 في هذا مثال) على ال VLAN قاعدة معطيات أن يكون استعملت كال VLAN أهلي طبيعي على الشنطة. ما لم يعين خلاف ذلك، ال VLAN أهلي طبيعي على 802.1Q شنطة VLAN 1. أنت تحتاج أن يعين على كلا قارن أن أنت تستعمل VLAN 99 بما أن ال VLAN أهلي طبيعي. ويتم تحقيق ذلك من خلال إصدار الأمر switchport trunk native vlan 99.

2. قم بإنشاء قناة المنفذ وتأكد من تعيين وضع القناة على قيد التشغيل (وهذا يوقف تشغيل PAgP).

3. reenable القارن أن كان أعجزت سابقا على المادة حفازة 2948g-l3 مفتاح ب يصدر ال ما من إيقاف أمر.

الرسم التخطيطي للشبكة

يستخدم هذا المستند إعداد الشبكة الموضح في الرسم التخطيطي أدناه.

التكوينات

يستخدم هذا المستند التكوينات الموضحة أدناه.

- Catalyst 2948G-L3

- Catalyst 2950

Catalyst 2948G-L3

2948G-L3#show run

!--- The following configuration shows how to configure Catalyst 2948G-L3 !--- for bridging and connect to a Catalyst 2950 with 802.1Q trunking !--- over EtherChannel. For configuring interVLAN-routing on Catalyst !--- 2948G-L3, refer to Catalyst 2948G-L3 Sample Configurations.

Building configuration...

Current configuration:

!

!

version 12.0

no service pad

service timestamps debug uptime

service timestamps log datetime

no service password-encryption

!

hostname 2948G-L3

!

!

ip subnet-zero

!

!--- Enable IRB when routing between different !--- bridge groups is needed.

bridge irb

!

!--- Configure a logical interface for the EtherChannel.

interface Port-channel1

no ip address

no ip directed-broadcast

hold-queue 300 in

!

!--- Create a subinterface for each VLAN on the port channel.

!

interface Port-channel1.1

!--- Specify the encapsulation and VLAN number.

encapsulation dot1Q 1

no ip redirects

no ip directed-broadcast

!--- Add the subinterface to the appropriate bridge group. !--- All the interfaces (and subinterfaces) that belong to the !--- same VLAN (network or subnet) should be configured to fall !--- in the same bridge group.

bridge-group 1

!

!--- Configure a subinterface for the second VLAN. !--- This procedure must be repeated for every VLAN.

!

interface Port-channel1.2

encapsulation dot1Q 2

no ip redirects

no ip directed-broadcast

bridge-group 2

!

!--- Configure a subinterface for the native VLAN.

!

interface Port-channel1.99

encapsulation dot1Q 99 native

no ip redirects

no ip directed-broadcast

!--- Note in this case you do not put any bridge group !--- statements under this subinterface. A dummy VLAN has been chosen !--- as the native VLAN on which you do not put any traffic, !--- so there is no need to have this routed.

!

interface FastEthernet1

no ip address

no ip directed-broadcast

!--- Configure the port to channel 1.

channel-group 1

!

interface FastEthernet2

no ip address

no ip directed-broadcast

!--- Configure the port to channel 1.

channel-group 1

!

interface FastEthernet3

no ip address

no ip directed-broadcast

!--- The device connected on this interface belongs !--- to the same subnet (VLAN 1) as subinterface 1 on !--- the port channel, so this interface has to be added to !--- bridge-group 1.

bridge-group 1

!

!--- If there are any other interfaces that belong to !--- the same VLAN (subnet), they all have to be added to !--- the respective bridge group.

( .... Output is suppressed)

!

!

! a routed interface for bridge-group 1

interface BVI1

ip address 1.1.1.1 255.255.255.0

no ip directed-broadcast

no ip route-cache cef

!

! a routed interface for bridge-group 2

interface BVI2

ip address 2.2.2.1 255.255.255.0

no ip directed-broadcast

no ip route-cache cef

!

ip classless

!

! bridge 1 protocol ieee command enables bridging using the IEEE 802.1d spanning-tree

bridge 1 protocol ieee

! The bridge 1 route ip command specifies that IP will be routed

bridge 1 route ip

! bridge 2 protocol ieee command enables bridging using the IEEE 802.1d spanning-tree

bridge 2 protocol ieee

! bridge 2 route ip command specifies that IP will be routed

bridge 2 route ip

!

line con 0

transport input none

line aux 0

line vty 0 4

login

!

end

Catalyst 2950

5-2950-24##show run

Building configuration...

Current configuration : 1986 bytes

!

version 12.1

no service single-slot-reload-enable

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname 5-2950-24#

!

!

!

!--- VLAN 2 is created for this lab set up, !--- and VLAN 1 is created by default.

vlan 2

ip subnet-zero

!--- For information on VTP, refer to !--- Understanding and Configuring VLAN Trunk Protocol (VTP)

vtp domain cisco

vtp mode transparent

!

spanning-tree extend system-id

!

!--- A logical port-channel interface is automatically created !--- when ports are grouped into a channel group.

!

interface Port-channel1

!--- The switchport trunk native vlan 99 command is !--- issued on the Fast Ethernet interface.

switchport trunk native vlan 99

!--- The switchport mode trunk command is !--- issued on the Fast Ethernet interface.

switchport mode trunk

!-- The switchport nonegotiate command is !--- issued on the Fast Ethernet interface.

switchport nonegotiate

no ip address

flowcontrol send off

!

interface FastEthernet0/1

!--- Configure the port to be in trunking mode.

switchport mode trunk

!--- Configure a dummy VLAN as the native VLAN. !--- For this example, VLAN 99 is used.

switchport trunk native vlan 99

!--- Disable the DTP negotiation on this interface !--- (the Catalyst 2948G-L3 switch does not support these frames).

switchport nonegotiate

no ip address

!--- Configure the port to channel without PAgP.

channel-group 1 mode on

!

interface FastEthernet0/2

!--- Configure the port to be in trunking mode.

switchport mode trunk

!--- Configure a dummy VLAN as the native VLAN. !--- For this example, VLAN 99 is used.

switchport trunk native vlan 99

!--- Disable the DTP negotiation on this interface !--- (the Catalyst 2948G-L3 switch does not support these frames).

switchport nonegotiate

no ip address

!--- Configure the port to channel without PAgP.

channel-group 1 mode on

!

interface FastEthernet0/3

!--- The PC2 on this interface belongs to VLAN 2.

switchport access vlan 2

switchport mode access

no ip address

!--- On the userports, enable portfast to increase !--- the STP convergence time.

spanning-tree portfast

!

( .... Output is suppressed)

!

interface Vlan1

ip address 1.1.1.2 255.255.255.0

no ip route-cache

!

ip http server

!

!

line con 0

line vty 5 15

!

end

التحقق من الصحة

يوفر هذا القسم معلومات يمكنك إستخدامها للتأكد من أن التكوينات تعمل بشكل صحيح.

يتم دعم بعض أوامر العرض بواسطة أداة مترجم الإخراج (العملاء المسجلون فقط)، والتي تتيح لك عرض تحليل إخراج أمر العرض.

يبدي أمر لمادة حفازة 2950

يتحقق أمر العرض التالي من تكوين المحول Catalyst 2950 switch، كما هو موضح في الإخراج أدناه.

5-2950-24##show vlan

VLAN Name                             Status    Ports

---- -------------------------------- --------- -------------------------------

1    default                          active    Fa0/4, Fa0/5, Fa0/6, Fa0/7

Fa0/8, Fa0/9, Fa0/10, Fa0/11

Fa0/12, Fa0/13, Fa0/14, Fa0/15

Fa0/16, Fa0/17, Fa0/18, Fa0/19

Fa0/20, Fa0/21, Fa0/22, Fa0/23

Fa0/24, Gi0/1, Gi0/2

2    VLAN0002                         active    Fa0/3

1002 fddi-default                     active

1003 token-ring-default               active

1004 fddinet-default                  active

1005 trnet-default                    active

VLAN Type  SAID       MTU   Parent RingNo BridgeNo Stp  BrdgMode Trans1 Trans2

---- ----- ---------- ----- ------ ------ -------- ---- -------- ------ ------

1    enet  100001     1500  -      -      -        -    -        0      0

2    enet  100002     1500  -      -      -        -    -        0      0

1002 fddi  101002     1500  -      -      -        -    -        0      0

1003 tr    101003     1500  -      -      -        -    -        0      0

1004 fdnet 101004     1500  -      -      -        ieee -        0      0

1005 trnet 101005     1500  -      -      -        ibm  -        0      0

Remote SPAN VLANs

------------------------------------------------------------------------------

Primary Secondary Type              Ports

------- --------- ----------------- ------------------------------------------

5-2950-24##show interfaces port-channel 1 trunk

Port      Mode         Encapsulation  Status        Native vlan

Po1       on           802.1q         trunking      99

Port      Vlans allowed on trunk

Po1       1-4094

Port      Vlans allowed and active in management domain

Po1       1-2

Port      Vlans in spanning tree forwarding state and not pruned

Po1       1-2

5-2950-24##show interface port-channel 1

Port-channel1 is up, line protocol is up

Hardware is EtherChannel, address is 0005.7428.0e02 (bia 0005.7428.0e02)

MTU 1500 bytes, BW 200000 Kbit, DLY 1000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA, loopback not set

Full-duplex, 100Mb/s

input flow-control is off, output flow-control is off

Members in this channel: Fa0/1 Fa0/2

ARP type: ARPA, ARP Timeout 04:00:00

Last input 00:00:01, output 00:00:00, output hang never

Last clearing of "show interface" counters never

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue :0/40 (size/max)

5 minute input rate 25000 bits/sec, 39 packets/sec

5 minute output rate 39000 bits/sec, 59 packets/sec

11609 packets input, 955786 bytes, 0 no buffer

Received 11590 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored

0 watchdog, 11583 multicast, 0 pause input

0 input packets with dribble condition detected

17396 packets output, 1442093 bytes, 0 underruns

0 output errors, 0 collisions, 1 interface resets

0 babbles, 0 late collision, 0 deferred

0 lost carrier, 0 no carrier, 0 PAUSE output

0 output buffer failures, 0 output buffers swapped out

5-2950-24##show interface port-channel 1 switchport

Name: Po1

Switchport: Enabled

Administrative Mode: trunk

Operational Mode: trunk

Administrative Trunking Encapsulation: dot1q

Operational Trunking Encapsulation: dot1q

Negotiation of Trunking: Off

Access Mode VLAN: 1 (default)

Trunking Native Mode VLAN: 99 (Inactive)

Administrative private-vlan host-association: none

Administrative private-vlan mapping: none

Operational private-vlan: none

Trunking VLANs Enabled: ALL

Pruning VLANs Enabled: 2-1001

Protected: false

Voice VLAN: none (Inactive)

Appliance trust: none

5-2950-24##show cdp neighbors

Capability Codes: R - Router, T - Trans Bridge, B - Source Route Bridge

S - Switch, H - Host, I - IGMP, r - Repeater

Device ID        Local Intrfce     Holdtme    Capability  Platform  Port ID

5-2948G-L3       Fas 0/1            144         R T       Cat2948G  Port-channe1

5-2948G-L3       Fas 0/2            178         R T       Cat2948G  Fas 2

5-2948G-L3       Fas 0/1            178         R T       Cat2948G  Fas 1

PC2#ping 1.1.1.3

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 1.1.1.3, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/4/4 ms

أبديت أمر لمادة حفازة 2948g-l3

يتحقق أمر العرض التالي من تكوين المحول Catalyst 2948-L3 switch، كما هو موضح في الإخراج أدناه.

5-2948G-L3#show interfaces port-channel 1

Port-channel1 is up, line protocol is up

Hardware is FEChannel, address is 0001.43ff.1407 (bia 0000.0000.0000)

MTU 1500 bytes, BW 200000 Kbit, DLY 100 usec, rely 255/255, load 1/255

Encapsulation ARPA, loopback not set, keepalive set (10 sec)

Half-duplex, Unknown Speed, Media type unknown

ARP type: ARPA, ARP Timeout 04:00:00

No. of active members in this channel: 2

Member 0 : FastEthernet1

Member 1 : FastEthernet2

Last input 00:00:00, output 00:00:00, output hang never

Last clearing of "show interface" counters never

Queueing strategy: fifo

Output queue 0/40, 0 drops; input queue 0/300, 0 drops

5 minute input rate 2000 bits/sec, 4 packets/sec

5 minute output rate 1000 bits/sec, 1 packets/sec

27033 packets input, 2083710 bytes, 0 no buffer

Received 6194 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

0 watchdog, 0 multicast

0 input packets with dribble condition detected

12808 packets output, 1945983 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 babbles, 0 late collision, 0 deferred

0 lost carrier, 0 no carrier

0 output buffer failures, 0 output buffers swapped out

5-2948G-L3#show vlan

Virtual LAN ID:  1 (IEEE 802.1Q Encapsulation)

vLAN Trunk Interfaces:  GigabitEthernet49

GigabitEthernet50.1

Port-channel1.1

This is configured as native Vlan for the following interface(s) :

GigabitEthernet49

GigabitEthernet50

Protocols Configured:   Address:              Received:        Transmitted:

IP              10.10.10.1                   0                   0

Bridging        Bridge Group 1               3418                   5

Virtual LAN ID:  2 (IEEE 802.1Q Encapsulation)

vLAN Trunk Interfaces:  GigabitEthernet50.2

Port-channel1.2

Protocols Configured:   Address:              Received:        Transmitted:

IP              20.20.20.1                   0                   0

Bridging        Bridge Group 2               3952                   9

Virtual LAN ID:  21 (IEEE 802.1Q Encapsulation)

vLAN Trunk Interface:   GigabitEthernet49.1

Protocols Configured:   Address:              Received:        Transmitted:

Virtual LAN ID:  99 (IEEE 802.1Q Encapsulation)

vLAN Trunk Interface:   Port-channel1.99

This is configured as native Vlan for the following interface(s) :

Port-channel1

Protocols Configured:   Address:              Received:        Transmitted:

5-2948G-L3#show spanning-tree

Bridge group 1 is executing the IEEE compatible Spanning Tree protocol

Bridge Identifier has priority 32768, address 0001.43ff.1409

Configured hello time 2, max age 20, forward delay 15

We are the root of the spanning tree

Topology change flag not set, detected flag not set

Times:  hold 1, topology change 35, notification 2

hello 2, max age 20, forward delay 15

Timers: hello 0, topology change 0, notification 0

bridge aging time 300

Port 6 (FastEthernet3) of Bridge group 1 is forwarding

Port path cost 19, Port priority 128

Designated root has priority 32768, address 0001.43ff.1409

Designated bridge has priority 32768, address 0001.43ff.1409

Designated port is 6, path cost 0

Timers: message age 0, forward delay 0, hold 0

BPDU: sent 4107, received 2

Port 58 (Port-channel1.1 DOT1Q) of Bridge group 1 is forwarding

Port path cost 12, Port priority 128

Designated root has priority 32768, address 0001.43ff.1409

Designated bridge has priority 32768, address 0001.43ff.1409

Designated port is 58, path cost 0

Timers: message age 0, forward delay 0, hold 0

BPDU: sent 5240, received 502

Bridge group 2 is executing the IEEE compatible Spanning Tree protocol

Bridge Identifier has priority 32768, address 0000.0c00.d08c

Configured hello time 2, max age 20, forward delay 15

Current root has priority 0, address 0010.0db1.804f

Root port is 59 (Port-channel1.2), cost of root path is 50

Topology change flag not set, detected flag not set

Times:  hold 1, topology change 35, notification 2

hello 2, max age 20, forward delay 15

Timers: hello 0, topology change 0, notification 0

bridge aging time 300

Port 59 (Port-channel1.2 DOT1Q) of Bridge group 2 is forwarding

Port path cost 12, Port priority 128

Designated root has priority 0, address 0010.0db1.804f

Designated bridge has priority 32770, address 0005.7428.0e00

Designated port is 65, path cost 38

Timers: message age 3, forward delay 0, hold 0

BPDU: sent 1790, received 3964

PC1#ping 2.2.2.2

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 2.2.2.2, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/4/4 ms

استكشاف الأخطاء وإصلاحها

لا تتوفر حاليًا معلومات محددة لاستكشاف الأخطاء وإصلاحها لهذا التكوين.

معلومات ذات صلة

- يفهم ويشكل VLAN شنطة بروتوكول (VTP)

- نموذج تكوينات Catalyst 2948G-L3

- دعم منتجات المحولات

- دعم تقنية تحويل شبكات LAN

- الدعم التقني والمستندات - Cisco Systems