المحتويات

المقدمة

المتطلبات الأساسية

المتطلبات

المكونات المستخدمة

الاصطلاحات

التكوين

الرسم التخطيطي للشبكة

التكوينات

التحقق من الصحة

استكشاف الأخطاء وإصلاحها

معلومات ذات صلة

المقدمة

يقدم هذا المستند مثالا للتكوين النموذجي للشركات الصغيرة المتصلة بالإنترنت والتي تقوم بتشغيل خوادمها الخاصة. الاتصال بالإنترنت عبر خط تسلسلي. يتصل إيثرنت 0 بالشبكة الداخلية (شبكة محلية واحدة). يتصل إيثرنت 1 بشبكة DMZ، والتي تحتوي على عقدة واحدة تستخدم لتوفير الخدمات للعالم الخارجي. قام مزود خدمة الإنترنت (ISP) بتعيين المجموعة 192.168.27.0/24 للشركة. هذا بشكل متساو بين DMZ وشبكة LAN الداخلية مع قناع الشبكة الفرعية 255.255.255.128. وتتمثل السياسة الأساسية في ما يلي:

- السماح للمستخدمين الموجودين على الشبكة الداخلية بالاتصال بأية خدمة على الإنترنت العامة.

- السماح لأي شخص على الإنترنت بالاتصال بخدمات WWW و FTP وبروتوكول نقل البريد البسيط (SMTP) على خادم DMZ، وإجراء استعلامات نظام اسم المجال (DNS) عليه. وهذا يسمح للأشخاص الخارجيين بعرض صفحات الشركة على الويب، والتقاط الملفات التي قامت الشركة بنشرها للاستهلاك الخارجي، وإرسال البريد إلى الشركة.

- السماح للمستخدمين الداخليين بالاتصال بخدمة POP على خادم DMZ (لالتقاط بريدهم) وببرنامج Telnet (لإدارتها).

- لا تسمح لأي شيء على المنطقة المنزوعة السلاح ببدء أي إتصالات، إما بالشبكة الخاصة أو بالإنترنت.

- تدقيق جميع الاتصالات التي تعبر جدار الحماية إلى خادم SYSLOG على الشبكة الخاصة. تستخدم الأجهزة الموجودة على الشبكة الداخلية خادم DNS على DMZ. يتم إستخدام قوائم الوصول إلى الإدخال على جميع الواجهات لمنع الانتحال. يتم إستخدام قوائم الوصول إلى الإخراج للتحكم في حركة المرور التي يمكن إرسالها إلى أي واجهة محددة.

أحلت إثنان قارن مسحاج تخديد دون NAT يستعمل cisco ios جدار حماية تشكيل in order to شكلت إثنان قارن مسحاج تخديد دون NAT يستعمل ال cisco IOS® جدار حماية.

أحلت إثنان قارن مسحاج تخديد مع nat cisco ios جدار حماية تشكيل in order to شكلت إثنان قارن مسحاج تخديد مع nat يستعمل cisco ios جدار حماية.

المتطلبات الأساسية

المتطلبات

لا توجد متطلبات خاصة لهذا المستند.

المكونات المستخدمة

تستند المعلومات الواردة في هذا المستند إلى إصدارات البرامج والمكونات المادية:

- برنامج IOS الإصدار 12.2(15)T13 من Cisco مع مجموعة ميزات جدار الحماية

- الموجه 7204 VXR من Cisco

تم إنشاء المعلومات الواردة في هذا المستند من الأجهزة الموجودة في بيئة معملية خاصة. بدأت جميع الأجهزة المُستخدمة في هذا المستند بتكوين ممسوح (افتراضي). إذا كانت شبكتك مباشرة، فتأكد من فهمك للتأثير المحتمل لأي أمر.

الاصطلاحات

راجع اصطلاحات تلميحات Cisco التقنية للحصول على مزيد من المعلومات حول اصطلاحات المستندات.

التكوين

في هذا القسم، تُقدّم لك معلومات تكوين الميزات الموضحة في هذا المستند.

ملاحظة: أستخدم أداة بحث الأوامر (للعملاء المسجلين فقط) للحصول على مزيد من المعلومات حول الأوامر المستخدمة في هذا القسم.

الرسم التخطيطي للشبكة

يستخدم هذا المستند إعداد الشبكة التالي:

التكوينات

يستخدم هذا المستند هذا التكوين.

الموجه 7204 VXR

version 12.2

service timestamps debug datetime msec

service timestamps log datetime msec

service password-encryption

!

hostname Router

!

logging queue-limit 100

enable secret 5 <something>

!

ip subnet-zero

ip cef

no ip domain lookup

!

ip inspect audit-trail

!

!--- Sets the length of time a TCP session !--- is still managed after no activity.

!

ip inspect tcp idle-time 14400

!

!--- Sets the length of time a UDP session !--- is still managed after no activity.

!

ip inspect udp idle-time 1800

!

!--- Sets the length of time a DNS name lookup session !--- is still managed after no activity.

!

ip inspect dns-timeout 7

!

!--- Sets up inspection list "standard" !--- to be used for inspection of inbound Ethernet 0 !--- and inbound serial (applied to both interfaces).

!

ip inspect name standard cuseeme

ip inspect name standard ftp

ip inspect name standard h323

ip inspect name standard http

ip inspect name standard rcmd

ip inspect name standard realaudio

ip inspect name standard smtp

ip inspect name standard sqlnet

ip inspect name standard streamworks

ip inspect name standard tcp

ip inspect name standard tftp

ip inspect name standard udp

ip inspect name standard vdolive

ip audit notify log

ip audit po max-events 100

!

no voice hpi capture buffer

no voice hpi capture destination

!

mta receive maximum-recipients 0

!

interface ethernet 3/0

ip address 192.168.27.129 255.255.255.128

!

!--- Apply the access list to allow all legitimate !--- traffic from the inside network and prevent spoofing.

!

ip access-group 101 in

!

!--- Apply inspection list "standard" for inspection !--- of inbound Ethernet traffic. This inspection opens !--- temporary entries on access lists 111 and 121.

!

ip inspect standard in

duplex full

interface ethernet 3/1

ip address 192.168.27.1 255.255.255.128

!

!--- Apply the access list to permit DMZ traffic (except spoofing) !--- on the DMZ interface inbound. The DMZ is not permitted to initiate !--- any outbound traffic except Internet Control Message Protocol (ICMP).

!

ip access-group 111 in

!

!--- Apply inspection list "standard" for inspection of outbound !--- traffic from e1. This adds temporary entries on access list 111 !--- to allow return traffic, and protects servers in DMZ from !--- distributed denial of service (DDoS) attacks.

ip inspect standard out

duplex full

!

interface serial 2/0

ip address 10.89.129.194 255.255.255.252

!--- Apply the access list to allow legitimate traffic.

!

ip access-group 121 in

serial restart_delay 0

!

ip classless

no ip http-server

!--- A syslog server is located at this address.

logging 192.168.27.131

!--- This command enables the logging of session !--- information (addresses and bytes). !--- Access list 20 is used to control which !--- network management stations can access via SNMP.

!

access-list 20 permit 192.168.27.5

!

!--- Use an access list to allow all legitimate traffic from !--- the inside network and prevent spoofing. The inside !--- network can only connect to the Telnet and POP3 !--- service of 192.168.27.3 on DMZ, and can ping (ICMP) to the DMZ. !--- Additional entries can be added to permit SMTP, WWW, and !--- so forth, if necessary. In addition, the inside network can !--- connect to any service on the Internet.

!

access-list 101 permit tcp 192.168.27.128 0.0.0.127 host 192.168.27.3 eq pop3

access-list 101 permit tcp 192.168.27.128 0.0.0.127 host 192.168.27.3 eq telnet

access-list 101 permit icmp 192.168.27.128 0.0.0.127 192.168.27.0 0.0.0.127

access-list 101 deny ip 192.168.27.128 0.0.0.127 192.168.27.0 0.0.0.127

access-list 101 permit ip 192.168.27.128 0.0.0.127 any

access-list 101 deny ip any any

!

!

!--- The access list permits ping (ICMP) from the DMZ and denies all !--- traffic initiated from the DMZ. Inspection opens !--- temporary entries to this list.

!

access-list 111 permit icmp 192.168.27.0 0.0.0.127 any

access-list 111 deny ip any any

!

!

!

!--- Access list 121 allows anyone on the Internet to connect to !--- WWW, FTP, DNS, and SMTP services on the DMZ host. It also !--- allows some ICMP traffic.

access-list 121 permit udp any host 192.168.27.3 eq domain

access-list 121 permit tcp any host 192.168.27.3 eq domain

access-list 121 permit tcp any host 192.168.27.3 eq www

access-list 121 permit tcp any host 192.168.27.3 eq ftp

access-list 121 permit tcp any host 192.168.27.3 eq smtp

access-list 121 permit icmp any 192.168.27.0 0.0.0.255 administratively-prohibited

access-list 121 permit icmp any 192.168.27.0 0.0.0.255 echo

access-list 121 permit icmp any 192.168.27.0 0.0.0.255 echo-reply

access-list 121 permit icmp any 192.168.27.0 0.0.0.255 packet-too-big

access-list 121 permit icmp any 192.169.27.0 0.0.0.255 time-exceeded

access-list 121 permit icmp any 192.168.27.0 0.0.0.255 traceroute

access-list 121 permit icmp any 192.168.27.0 0.0.0.255 unreachable

access-list 121 deny ip any any

!

!--- Apply access list 20 for SNMP process.

!

snmp-server community secret RO 20

snmp-server enable traps tty

!

call rsvp-sync

!

mgcp profile default

!

dial-peer cor custom

!

gatekeeper shutdown

!

line con 0

exec-timeout 5 0

password 7 14191D1815023F2036

login local

line vty 0 4

exec-timeout 5 0

password 7 14191D1815023F2036

login local

length 35

end

التحقق من الصحة

استخدم هذا القسم لتأكيد عمل التكوين بشكل صحيح.

تدعم أداة مترجم الإخراج (للعملاءالمسجلين فقط) بعض أوامر show. استخدم أداة مترجم الإخراج (OIT) لعرض تحليل مُخرَج الأمر show .

- show access-list—يتحقق من التكوين الصحيح لقوائم الوصول التي تم تكوينها في running-configuration.

Router#show access-list

Standard IP access list 20

10 permit 192.168.27.5

Extended IP access list 101

10 permit tcp 192.168.27.128 0.0.0.127 host 192.168.27.3 eq pop3

20 permit tcp 192.168.27.128 0.0.0.127 host 192.168.27.3 eq telnet

30 permit icmp 192.168.27.128 0.0.0.127 192.168.27.0 0.0.0.127

40 deny ip 192.168.27.128 0.0.0.127 192.168.27.0 0.0.0.127

50 permit ip 192.168.27.128 0.0.0.127 any

60 deny ip any any

Extended IP access list 111

10 permit icmp 192.168.27.0 0.0.0.127 any

20 deny ip any any (9 matches)

Extended IP access list 121

10 permit udp any host 192.168.27.3 eq domain

20 permit tcp any host 192.168.27.3 eq domain

30 permit tcp any host 192.168.27.3 eq www

40 permit tcp any host 192.168.27.3 eq ftp

50 permit tcp any host 192.168.27.3 eq smtp

60 permit icmp any 192.168.27.0 0.0.0.255 administratively-prohibited

70 permit icmp any 192.168.27.0 0.0.0.255 echo

80 permit icmp any 192.168.27.0 0.0.0.255 echo-reply

90 permit icmp any 192.168.27.0 0.0.0.255 packet-too-big

100 permit icmp any 192.169.27.0 0.0.0.255 time-exceeded

110 permit icmp any 192.168.27.0 0.0.0.255 traceroute

120 permit icmp any 192.168.27.0 0.0.0.255 unreachable

130 deny ip any any (4866 matches)

Router#

- show ip audit all—للتحقق من تكوين أوامر التسجيل.

Router#show ip audit all

Event notification through syslog is enabled

Event notification through Net Director is disabled

Default action(s) for info signatures is alarm

Default action(s) for attack signatures is alarm

Default threshold of recipients for spam signature is 250

PostOffice:HostID:0 OrgID:0 Msg dropped:0

:Curr Event Buf Size:0 Configured:100

Post Office is not enabled - No connections are active

Router#

- show ip inspection all—يتحقق من تكوين قواعد فحص جدار حماية Cisco IOS لكل واجهة.

Router#show ip inspect all

Session audit trail is enabled

Session alert is enabled

one-minute (sampling period) thresholds are [400:500] connections

max-incomplete sessions thresholds are [400:500]

max-incomplete tcp connections per host is 50. Block-time 0 minute.

tcp synwait-time is 30 sec -- tcp finwait-time is 5 sec

tcp idle-time is 14400 sec -- udp idle-time is 1800 sec

dns-timeout is 7 sec

Inspection Rule Configuration

Inspection name standard

cuseeme alert is on audit-trail is on timeout 14400

ftp alert is on audit-trail is on timeout 14400

h323 alert is on audit-trail is on timeout 14400

http alert is on audit-trail is on timeout 14400

rcmd alert is on audit-trail is on timeout 14400

realaudio alert is on audit-trail is on timeout 14400

smtp alert is on audit-trail is on timeout 14400

sqlnet alert is on audit-trail is on timeout 14400

streamworks alert is on audit-trail is on timeout 1800

tcp alert is on audit-trail is on timeout 14400

tftp alert is on audit-trail is on timeout 1800

udp alert is on audit-trail is on timeout 1800

vdolive alert is on audit-trail is on timeout 14400

Interface Configuration

Interface Ethernet3/0

Inbound inspection rule is standard

cuseeme alert is on audit-trail is on timeout 14400

ftp alert is on audit-trail is on timeout 14400

h323 alert is on audit-trail is on timeout 14400

http alert is on audit-trail is on timeout 14400

rcmd alert is on audit-trail is on timeout 14400

realaudio alert is on audit-trail is on timeout 14400

smtp alert is on audit-trail is on timeout 14400

sqlnet alert is on audit-trail is on timeout 14400

streamworks alert is on audit-trail is on timeout 1800

tcp alert is on audit-trail is on timeout 14400

tftp alert is on audit-trail is on timeout 1800

udp alert is on audit-trail is on timeout 1800

vdolive alert is on audit-trail is on timeout 14400

Outgoing inspection rule is not set

Inbound access list is 101

Outgoing access list is not set

Interface Ethernet3/1

Inbound inspection rule is not set

Outgoing inspection rule is standard

cuseeme alert is on audit-trail is on timeout 14400

ftp alert is on audit-trail is on timeout 14400

h323 alert is on audit-trail is on timeout 14400

http alert is on audit-trail is on timeout 14400

rcmd alert is on audit-trail is on timeout 14400

realaudio alert is on audit-trail is on timeout 14400

smtp alert is on audit-trail is on timeout 14400

sqlnet alert is on audit-trail is on timeout 14400

streamworks alert is on audit-trail is on timeout 1800

tcp alert is on audit-trail is on timeout 14400

tftp alert is on audit-trail is on timeout 1800

udp alert is on audit-trail is on timeout 1800

vdolive alert is on audit-trail is on timeout 14400

Inbound access list is 111

Outgoing access list is not set

Router#

استكشاف الأخطاء وإصلاحها

بعد تكوين موجه جدار حماية IOS، إذا لم تعمل الاتصالات، فتأكد من تمكين الفحص باستخدام الأمر ip inspection (name defined) in or out على الواجهة. في هذا التكوين، يتم تطبيق معيار فحص ip على واجهة إيثرنت 3/0 ويطبق خرج معيار فحص ip على واجهة إيثرنت 3/1.

راجع أستكشاف أخطاء تكوينات جدار حماية Cisco IOS وإصلاحها للحصول على مزيد من المعلومات حول أستكشاف الأخطاء وإصلاحها.

معلومات ذات صلة

- صفحة دعم جدار حماية Cisco IOS

- الدعم التقني والمستندات - Cisco Systems