المحتويات

المقدمة

معلومات أساسية

بنية الترخيص الذكي

الهندسة المعمارية الشاملة

تسمية

حالات الوكيل الذكي

إستحقاقات ASA

التكوين

تجاوز الأعطال (الإتاحة العالية)

دراسة حالة: ترخيص ASA HA على FP2100

مجموعة ASA

التحقق والتصحيح

هيكل (MIO) نموذج لمخرجات أوامر التحقق

عينة مخرجات ASA لأوامر التحقق

تسجيل ناجح

تخويل منتهي الصلاحية

نموذج للمخرجات من واجهة سطر الأوامر للهيكل

غير مسجل

التسجيل قيد التقدم

خطأ في التسجيل

فترة التقييم

مشكلات الترخيص الشائعة على هيكل FXOS (MIO)

خطأ في التسجيل: رمز مميز غير صالح

الخطوات الموصى بها

خطأ في التسجيل: المنتج مسجل بالفعل

الخطوات الموصى بها

خطأ في التسجيل: إزاحة التاريخ خارج الحد

الخطوة الموصى بها

خطأ في التسجيل: فشل في حل المضيف

الخطوات الموصى بها

خطأ في التسجيل: فشل في مصادقة الخادم

الخطوات الموصى بها

التحقق من واجهة سطر الأوامر (CLI)

خطأ في التسجيل: فشل نقل HTTP

الخطوات الموصى بها

خطأ في التسجيل: تعذر الاتصال بالمضيف

الخطوات الموصى بها

خطأ تسجيل: يقوم خادم HTTP بإرجاع رمز الخطأ >= 400

الخطوات الموصى بها

خطأ في التسجيل: فشل تحليل رسالة إستجابة الطرف الخلفي

الخطوات الموصى بها

مشاكل الترخيص على ASA - سلسلة 1xxx/21xx

خطأ في التسجيل: خطأ في إرسال رسالة الاتصال

الخطوات الموصى بها

الاحتياجات الخاصة للاستحقاقات الإضافية

حالة الاستحقاق أثناء عملية إعادة التشغيل

أستخدم دعم TAC من Cisco

الطراز FP41xx/FP9300

FP1xxx/FP21xx

الأسئلة المتكررة (FAQs)

معلومات ذات صلة

المقدمة

يصف هذا المستند ميزة الترخيص الذكي لأجهزة الأمان المعدلة (ASA) على نظام التشغيل القابل للتكيف (FXOS) Firepower.

معلومات أساسية

يستخدم الترخيص الذكي على FXOS عندما يكون هناك ASA مثبت على الهيكل. بالنسبة للدفاع عن تهديد FirePOWER (المعروف إختصارا باسم FTD) ومركز إدارة FirePOWER (FMC)، راجع الترخيص الذكي FMC وتسجيل الترخيص الذكي في FTD واستكشاف الأخطاء وإصلاحها.

يغطي هذا المستند بشكل رئيسي السيناريوهات التي يتمتع فيها هيكل FXOS بإمكانية الوصول المباشر إلى الإنترنت. إذا لم يتمكن هيكل FXOS من الوصول إلى الإنترنت، فأنت بحاجة إلى التفكير إما في خادم تابع أو في حجز ترخيص دائم (PLR). تحقق من دليل تكوين FXOS للحصول على مزيد من التفاصيل حول الإدارة دون اتصال.

بنية الترخيص الذكي

نظرة عامة عالية المستوى على مكونات الهيكل:

- تقوم كل من وحدات الإدخال/الإخراج الإدارية (MIO) والوحدات النمطية الفردية بأدوار في الترخيص الذكي

- لا تتطلب عمليات الحظر البحري نفسها أي تراخيص لتشغيلها

- يجب ترخيص تطبيق (تطبيقات) SA على كل وحدة نمطية

مشرف FXOS هو MIO. تحتوي قاعدة معلومات الإدارة (MIO) على ثلاثة مكونات رئيسية:

- عميل ذكي

- مدير الترخيص

- AppAG

الهندسة المعمارية الشاملة

تسمية

مدة

الوصف

سلطة تراخيص Cisco

خلفية ترخيص Cisco للترخيص الذكي. الاحتفاظ بجميع المعلومات المتعلقة بترخيص المنتج. ويتضمن ذلك الاستحقاقات ومعلومات الجهاز.

حساب الترخيص Smart

حساب به جميع مستحقات الجهاز.

معرف الرمز المميز

يتم إستخدام معرف لتمييز حساب الترخيص الذكي عند تسجيل الجهاز.

إستحقاق

ما يعادل الترخيص. يرادف ميزة فردية أو طبقة ميزات كاملة.

مفتاح تنشيط المنتج (PAK)

آلية الترخيص القديمة. مرتبط بجهاز واحد.

حالات الوكيل الذكي

الحالة

الوصف

غير مكون

لم يتم تمكين الترخيص الذكي.

غير محدد

تم تمكين الترخيص الذكي ولكن لم يتصل "العميل الذكي" بعد ب Cisco للتسجيل.

مسجل

اتصل الوكيل بسلطة ترخيص Cisco وسجل.

مُفوض

عندما يستلم العميل حالة عدم توافق إستجابة لطلب تفويض إستحقاق.

عدم التوافق (OOC)

عندما يستلم العميل حالة OC إستجابة لطلب تفويض الاستحقاق.

انتهت صلاحية التفويض

إذا لم يتصل الوكيل ب Cisco لمدة 90 يوما.

إستحقاقات ASA

هذه هي إستحقاقات ASA المدعومة:

- الطبقة القياسية

- سياق متعدد

- التشفير القوي (3DES)

- موفر الخدمة/التنقل (GTP)

التكوين

اتبع التعليمات الواردة في هذه المستندات:

- ترخيص البرامج الذكية (ASAv، ASA على FirePOWER)

- إدارة التراخيص ل ASA

قبل أي تكوين طبقة ميزات:

asa(config-smart-lic)# show license all

Smart licensing enabled: Yes

Compliance status: In compliance

Overall licensed status: Invalid (0)

No entitlements in use

Serial Number:  FCH12345ABC

License mode: Smart Licensing

Licensed features for this platform:

Maximum Physical Interfaces       : Unlimited

Maximum VLANs                     : 1024

Inside Hosts                      : Unlimited

Failover                          : Active/Active

Encryption-DES                    : Enabled

Encryption-3DES-AES               : Enabled

Security Contexts                 : 10

Carrier                           : Disabled

AnyConnect Premium Peers          : 20000

AnyConnect Essentials             : Disabled

Other VPN Peers                   : 20000

Total VPN Peers                   : 20000

AnyConnect for Mobile             : Enabled

AnyConnect for Cisco VPN Phone    : Enabled

Advanced Endpoint Assessment      : Enabled

Shared License                    : Disabled

Total TLS Proxy Sessions          : 15000

Cluster                           : Enabled

***************************************************************************

*                                 WARNING                                 *

*                                                                         *

*    THIS DEVICE IS NOT LICENSED WITH A VALID FEATURE TIER ENTITLEMENT    *

*                                                                         *

***************************************************************************

تكوين الطبقة القياسية:

asa(config)# license smart

INFO: License(s) corresponding to an entitlement will be activated only after an entitlement request has been authorized.

asa(config-smart-lic)# feature tier standard

asa(config-smart-lic)# show license all

Smart licensing enabled: Yes

Compliance status: In compliance

Overall licensed status: Authorized (3)

Entitlement(s):

Feature tier:

Tag: regid.2015-10.com.cisco.FIREPOWER_4100_ASA_STANDARD,1.0_7d7f5ee2-1398-4b0e-aced-b3f7fb1cacfc

Version: 1.0

Enforcement mode: Authorized

Handle: 1

Requested time: Tue, 04 Aug 2020 07:58:13 UTC

Requested count: 1

Request status: Complete

Serial Number: FCH12345ABC

License mode: Smart Licensing

Licensed features for this platform:

Maximum Physical Interfaces : Unlimited

Maximum VLANs : 1024

Inside Hosts : Unlimited

Failover : Active/Active

Encryption-DES : Enabled

Encryption-3DES-AES : Enabled

Security Contexts : 10

Carrier : Disabled

AnyConnect Premium Peers : 20000

AnyConnect Essentials : Disabled

Other VPN Peers : 20000

Total VPN Peers : 20000

AnyConnect for Mobile : Enabled

AnyConnect for Cisco VPN Phone : Enabled

Advanced Endpoint Assessment : Enabled

Shared License : Disabled

Total TLS Proxy Sessions : 15000

Clustetext

تجاوز الأعطال (الإتاحة العالية)

كما هو موثق في دليل تكوين ASA، يجب تسجيل كل وحدة FirePOWER مع سلطة الترخيص أو خادم قمر صناعي. تحقق من واجهة سطر الأوامر (CLI) الخاصة ب ASA:

asa# show failover | include host

This host: Primary - Active

Other host: Secondary - Standby Ready

asa# show license all

Smart licensing enabled: Yes

Compliance status: In compliance

Overall licensed status: Authorized (3)

Entitlement(s):

Feature tier:

Tag: regid.2015-10.com.cisco.FIREPOWER_4100_ASA_STANDARD,1.0_7d7f5ee2-1398-4b0e-aced-b3f7fb1cacfc

Version: 1.0

Enforcement mode: Authorized

Handle: 1

Requested time: Tue, 04 Aug 2020 07:58:13 UTC

Requested count: 1

Request status: Complete

Serial Number:  FCH12345ABC

License mode: Smart Licensing

Licensed features for this platform:

Maximum Physical Interfaces       : Unlimited

Maximum VLANs                     : 1024

Inside Hosts                      : Unlimited

Failover                          : Active/Active

Encryption-DES                    : Enabled

Encryption-3DES-AES               : Enabled

Security Contexts                 : 10

Carrier                           : Disabled

AnyConnect Premium Peers          : 20000

AnyConnect Essentials             : Disabled

Other VPN Peers                   : 20000

Total VPN Peers                   : 20000

AnyConnect for Mobile             : Enabled

AnyConnect for Cisco VPN Phone    : Enabled

Advanced Endpoint Assessment      : Enabled

Shared License                    : Disabled

Total TLS Proxy Sessions          : 15000

Cluster                           : Enabled

Failover cluster licensed features for this platform:

Maximum Physical Interfaces       : Unlimited

Maximum VLANs                     : 1024

Inside Hosts                      : Unlimited

Failover                          : Active/Active

Encryption-DES                    : Enabled

Encryption-3DES-AES               : Enabled

Security Contexts                 : 20

Carrier                           : Disabled

AnyConnect Premium Peers          : 20000

AnyConnect Essentials             : Disabled

Other VPN Peers                   : 20000

Total VPN Peers                   : 20000

AnyConnect for Mobile             : Enabled

AnyConnect for Cisco VPN Phone    : Enabled

Advanced Endpoint Assessment      : Enabled

Shared License                    : Disabled

Total TLS Proxy Sessions          : 15000

Cluster                           : Enabled

الوحدة الاحتياطية:

asa# show failover | i host

This host: Secondary - Standby Ready

Other host: Primary - Active

asa# show license all

Smart licensing enabled: Yes

Compliance status: In compliance

Overall licensed status: Not applicable in standby state

No entitlements in use

Serial Number:  FCH12455DEF

License mode: Smart Licensing

Licensed features for this platform:

Maximum Physical Interfaces       : Unlimited

Maximum VLANs                     : 1024

Inside Hosts                      : Unlimited

Failover                          : Active/Active

Encryption-DES                    : Enabled

Encryption-3DES-AES               : Disabled

Security Contexts                 : 10

Carrier                           : Disabled

AnyConnect Premium Peers          : 20000

AnyConnect Essentials             : Disabled

Other VPN Peers                   : 20000

Total VPN Peers                   : 20000

AnyConnect for Mobile             : Enabled

AnyConnect for Cisco VPN Phone    : Enabled

Advanced Endpoint Assessment      : Enabled

Shared License                    : Disabled

Total TLS Proxy Sessions          : 15000

Cluster                           : Enabled

Failover cluster licensed features for this platform:

Maximum Physical Interfaces       : Unlimited

Maximum VLANs                     : 1024

Inside Hosts                      : Unlimited

Failover                          : Active/Active

Encryption-DES                    : Enabled

Encryption-3DES-AES               : Enabled

Security Contexts                 : 20

Carrier                           : Disabled

AnyConnect Premium Peers          : 20000

AnyConnect Essentials             : Disabled

Other VPN Peers                   : 20000

Total VPN Peers                   : 20000

AnyConnect for Mobile             : Enabled

AnyConnect for Cisco VPN Phone    : Enabled

Advanced Endpoint Assessment      : Enabled

Shared License                    : Disabled

Total TLS Proxy Sessions          : 15000

Cluster                           : Enabled

دراسة حالة: ترخيص ASA HA على FP2100

- في 2100، يتصل ASA مع بوابة الترخيص الذكي (السحابة) من Cisco من خلال واجهات ASA، وليس إدارة FXOS

- ستحتاج إلى تسجيل كل من ASAs إلى مدخل الترخيص الذكي (السحابة) من Cisco

في هذه الحالة، يتم إستخدام مصادقة HTTP المحلية على واجهة خارجية:

ciscoasa(config)# show run http

http server enable

http 0.0.0.0 0.0.0.0 outside

ciscoasa(config)# show run aaa

aaa authentication http console LOCAL

ciscoasa(config)# show run username

username cisco password ***** pbkdf2

لا يمكنك الاتصال ب ASA عبر ASDM إلا إذا كان هناك ترخيص 3DES/AES ممكن. بالنسبة إلى ASA الذي لم يتم تسجيله بالفعل، يكون هذا ممكنا فقط على واجهة management-only. وفقا لدليل التكوين: يتوفر تشفير قوي (3DES/AES) لاتصالات الإدارة قبل الاتصال بجهة الترخيص أو خادم القمر الصناعي حتى يمكنك تشغيل ASDM. لاحظ أن وصول ASDM متوفر فقط على الواجهات الإدارية فقط مع التشفير الافتراضي. لا يتم السماح بحركة المرور من خلال المربع حتى تقوم بالاتصال والحصول على ترخيص التشفير القوي. في حالة مختلفة، تحصل على:

ciscoasa(config)# debug ssl 255

debug ssl enabled at level 255.

error:1408A0C1:SSL routines:ssl3_get_client_hello:no shared cipher

للتغلب على ASA لديه إدارة-فقط تم تكوينها على الواجهة التي تواجه الإنترنت وبالتالي يكون اتصال ASDM ممكنا:

interface Ethernet1/2

management-only

nameif outside

security-level 100

ip address 192.168.123.111 255.255.255.0 standby 192.168.123.112

تكوين الترخيص الذكي على ASA الأساسي:

انتقل إلى Monitoring > Properties > Smart License للتحقق من حالة التسجيل:

التحقق من واجهة سطر الأوامر (CLI) الأساسية ASA:

ciscoasa/pri/act# show license all

Smart Licensing Status

======================

Smart Licensing is ENABLED

Registration:

Status: REGISTERED

Smart Account: Cisco Systems, Inc.

Virtual Account: NGFW

Export-Controlled Functionality: Allowed

Initial Registration: SUCCEEDED on Nov 25 2020 16:43:59 UTC

Last Renewal Attempt: None

Next Renewal Attempt: May 24 2021 16:43:58 UTC

Registration Expires: Nov 25 2021 16:39:12 UTC

License Authorization:

Status: AUTHORIZED on Nov 25 2020 16:47:42 UTC

Last Communication Attempt: SUCCEEDED on Nov 25 2020 16:47:42 UTC

Next Communication Attempt: Dec 25 2020 16:47:41 UTC

Communication Deadline: Feb 23 2021 16:42:46 UTC

Utility:

Status: DISABLED

Data Privacy:

Sending Hostname: yes

Callhome hostname privacy: DISABLED

Smart Licensing hostname privacy: DISABLED

Version privacy: DISABLED

Transport:

Type: Callhome

License Usage

==============

Firepower 2100 ASA Standard (FIREPOWER_2100_ASA_STANDARD):

Description: Firepower 2100 ASA Standard

Count: 1

Version: 1.0

Status: AUTHORIZED

Product Information

===================

UDI: PID:FPR-2140,SN:JAD12345ABC

Agent Version

=============

Smart Agent for Licensing: 4.3.6_rel/38

ciscoasa/pri/act# show run license

license smart

feature tier standard

ciscoasa/pri/act# show license features

Serial Number: JAD12345ABC

Export Compliant: YES

License mode: Smart Licensing

Licensed features for this platform:

Maximum Physical Interfaces : Unlimited

Maximum VLANs : 1024

Inside Hosts : Unlimited

Failover : Active/Active

Encryption-DES : Enabled

Encryption-3DES-AES : Enabled

Security Contexts : 2

Carrier : Disabled

AnyConnect Premium Peers : 10000

AnyConnect Essentials : Disabled

Other VPN Peers : 10000

Total VPN Peers : 10000

AnyConnect for Mobile : Enabled

AnyConnect for Cisco VPN Phone : Enabled

Advanced Endpoint Assessment : Enabled

Shared License : Disabled

Total TLS Proxy Sessions : 10000

Cluster : Disabled

Failover cluster licensed features for this platform:

Maximum Physical Interfaces : Unlimited

Maximum VLANs : 1024

Inside Hosts : Unlimited

Failover : Active/Active

Encryption-DES : Enabled

Encryption-3DES-AES : Enabled

Security Contexts : 4

Carrier : Disabled

AnyConnect Premium Peers : 10000

AnyConnect Essentials : Disabled

Other VPN Peers : 10000

Total VPN Peers : 10000

AnyConnect for Mobile : Enabled

AnyConnect for Cisco VPN Phone : Enabled

Advanced Endpoint Assessment : Enabled

Shared License : Disabled

Total TLS Proxy Sessions : 10000

Cluster : Disabled

الاتصال عبر ASDM ب ASA في وضع الاستعداد (لا يكون ذلك ممكنا إلا إذا تم تكوين ASA باستخدام IP في وضع الاستعداد). يتم عرض ASA الاحتياطي على أنه UNREGISTERED  وهذا متوقع نظرا لأنه لم يتم تسجيله بعد في مدخل الترخيص الذكي:

يوضح ASA CLI (واجهة سطر الأوامر) في وضع الاستعداد:

ciscoasa/sec/stby# show license all

Smart Licensing Status

======================

Smart Licensing is ENABLED

Registration:

Status: UNREGISTERED

Export-Controlled Functionality: Not Allowed

License Authorization:

Status: No Licenses in Use

Utility:

Status: DISABLED

Data Privacy:

Sending Hostname: yes

Callhome hostname privacy: DISABLED

Smart Licensing hostname privacy: DISABLED

Version privacy: DISABLED

Transport:

Type: Callhome

License Usage

==============

No licenses in use

Product Information

===================

UDI: PID:FPR-2140,SN:JAD123456A

Agent Version

=============

Smart Agent for Licensing: 4.3.6_rel/38

ciscoasa/sec/stby# show run license

license smart

feature tier standard

ميزات الترخيص التي تم تمكينها على ASA في وضع الاستعداد:

ciscoasa/sec/stby# show license features

Serial Number: JAD123456A

Export Compliant: NO

License mode: Smart Licensing

Licensed features for this platform:

Maximum Physical Interfaces : Unlimited

Maximum VLANs : 1024

Inside Hosts : Unlimited

Failover : Active/Active

Encryption-DES : Enabled

Encryption-3DES-AES : Disabled

Security Contexts : 2

Carrier : Disabled

AnyConnect Premium Peers : 10000

AnyConnect Essentials : Disabled

Other VPN Peers : 10000

Total VPN Peers : 10000

AnyConnect for Mobile : Enabled

AnyConnect for Cisco VPN Phone : Enabled

Advanced Endpoint Assessment : Enabled

Shared License : Disabled

Total TLS Proxy Sessions : 10000

Cluster : Disabled

Failover cluster licensed features for this platform:

Maximum Physical Interfaces : Unlimited

Maximum VLANs : 1024

Inside Hosts : Unlimited

Failover : Active/Active

Encryption-DES : Enabled

Encryption-3DES-AES : Enabled

Security Contexts : 4

Carrier : Disabled

AnyConnect Premium Peers : 10000

AnyConnect Essentials : Disabled

Other VPN Peers : 10000

Total VPN Peers : 10000

AnyConnect for Mobile : Enabled

AnyConnect for Cisco VPN Phone : Enabled

Advanced Endpoint Assessment : Enabled

Shared License : Disabled

Total TLS Proxy Sessions : 10000

Cluster : Disabled

تسجيل ASA الاحتياطي:

النتيجة على ASA في وضع الاستعداد هي أنه REGISTERED:

التحقق من واجهة سطر الأوامر (CLI) على ASA في وضع الاستعداد:

ciscoasa/sec/stby# show license all

Smart Licensing Status

======================

Smart Licensing is ENABLED

Registration:

Status: REGISTERED

Smart Account: Cisco Systems, Inc.

Virtual Account: NGFW

Export-Controlled Functionality: Allowed

Initial Registration: SUCCEEDED on Nov 25 2020 17:06:51 UTC

Last Renewal Attempt: None

Next Renewal Attempt: May 24 2021 17:06:51 UTC

Registration Expires: Nov 25 2021 17:01:47 UTC

License Authorization:

Status: AUTHORIZED on Nov 25 2020 17:07:28 UTC

Last Communication Attempt: SUCCEEDED on Nov 25 2020 17:07:28 UTC

Next Communication Attempt: Dec 25 2020 17:07:28 UTC

Communication Deadline: Feb 23 2021 17:02:15 UTC

Utility:

Status: DISABLED

Data Privacy:

Sending Hostname: yes

Callhome hostname privacy: DISABLED

Smart Licensing hostname privacy: DISABLED

Version privacy: DISABLED

Transport:

Type: Callhome

License Usage

==============

No licenses in use

Product Information

===================

UDI: PID:FPR-2140,SN:JAD123456AX

Agent Version

=============

Smart Agent for Licensing: 4.3.6_rel/38

ciscoasa/sec/stby# show license feature

Serial Number: JAD123456A

Export Compliant: YES

License mode: Smart Licensing

Licensed features for this platform:

Maximum Physical Interfaces : Unlimited

Maximum VLANs : 1024

Inside Hosts : Unlimited

Failover : Active/Active

Encryption-DES : Enabled

Encryption-3DES-AES : Enabled

Security Contexts : 2

Carrier : Disabled

AnyConnect Premium Peers : 10000

AnyConnect Essentials : Disabled

Other VPN Peers : 10000

Total VPN Peers : 10000

AnyConnect for Mobile : Enabled

AnyConnect for Cisco VPN Phone : Enabled

Advanced Endpoint Assessment : Enabled

Shared License : Disabled

Total TLS Proxy Sessions : 10000

Cluster : Disabled

Failover cluster licensed features for this platform:

Maximum Physical Interfaces : Unlimited

Maximum VLANs : 1024

Inside Hosts : Unlimited

Failover : Active/Active

Encryption-DES : Enabled

Encryption-3DES-AES : Enabled

Security Contexts : 4

Carrier : Disabled

AnyConnect Premium Peers : 10000

AnyConnect Essentials : Disabled

Other VPN Peers : 10000

Total VPN Peers : 10000

AnyConnect for Mobile : Enabled

AnyConnect for Cisco VPN Phone : Enabled

Advanced Endpoint Assessment : Enabled

Shared License : Disabled

Total TLS Proxy Sessions : 10000

Cluster : Disabled

مجموعة ASA

إذا كانت الأجهزة غير متوافقة مع الترخيص، فلن يتم تكوين نظام المجموعة:

Cluster unit unit-1-1 transitioned from DISABLED to CONTROL

New cluster member unit-2-1 rejected due to encryption license mismatch

إعداد نظام مجموعة ناجح:

asa(config)# cluster group GROUP1

asa(cfg-cluster)# enable

Removed all entitlements except per-unit entitlement configuration before joining cluster as data unit.

Detected Cluster Control Node.

Beginning configuration replication from Control Node.

.

Cryptochecksum (changed): ede485ad d7fb9644 2847deaf ba16830b

End configuration replication from Control Node.

عقدة التحكم في نظام المجموعة:

asa# show cluster info | i state

This is "unit-1-1" in state CONTROL_NODE

Unit "unit-2-1" in state DATA_NODE

asa# show license all

Smart licensing enabled: Yes

Compliance status: In compliance

Overall licensed status: Authorized (3)

Entitlement(s):

Feature tier:

Tag: regid.2015-10.com.cisco.FIREPOWER_4100_ASA_STANDARD,1.0_7d7f5ee2-1398-4b0e-aced-b3f7fb1cacfc

Version: 1.0

Enforcement mode: Authorized

Handle: 2

Requested time: Mon, 10 Aug 2020 08:12:38 UTC

Requested count: 1

Request status: Complete

Serial Number:  FCH12345ABC

License mode: Smart Licensing

Licensed features for this platform:

Maximum Physical Interfaces       : Unlimited

Maximum VLANs                     : 1024

Inside Hosts                      : Unlimited

Failover                          : Active/Active

Encryption-DES                    : Enabled

Encryption-3DES-AES               : Enabled

Security Contexts                 : 10

Carrier                           : Disabled

AnyConnect Premium Peers          : 20000

AnyConnect Essentials             : Disabled

Other VPN Peers                   : 20000

Total VPN Peers                   : 20000

AnyConnect for Mobile             : Enabled

AnyConnect for Cisco VPN Phone    : Enabled

Advanced Endpoint Assessment      : Enabled

Shared License                    : Disabled

Total TLS Proxy Sessions          : 15000

Cluster                           : Enabled

Failover cluster licensed features for this platform:

Maximum Physical Interfaces       : Unlimited

Maximum VLANs                     : 1024

Inside Hosts                      : Unlimited

Failover                          : Active/Active

Encryption-DES                    : Enabled

Encryption-3DES-AES               : Enabled

Security Contexts                 : 20

Carrier                           : Disabled

AnyConnect Premium Peers          : 20000

AnyConnect Essentials             : Disabled

Other VPN Peers                   : 20000

Total VPN Peers                   : 20000

AnyConnect for Mobile             : Enabled

AnyConnect for Cisco VPN Phone    : Enabled

Advanced Endpoint Assessment      : Enabled

Shared License                    : Disabled

Total TLS Proxy Sessions          : 15000

Cluster                           : Enabled

وحدة بيانات نظام المجموعة:

asa# show cluster info | i state

This is "unit-2-1" in state DATA_NODE

Unit "unit-1-1" in state CONTROL_NODE

asa# show license all

Smart licensing enabled: Yes

Compliance status: In compliance

Overall licensed status: Authorized (3)

Entitlement(s):

Strong encryption:

Tag: regid.2015-10.com.cisco.FIREPOWER_4100_ASA_ENCRYPTION,1.0_052986db-c5ad-40da-97b1-ee0438d3b2c9

Version: 1.0

Enforcement mode: Authorized

Handle: 3

Requested time: Mon, 10 Aug 2020 07:29:45 UTC

Requested count: 1

Request status: Complete

Serial Number:  FCH12345A6B

License mode: Smart Licensing

Licensed features for this platform:

Maximum Physical Interfaces       : Unlimited

Maximum VLANs                     : 1024

Inside Hosts                      : Unlimited

Failover                          : Active/Active

Encryption-DES                    : Enabled

Encryption-3DES-AES               : Enabled

Security Contexts                 : 10

Carrier                           : Disabled

AnyConnect Premium Peers          : 20000

AnyConnect Essentials             : Disabled

Other VPN Peers                   : 20000

Total VPN Peers                   : 20000

AnyConnect for Mobile             : Enabled

AnyConnect for Cisco VPN Phone    : Enabled

Advanced Endpoint Assessment      : Enabled

Shared License                    : Disabled

Total TLS Proxy Sessions          : 15000

Cluster                           : Enabled

Failover cluster licensed features for this platform:

Maximum Physical Interfaces       : Unlimited

Maximum VLANs                     : 1024

Inside Hosts                      : Unlimited

Failover                          : Active/Active

Encryption-DES                    : Enabled

Encryption-3DES-AES               : Enabled

Security Contexts                 : 20

Carrier                           : Disabled

AnyConnect Premium Peers          : 20000

AnyConnect Essentials             : Disabled

Other VPN Peers                   : 20000

Total VPN Peers                   : 20000

AnyConnect for Mobile             : Enabled

AnyConnect for Cisco VPN Phone    : Enabled

Advanced Endpoint Assessment      : Enabled

Shared License                    : Disabled

Total TLS Proxy Sessions          : 15000

Cluster                           : Enabled

التحقق والتصحيح

الهيكل (MIO) ملخص أوامر التحقق من الصحة:

FPR4125# show license all

FPR4125# show license techsupport

FPR4125# scope monitoring

FPR4125 /monitoring # scope callhome

FPR4125 /monitoring/callhome # show expand

FPR4125# scope system

FPR4125 /system # scope services

FPR4125 /system/services # show dns

FPR4125 /system/services # show ntp-server

FPR4125# scope security

FPR4125 /security # show trustpoint

FPR4125# show clock

FPR4125# show timezone

FPR4125# show license usage

التحقق من التكوين:

FPR4125-1# scope system

FPR4125-1 /system # scope services

FPR4125-1 /system/services # show configuration

ملخص أوامر التحقق من ASA:

asa# show run license

asa# show license all

asa# show license entitlement

asa# show license features

asa# show tech-support license

asa# debug license 255

هيكل (MIO) نموذج لمخرجات أوامر التحقق

FPR4125-1# show license all

Smart Licensing Status

======================

Smart Licensing is ENABLED

Registration:

Status: REGISTERED

Smart Account: TAC Cisco Systems, Inc.

Virtual Account: EU TAC

Export-Controlled Functionality: ALLOWED

Initial Registration: SUCCEEDED on Dec 10 2018 23:30:02 UTC

Last Renewal Attempt: SUCCEEDED on Mar 12 2020 23:16:11 UTC

Next Renewal Attempt: Sep 08 2020 23:16:10 UTC

Registration Expires: Mar 12 2021 23:11:09 UTC

License Authorization:

Status: AUTHORIZED on Aug 04 2020 07:58:46 UTC

Last Communication Attempt: SUCCEEDED on Aug 04 2020 07:58:46 UTC

Next Communication Attempt: Sep 03 2020 07:58:45 UTC

Communication Deadline: Nov 02 2020 07:53:44 UTC

License Conversion:

Automatic Conversion Enabled: True

Status: Not started

Export Authorization Key:

Features Authorized:

<none>

Utility:

Status: DISABLED

Data Privacy:

Sending Hostname: yes

Callhome hostname privacy: DISABLED

Smart Licensing hostname privacy: DISABLED

Version privacy: DISABLED

Transport:

Type: Callhome

License Usage

==============

Firepower 4100 ASA Standard (FIREPOWER_4100_ASA_STANDARD):

Description: Firepower 4100 ASA Standard

Count: 1

Version: 1.0

Status: AUTHORIZED

Export status: NOT RESTRICTED

Product Information

===================

UDI: PID:FPR-4125-SUP,SN:JAD12345678

Agent Version

=============

Smart Agent for Licensing: 4.6.9_rel/104

Reservation Info

================

License reservation: DISABLED

FPR4125-1# scope monitoring

FPR4125-1 /monitoring # scope callhome

FPR4125-1 /monitoring/callhome # show expand

Callhome:

Admin State: Off

Throttling State: On

Contact Information:

Customer Contact Email:

From Email:

Reply To Email:

Phone Contact e.g., +1-011-408-555-1212:

Street Address:

Contract Id:

Customer Id:

Site Id:

Switch Priority: Debugging

Enable/Disable HTTP/HTTPS Proxy: Off

HTTP/HTTPS Proxy Server Address:

HTTP/HTTPS Proxy Server Port: 80

SMTP Server Address:

SMTP Server Port: 25

Anonymous Reporting:

Admin State

-----------

Off

Callhome periodic system inventory:

Send periodically: Off

Interval days: 30

Hour of day to send: 0

Minute of hour: 0

Time last sent: Never

Next scheduled: Never

Destination Profile:

Name: full_txt

Level: Warning

Alert Groups: All,Cisco Tac,Diagnostic,Environmental

Max Size: 5000000

Format: Full Txt

Reporting: Smart Call Home Data

Name: short_txt

Level: Warning

Alert Groups: All,Cisco Tac,Diagnostic,Environmental

Max Size: 5000000

Format: Short Txt

Reporting: Smart Call Home Data

Name: SLProfile

Level: Normal

Alert Groups: Smart License

Max Size: 5000000

Format: Xml

Reporting: Smart License Data

Destination:

Name Transport Protocol Email or HTTP/HTTPS URL Address

---------- ------------------ -------------------------------

SLDest Https https://tools.cisco.com/its/service/oddce/services/DDCEService

FPR4125-1# scope system

FPR4125-1 /system # scope services

FPR4125-1 /system/services # show dns

Domain Name Servers:

IP Address: 172.16.200.100

FPR4125-1 /system/services # show ntp-server

NTP server hostname:

Name                                                             Time Sync Status

---------------------------------------------------------------- ----------------

10.62.148.75                                                     Unreachable Or Invalid Ntp Server

172.18.108.14                                                    Time Synchronized

172.18.108.15                                                    Candidate

FPR4125-1# scope security

FPR4125-1 /security # show trustpoint

Trustpoint Name: CHdefault

Trustpoint certificate chain: -----BEGIN CERTIFICATE-----

MIIFtzCCA5+gAwIBAgICBQkwDQYJKoZIhvcNAQEFBQAwRTELMAkGA1UEBhMCQk0x

…

8eOx79+Rj1QqCyXBJhnEUhAFZdWCEOrCMc0u

-----END CERTIFICATE-----

Cert Status: Valid

Trustpoint Name: CiscoLicRoot

Trustpoint certificate chain: -----BEGIN CERTIFICATE-----

MIIDITCCAgmgAwIBAgIBATANBgkqhkiG9w0BAQsFADAyMQ4wDAYDVQQKEwVDaXNj

…

QYYWqUCT4ElNEKt1J+hvc5MuNbWIYv2uAnUVb3GbsvDWl99/KA==

-----END CERTIFICATE-----

Cert Status: Valid

Trustpoint Name: CSCO2099SUDI

Trustpoint certificate chain: -----BEGIN CERTIFICATE-----

MIIDITCCAgmgAwIBAgIJAZozWHjOFsHBMA0GCSqGSIb3DQEBCwUAMC0xDjAMBgNV

…

PKkmBlNQ9hQcNM3CSzVvEAK0CCEo/NJ/xzZ6WX1/f8Df1eXbFg==

-----END CERTIFICATE-----

Cert Status: Valid

Trustpoint Name: CSCOBA2099SUDI

Trustpoint certificate chain: -----BEGIN CERTIFICATE-----

MIIDQTCCAimgAwIBAgIJAaZa8V7plOvhMA0GCSqGSIb3DQEBCwUAMD0xDjAMBgNV

…

b/JPEAZkbji0RQTWLyfR82LWFLo0

-----END CERTIFICATE-----

Cert Status: Valid

FPR4125-1# show clock

Tue Aug  4 09:55:50 UTC 2020

FPR4125-1# show timezone

Timezone:

FPR4125-1# scope system

FPR4125-1 /system # scope services

FPR4125-1 /system/services # show configuration

scope services

create ssh-server host-key rsa

delete ssh-server host-key ecdsa

disable ntp-authentication

disable telnet-server

enable https

enable ssh-server

enter dns 192.0.2.100

enter ip-block 0.0.0.0 0 https

exit

enter ip-block 0.0.0.0 0 ssh

exit

enter ntp-server 10.62.148.75

set ntp-sha1-key-id 0

!       set ntp-sha1-key-string

exit

enter ntp-server 172.18.108.14

set ntp-sha1-key-id 0

!       set ntp-sha1-key-string

exit

enter ntp-server 172.18.108.15

set ntp-sha1-key-id 0

!       set ntp-sha1-key-string

exit

scope shell-session-limits

set per-user 32

set total 32

exit

scope telemetry

disable

exit

scope web-session-limits

set per-user 32

set total 256

exit

set domain-name ""

set https auth-type cred-auth

set https cipher-suite "ALL:!DHE-PSK-AES256-CBC-SHA:!EDH-RSA-DES-CBC3-SHA:!

EDH-DSS-DES-CBC3-SHA:!DES-CBC3-SHA:!ADH:!3DES:!EXPORT40:!EXPORT56:!LOW:!MEDIUM:!NULL:!RC4:!MD5:!IDEA:+HIGH:+EXP"

set https cipher-suite-mode high-strength

set https crl-mode strict

set https keyring default

set https port 443

set ssh-server host-key ecdsa secp256r1

set ssh-server host-key rsa 2048

set ssh-server kex-algorithm diffie-hellman-group14-sha1

set ssh-server mac-algorithm hmac-sha1 hmac-sha2-256 hmac-sha2-512

set ssh-server encrypt-algorithm aes128-cbc aes128-ctr aes192-cbc aes192-ctr aes256-cbc aes256-ctr chacha20-poly1305_openssh_com

set ssh-server rekey-limit volume none time none

set ssh-client kex-algorithm diffie-hellman-group14-sha1

set ssh-client mac-algorithm hmac-sha1 hmac-sha2-256 hmac-sha2-512

set ssh-client encrypt-algorithm aes128-ctr aes192-ctr aes256-ctr

set ssh-client rekey-limit volume none time none

set ssh-client stricthostkeycheck disable

set timezone ""

exit

FPR4125-1# show license usage

License Authorization:

Status: AUTHORIZED on Aug 04 2020 07:58:46 UTC

Firepower 4100 ASA Standard (FIREPOWER_4100_ASA_STANDARD):

Description: Firepower 4100 ASA Standard

Count: 1

Version: 1.0

Status: AUTHORIZED

Export status: NOT RESTRICTED

عينة مخرجات ASA لأوامر التحقق

asa# show run license

license smart

feature tier standard

asa# show license all

Smart licensing enabled: Yes

Compliance status: In compliance

Overall licensed status: Authorized (3)

Entitlement(s):

Feature tier:

Tag: regid.2015-10.com.cisco.FIREPOWER_4100_ASA_STANDARD,1.0_7d7f5ee2-1398-4b0e-aced-b3f7fb1cacfc

Version: 1.0

Enforcement mode: Authorized

Handle: 1

Requested time: Tue, 04 Aug 2020 07:58:13 UTC

Requested count: 1

Request status: Complete

Serial Number:  FCH12345ABC

License mode: Smart Licensing

Licensed features for this platform:

Maximum Physical Interfaces       : Unlimited

Maximum VLANs                     : 1024

Inside Hosts                      : Unlimited

Failover                          : Active/Active

Encryption-DES                    : Enabled

Encryption-3DES-AES               : Enabled

Security Contexts                 : 10

Carrier                           : Disabled

AnyConnect Premium Peers          : 20000

AnyConnect Essentials             : Disabled

Other VPN Peers                   : 20000

Total VPN Peers                   : 20000

AnyConnect for Mobile             : Enabled

AnyConnect for Cisco VPN Phone    : Enabled

Advanced Endpoint Assessment      : Enabled

Shared License                    : Disabled

Total TLS Proxy Sessions          : 15000

Cluster                           : Enabled

asa# show license entitlement

Entitlement(s):

Feature tier:

Tag: regid.2015-10.com.cisco.FIREPOWER_4100_ASA_STANDARD,1.0_7d7f5ee2-1398-4b0e-aced-b3f7fb1cacfc

Version: 1.0

Enforcement mode: Authorized

Handle: 1

Requested time: Tue, 04 Aug 2020 07:58:13 UTC

Requested count: 1

Request status: Complete

asa# show license features

Serial Number:  FCH12345ABC

License mode: Smart Licensing

Licensed features for this platform:

Maximum Physical Interfaces       : Unlimited

Maximum VLANs                     : 1024

Inside Hosts                      : Unlimited

Failover                          : Active/Active

Encryption-DES                    : Enabled

Encryption-3DES-AES               : Enabled

Security Contexts                 : 10

Carrier                           : Disabled

AnyConnect Premium Peers          : 20000

AnyConnect Essentials             : Disabled

Other VPN Peers                   : 20000

Total VPN Peers                   : 20000

AnyConnect for Mobile             : Enabled

AnyConnect for Cisco VPN Phone    : Enabled

Advanced Endpoint Assessment      : Enabled

Shared License                    : Disabled

Total TLS Proxy Sessions          : 15000

Cluster                           : Enabled

asa#  show tech-support license

Smart licensing enabled: Yes

Compliance status: In compliance

Overall licensed status: Authorized (3)

Entitlement(s):

Feature tier:

Tag: regid.2015-10.com.cisco.FIREPOWER_4100_ASA_STANDARD,1.0_7d7f5ee2-1398-4b0e-aced-b3f7fb1cacfc

Version: 1.0

Enforcement mode: Authorized

Handle: 1

Requested time: Tue, 04 Aug 2020 07:58:13 UTC

Requested count: 1

Request status: Complete

تسجيل ناجح

المخرج من واجهة مستخدم مدير الهيكل (UI):

Smart Licensing is ENABLED

Utility:

Status: DISABLED

Data Privacy:

Sending Hostname: yes

Callhome hostname privacy: DISABLED

Smart Licensing hostname privacy: DISABLED

Version privacy: DISABLED

Transport:

Type: Callhome

Registration:

Status: REGISTERED

Smart Account: TAC Cisco Systems, Inc.

Virtual Account: EU TAC

Export-Controlled Functionality: ALLOWED

Initial Registration: SUCCEEDED on Dec 10 2018 23:30:02 UTC

Last Renewal Attempt: SUCCEEDED on Mar 12 2020 23:16:11 UTC

Next Renewal Attempt: Sep 08 2020 23:16:10 UTC

Registration Expires: Mar 12 2021 23:11:09 UTC

License Authorization:

Status: AUTHORIZED on Jul 05 2020 17:49:15 UTC

Last Communication Attempt: SUCCEEDED on Jul 05 2020 17:49:15 UTC

Next Communication Attempt: Aug 04 2020 17:49:14 UTC

Communication Deadline: Oct 03 2020 17:44:13 UTC

License Conversion:

Automatic Conversion Enabled: True

Status: Not started

Export Authorization Key:

Features Authorized:

<none>

Cisco Success Network: DISABLED

تخويل منتهي الصلاحية

الخرج من واجهة مستخدم مدير الهيكل:

Smart Licensing is ENABLED

Utility:

Status: DISABLED

Data Privacy:

Sending Hostname: yes

Callhome hostname privacy: DISABLED

Smart Licensing hostname privacy: DISABLED

Version privacy: DISABLED

Transport:

Type: Callhome

Registration:

Status: REGISTERED

Smart Account: Cisco SVS temp - request access through licensing@cisco.com

Virtual Account: Sample Account

Export-Controlled Functionality: ALLOWED

Initial Registration: SUCCEEDED on Nov 22 2019 08:17:30 UTC

Last Renewal Attempt: FAILED on Aug 04 2020 07:32:08 UTC

Failure reason: Agent received a failure status in a response message. Please check the Agent log file for the detailed message.

Next Renewal Attempt: Aug 04 2020 08:33:48 UTC

Registration Expires: Nov 21 2020 08:12:20 UTC

License Authorization:

Status: AUTH EXPIRED on Aug 04 2020 07:10:16 UTC

Last Communication Attempt: FAILED on Aug 04 2020 07:10:16 UTC

Failure reason: Data and signature do not match

Next Communication Attempt: Aug 04 2020 08:10:14 UTC

Communication Deadline: DEADLINE EXCEEDED

License Conversion:

Automatic Conversion Enabled: True

Status: Not started

Export Authorization Key:

Features Authorized:

<none>

Last Configuration Error

=========================

Command : register idtoken ZDA2MjFlODktYjllMS00NjQwLTk0MmUtYmVkYWU2NzIyZjYwLTE1ODIxODY2%0AMzEwODV8K2RWVTNURGFIK0tDYUhOSjg3bjFsdytwbU1SUi81N20rQTVPN2lT%0AdEtvYz0%3D%0A

Error : Smart Agent already registered

Cisco Success Network: DISABLED

نموذج للمخرجات من واجهة سطر الأوامر للهيكل

غير مسجل

firepower# show license all

Smart Licensing Status

======================

Smart Licensing is ENABLED

Registration:

Status: UNREGISTERED

License Authorization:

Status: No Licenses in Use

License Usage

==============

No licenses in use

Product Information

===================

UDI: PID:F9K-C9300-SUP-K9,SN:JAD12345678

Agent Version

=============

Smart Agent for Licensing: 1.2.2_throttle/6

التسجيل قيد التقدم

firepower# scope license

firepower /license # register idtoken

firepower /license # show license all

Smart Licensing Status

======================

Smart Licensing is ENABLED

Registration:

Status: UNREGISTERED - REGISTRATION PENDING

Initial Registration: First Attempt Pending

License Authorization:

Status: No Licenses in Use

License Usage

==============

No licenses in use

Product Information

===================

UDI: PID:F9K-C9300-SUP-K9,SN:JAD12345678

Agent Version

=============

Smart Agent for Licensing: 1.2.2_throttle/6

خطأ في التسجيل

firepower /license # show license all

Smart Licensing Status

======================

Smart Licensing is ENABLED

Registration:

Status: UNREGISTERED - REGISTRATION FAILED

Initial Registration: FAILED on Aug 04 04:46:47 2020 UTC

Failure reason: HTTP transport failed

License Authorization:

Status: No Licenses in Use

License Usage

==============

No licenses in use

Product Information

===================

UDI: PID:F9K-C9300-SUP-K9,SN:JAD12345678

Agent Version

=============

Smart Agent for Licensing: 1.2.2_throttle/6

فترة التقييم

firepower# show license all

Smart Licensing Status

======================

Smart Licensing is ENABLED

Registration:

Status: REGISTERING - REGISTRATION IN PROGRESS

Initial Registration: FAILED on Aug 04 04:46:47 2020 UTC

Next Registration Attempt: Aug 04 05:06:16 2020 UTC

License Authorization:

Status: EVALUATION MODE

Evaluation Period Remaining: 89 days, 14 hours, 26 minutes, 20 seconds

License Usage

==============

(ASA-SSP-STD):

Description:

Count: 1

Version: 1.0

Status: EVALUATION MODE

Product Information

===================

UDI: PID:F9K-C9300-SUP-K9,SN:JAD12345678

Agent Version

=============

Smart Agent for Licensing: 1.2.2_throttle/6

مشكلات الترخيص الشائعة على هيكل FXOS (MIO)

خطأ في التسجيل: رمز مميز غير صالح

FPR4125-1# show license all

Smart Licensing Status

======================

Smart Licensing is ENABLED

Registration:

Status: UNREGISTERED - REGISTRATION FAILED

Export-Controlled Functionality: NOT ALLOWED

Initial Registration: FAILED on Aug 07 2020 06:39:24 UTC

Failure reason: {"token":["The token 'ODNmNTExMTAtY2YzOS00Mzc1LWEzNWMtYmNiMm

UyNzM4ZmFjLTE1OTkxMTkz%0ANDk0NjR8NkJJdWZpQzRDbmtPR0xBWlVpUzZqMjlySnl5QUczT2M0YVI

vcmxm%0ATGczND0%3D%0B' is not valid."]}

الخطوات الموصى بها

1. تحقق مما إذا كان عنوان URL الخاص بالاتصال بالمنزل يشير إلى CSSM.

2. قم بتسجيل الدخول إلى CSSM وتحقق مما إذا كان الرمز المميز قد تم إنشاؤه من هناك أو إذا انتهت صلاحية الرمز المميز.

خطأ في التسجيل: المنتج مسجل بالفعل

FPR4125-1# show license all

Smart Licensing Status

======================

Smart Licensing is ENABLED

Registration:

Status: UNREGISTERED - REGISTRATION FAILED

Export-Controlled Functionality: Not Allowed

Initial Registration: FAILED on Aug 07 01:30:00 2020 UTC

Failure reason: {"sudi":["The product 'firepower.com.cisco.

FPR9300,1.0_ed6dadbe-c965-4aeb-ab58-62e34033b453' and sudi {\"suvi\"=>nil,

\"uuid\"=>nil, \"host_identifier\"=>nil, \"udi_pid\"=>\"FPR9K-SUP\",

\"udi_serial_number\"=>\"JAD1234567S\", \"udi_vid\"=>nil, \"mac_address\"=>nil}

have already been registered."]}

الخطوات الموصى بها

1. تسجيل الدخول إلى CSSM.

2. تحقق من Product Instances علامة التبويب في كافة الحسابات الظاهرية.

3. حدد موقع مثيل التسجيل القديم بواسطة SN وقم بإزالته.

4. قد يرجع السبب في هذا الأمر إلى الأمرين التاليين:

1. فشل التجديد التلقائي عند عدم إعداد الوقت/التاريخ بشكل صحيح، على سبيل المثال، لم يتم تكوين خادم NTP.

2. ترتيب العمليات غير صحيح عند التبديل بين قمر صناعي وخادم إنتاج، على سبيل المثال، قم بتغيير عنوان URL أولا ثم قم بإصدار "إلغاء التسجيل"

خطأ في التسجيل: إزاحة التاريخ خارج الحد

FPR4125-1# show license all

Smart Licensing Status

======================

Smart Licensing is ENABLED

Registration:

Status: UNREGISTERED - REGISTRATION FAILED

Export-Controlled Functionality: Not Allowed

Initial Registration: FAILED on Aug 07 01:30:00 2020 UTC

Failure reason: {"timestamp":["The device date '1453329321505' is offset beyond the allowed tolerance limit."]}

الخطوة الموصى بها

تحقق من تكوين الوقت/التاريخ لضمان تكوين خادم NTP.

خطأ في التسجيل: فشل في حل المضيف

FPR4125-1# show license all

Smart Licensing Status

======================

Smart Licensing is ENABLED

Registration:

Status: REGISTERING - REGISTRATION IN PROGRESS

Export-Controlled Functionality: NOT ALLOWED

Initial Registration: FAILED on Aug 07 2020 06:58:46 UTC

Failure reason: Failed to resolve host

Next Registration Attempt: Aug 07 2020 07:16:42 UTC

Registration Error: Failed to resolve host

الخطوات الموصى بها

1. تحقق مما إذا كان عنوان URL ل SLDest الخاص بجهة الاتصال صحيحا (scope monitoring > scope callhome > show expand)

2. تحقق مما إذا كان تكوين خادم MIO DNS صحيحا، على سبيل المثال، من CLI:

FPR4125-1# scope system

FPR4125-1 /system # scope services

FPR4125-1 /system/services # show dns

Domain Name Servers:

IP Address: 172.31.200.100

3. حاول إختبار الاتصال من خلال واجهة سطر الأوامر (CLI) الخاصة بالهيكل tools.cisco.com و شوفو إذا بيقرر:

FPR4125-1# connect local-mgmt

FPR4125-1(local-mgmt)# ping tools.cisco.com

4. حاول إختبار الاتصال من CLI الهيكل خادم DNS:

FPR4125-1# connect local-mgmt

FPR4125-1(local-mgmt)# ping 172.31.200.100

PING 172.31.200.100 (172.31.200.100) from 10.62.148.225 eth0: 56(84) bytes of data.

^C

--- 172.31.200.100 ping statistics ---

4 packets transmitted, 0 received, 100% packet loss, time 3001ms

5. قم بتمكين الالتقاط على واجهة إدارة الهيكل (MIO) (وهذا ينطبق فقط على FP41xx/FP93xx) وتحقق من اتصال DNS وأنت تقوم بتشغيل إختبار إختبار اتصال إلى tools.cisco.com:

FPR4125-1# connect fxos

FPR4125-1(fxos)# ethanalyzer local interface mgmt capture-filter "udp port 53" limit-captured-frames 0 limit-frame-size 10000

Capturing on 'eth0'

1 2020-08-07 08:10:45.252955552 10.62.148.225 → 172.31.200.100 DNS 75 Standard query 0x26b4 A tools.cisco.com

2 2020-08-07 08:10:47.255015331 10.62.148.225 → 172.31.200.100 DNS 75 Standard query 0x26b4 A tools.cisco.com

3 2020-08-07 08:10:49.257160749 10.62.148.225 → 172.31.200.100 DNS 75 Standard query 0x5019 A tools.cisco.com

4 2020-08-07 08:10:51.259222753 10.62.148.225 → 172.31.200.100 DNS 75 Standard query 0x5019 A tools.cisco.com

خطأ في التسجيل: فشل في مصادقة الخادم

FPR4125-1# show license all

Smart Licensing Status

======================

Smart Licensing is ENABLED

Registration:

Status: UNREGISTERED - REGISTRATION FAILED

Export-Controlled Functionality: Not Allowed

Initial Registration: FAILED on Aug 07 2020 06:58:46 UTC

Failure reason: Failed to authenticate server

الخطوات الموصى بها

1. التحقق مما إذا كانت الشهادة الصحيحة الخاصة ب MIO TrustPoint DEFAULT، على سبيل المثال:

FPR4125-1# scope security

FPR4125-1 /security # show trustpoint

Trustpoint Name: CHdefault

Trustpoint certificate chain: -----BEGIN CERTIFICATE-----

MIIFtzCCA5+gAwIBAgICBQkwDQYJKoZIhvcNAQEFBQAwRTELMAkGA1UEBhMCQk0x

...

8eOx79+Rj1QqCyXBJhnEUhAFZdWCEOrCMc0u

-----END CERTIFICATE-----

Cert Status: Valid

2. تحقق مما إذا تم تعيين خادم NTP والمنطقة الزمنية بشكل صحيح. يحتاج التحقق من الشهادة إلى نفس الوقت بين الخادم والعميل. ولإنجاز ذلك، أستخدم بروتوكول وقت الشبكة (NTP) لمزامنة الوقت. على سبيل المثال، التحقق من واجهة مستخدم FXOS:

التحقق من واجهة سطر الأوامر (CLI)

FPR4125-1# scope system

FPR4125-1 /system # scope services

FPR4125-1 /system/services # show ntp-server

NTP server hostname:

Name                                                   Time Sync Status

------------------------------------------------------ ----------------

10.62.148.75                                           Unreachable Or Invalid Ntp Server

172.18.108.14                                          Time Synchronized

172.18.108.15                                          Candidate

قم بتمكين التقاط اتصال TCP (HTTPS) والتحقق منه بين MIO و tools.cisco.com. هنا لديك بعض الخيارات:

- يمكنك إغلاق جلسة عمل HTTPS إلى واجهة مستخدم FXOS ثم تعيين عامل تصفية التقاط على CLI ل HTTPS، على سبيل المثال:

FPR4100(fxos)# ethanalyzer local interface mgmt capture-filter "tcp port 443" limit-captured-frames 50

Capturing on eth0

2017-01-12 13:09:44.296256 10.62.148.37 -> 72.163.4.38  TCP 43278 > https [SYN] Seq=0 Len=0 MSS=1460 TSV=206433871 TSER=0 WS=9

2017-01-12 13:09:44.452405  72.163.4.38 -> 10.62.148.37 TCP https > 43278 [SYN,ACK] Seq=0 Ack=1 Win=32768 Len=0 MSS=1380 TSV=2933962056 TSER=206433871

2017-01-12 13:09:44.452451 10.62.148.37 -> 72.163.4.38  TCP 43278 > https [ACK] Seq=1 Ack=1 Win=5840 Len=0 TSV=206433887 TSER=2933962056

2017-01-12 13:09:44.453219 10.62.148.37 -> 72.163.4.38  SSL Client Hello

2017-01-12 13:09:44.609171  72.163.4.38 -> 10.62.148.37 TCP https > 43278 [ACK] Seq=1 Ack=518 Win=32251 Len=0 TSV=2933962263 TSER=206433887

2017-01-12 13:09:44.609573  72.163.4.38 -> 10.62.148.37 SSL Continuation Data

2017-01-12 13:09:44.609595 10.62.148.37 -> 72.163.4.38  TCP 43278 > https [ACK] Seq=518 Ack=1369 Win=8208 Len=0 TSV=206433902 TSER=2933962264

2017-01-12 13:09:44.609599  72.163.4.38 -> 10.62.148.37 SSL Continuation Data

2017-01-12 13:09:44.609610 10.62.148.37 -> 72.163.4.38  TCP 43278 > https [ACK] Seq=518 Ack=2737 Win=10944 Len=0 TSV=206433902 TSER=2933962264

- وبالإضافة إلى ذلك، إذا كنت تريد إبقاء واجهة مستخدم FXOS مفتوحة، يمكنك تحديد في التقاط عناوين IP للوجهة (72.163.4.38 و 173.37.145.8 هي tools.cisco.com الخوادم في وقت كتابة هذا المقال). كما يوصى بشدة بحفظ الالتقاط بتنسيق PCAP والتحقق منه في Wireshark. هذا مثال على تسجيل ناجح:

FPR4125-1(fxos)# ethanalyzer local interface mgmt capture-filter "tcp port 443 and (host 72.163.4.38 or host 173.37.145.8)" limit-captured-frames 0 limit-frame-size 10000 write workspace:///SSL.pcap

Capturing on 'eth0'

1 2020-08-07 08:39:02.515693672 10.62.148.225 → 173.37.145.8 TCP 74 59818 → 443 [SYN] Seq=0 Win=29200 Len=0 MSS=1460 SACK_PERM=1 TSval=800212367 TSecr=0 WS=512

2 2020-08-07 08:39:02.684723361 173.37.145.8 → 10.62.148.225 TCP 60 443 → 59818 [SYN, ACK] Seq=0 Ack=1 Win=8190 Len=0 MSS=1330

3 2020-08-07 08:39:02.684825625 10.62.148.225 → 173.37.145.8 TCP 54 59818 → 443 [ACK] Seq=1 Ack=1 Win=29200 Len=0

4 2020-08-07 08:39:02.685182942 10.62.148.225 → 173.37.145.8 TLSv1 571 Client Hello

…

11 2020-08-07 08:39:02.854525349 10.62.148.225 → 173.37.145.8 TCP 54 59818 → 443 [ACK] Seq=518 Ack=3991 Win=37240 Len=0

- لتصدير ملف PCAP إلى خادم FTP بعيد:

FPR4125-1# connect local-mgmt

FPR4125-1(local-mgmt)# dir

1 56936 Aug 07 08:39:35 2020 SSL.pcap

1    29 May 06 17:48:02 2020 blade_debug_plugin

1    19 May 06 17:48:02 2020 bladelog

1    16 Dec 07 17:24:43 2018 cores

2  4096 Dec 07 17:28:46 2018 debug_plugin/

1    31 Dec 07 17:24:43 2018 diagnostics

2  4096 Dec 07 17:22:28 2018 lost+found/

1    25 Dec 07 17:24:31 2018 packet-capture

2  4096 Sep 24 07:05:40 2019 techsupport/

Usage for workspace://

3999125504 bytes total

284364800 bytes used

3509907456 bytes free

FPR4125-1(local-mgmt)# copy workspace:///SSL.pcap ftp://ftp_user@10.62.148.41/SSL.pcap

Password:

FPR4125-1(local-mgmt)#

خطأ في التسجيل: فشل نقل HTTP

FPR4125-1# show license all

Smart Licensing Status

======================

Smart Licensing is ENABLED

Registration:

Status: UNREGISTERED - REGISTRATION FAILED

Export-Controlled Functionality: Not Allowed

Initial Registration: FAILED on Aug 07 2020 06:58:46 UTC

Failure reason: HTTP transport failed

الخطوات الموصى بها

1. تحقق مما إذا كان عنوان URL الخاص بالاتصال بالمنزل صحيحا أم لا. يمكنك التحقق من هذا من واجهة مستخدم FXOS أو واجهة سطر الأوامر (scope monitoring > show callhome detail expand).

2. قم بتمكين التقاط اتصال TCP (HTTPS) والتحقق منه بين MIO و tools.cisco.com كما هو موضح في قسم "فشل مصادقة الخادم" في هذا المستند.

خطأ في التسجيل: تعذر الاتصال بالمضيف

FPR4125-1# show license all

Smart Licensing Status

======================

Smart Licensing is ENABLED

Registration:

Status: UNREGISTERED - REGISTRATION FAILED

Export-Controlled Functionality: Not Allowed

Initial Registration: FAILED on Aug 07 2020 06:58:46 UTC

Failure reason: Couldn't connect to host

الخطوات الموصى بها

1. إذا تم تمكين تكوين وكيل، فتحقق من تكوين عنوان URL للوكيل والمنفذ بشكل صحيح.

2. قم بتمكين التقاط اتصال TCP (HTTPS) والتحقق منه بين MIO و tools.cisco.com كما هو موضح في قسم "فشل مصادقة الخادم" في هذا المستند.

خطأ تسجيل: يقوم خادم HTTP بإرجاع رمز الخطأ >= 400

FPR4125-1# show license all

Smart Licensing Status

======================

Smart Licensing is ENABLED

Registration:

Status: UNREGISTERED - REGISTRATION FAILED

Export-Controlled Functionality: Not Allowed

Initial Registration: FAILED on Aug 07 2020 06:58:46 UTC

Failure reason: HTTP server returns error code >= 400. Contact proxy server admin if proxy configuration is enabled

الخطوات الموصى بها

1. في حالة تمكين تكوين وكيل، اتصل بمسؤول الخادم الوكيل حول إعدادات الوكيل.

2. قم بتمكين التقاط اتصال TCP (HTTPS) والتحقق منه بين MIO و tools.cisco.com كما هو موضح في قسم "فشل مصادقة الخادم" في هذا المستند. حاول التسجيل مرة أخرى ('force' option) من واجهة سطر الأوامر (CLI) ل FXOS:

FPR4125-1 /license # register idtoken ODNmNTExMTAtY2YzOS00Mzc1LWEzNWMtYmNiMmUyNzM4ZmFjLTE1OTkxMTkz%0ANDk0NjR8NkJJdWZpQzRDbmtPR0xBWlVpUzZqMjlySnl5QUczT2M0YVIvcmxm%0ATGczND0%3D%0A force

خطأ في التسجيل: فشل تحليل رسالة إستجابة الطرف الخلفي

FPR4125-1# show license all

Smart Licensing Status

======================

Smart Licensing is ENABLED

Registration:

Status: UNREGISTERED - REGISTRATION FAILED

Export-Controlled Functionality: Not Allowed

Initial Registration: FAILED on Aug 07 2020 06:58:46 UTC

Failure reason: Parsing backend response message failed

الخطوات الموصى بها

1. محاولات إعادة المحاولة التلقائية لاحقا. أستخدم "تجديد" لإعادة المحاولة فورا.

FPR4125-1# scope license

FPR4125-1 /license # scope licdebug

FPR4125-1 /license/licdebug # renew

2. تحقق مما إذا كان عنوان URL الخاص بجهة الاتصال الرئيسية صحيحا.

مشاكل الترخيص على ASA - سلسلة 1xxx/21xx

خطأ في التسجيل: خطأ في إرسال رسالة الاتصال

ciscoasa# show license all

Smart Licensing Status

======================

Smart Licensing is ENABLED

Registration:

Status: REGISTERING - REGISTRATION IN PROGRESS

Export-Controlled Functionality: NOT ALLOWED

Initial Registration: FAILED on Aug 07 2020 11:29:42 UTC

Failure reason: Communication message send error

Next Registration Attempt: Aug 07 2020 11:46:13 UTC

الخطوات الموصى بها

1. تحقق من إعدادات DNS

ciscoasa# show run dns

2. حاول إختبار الاتصال tools.cisco.com. في هذه الحالة، يتم إستخدام واجهة الإدارة:

ciscoasa# ping management tools.cisco.com

^

ERROR: % Invalid Hostname

3. تحقق من جدول التوجيه:

ciscoasa# show route management-only

تأكد من تمكين الترخيص، على سبيل المثال:

ciscoasa# show run license

license smart

feature tier standard

feature strong-encryption

4. تمكين التقاط الواجهة التي تتجه نحو tools.cisco.com (إذا قمت بأخذ الالتقاط بدون أي عوامل تصفية IP تأكد من عدم وجود ASDM مفتوح عندما تقوم بالالتقاط لتجنب ضجيج الالتقاط غير الضروري).

ciscoasa# capture CAP interface management match tcp any any eq 443

تحذير: يمكن أن يكون لالتقاط الحزم تأثير ضار على الأداء.

5. قم بتمكين المستوى 7 (debug) من Syslog مؤقتا وفحص رسائل ASA Syslog أثناء عملية التسجيل:

ciscoasa(config)# logging buffer-size 10000000

ciscoasa(config)# logging buffered  7

ciscoasa(config)# logging enable

ciscoasa# show logging

%ASA-7-717025: Validating certificate chain containing 3 certificate(s).

%ASA-7-717029: Identified client certificate within certificate chain. serial number: 3000683B0F7504F7B244B3EA7FC00927E960D735, subject name: CN=tools.cisco.com,O=Cisco Systems\, Inc.,L=San Jose,ST=CA,C=US.

%ASA-7-717030: Found a suitable trustpoint _SmartCallHome_ServerCA to validate certificate.

%ASA-6-717028: Certificate chain was successfully validated with warning, revocation status was not checked.

%ASA-6-717022: Certificate was successfully validated. serial number: 3000683B0F7504F7B244B3EA7FC00927E960D735, subject name:  CN=tools.cisco.com,O=Cisco Systems\, Inc.,L=San Jose,ST=CA,C=US.

%ASA-6-725002: Device completed SSL handshake with server management:10.62.148.184/22258 to 173.37.145.8/443 for TLSv1.2 session

حاول التسجيل مرة أخرى:

ciscoasa # license smart register idtoken

force

الاحتياجات الخاصة للاستحقاقات الإضافية

- يلزم الحصول على إستحقاق طبقة ميزات صالح قبل تكوين أي إستحقاق وظيفة إضافية

- يجب إصدار جميع الاستحقاقات الإضافية قبل إصدار إستحقاق طبقة الميزات

حالة الاستحقاق أثناء عملية إعادة التشغيل

- يتم حفظ حالات الاستحقاق في الذاكرة المؤقتة

- أثناء وقت التمهيد، تتم قراءة هذه المعلومات من ذاكرة Flash (الذاكرة المؤقتة) ويتم تعيين التراخيص استنادا إلى وضع الإنفاذ المحفوظ

- يتم تطبيق تكوين بدء التشغيل استنادا إلى معلومات الاستحقاق هذه المخزنة مؤقتا

- يتم طلب الاستحقاقات مرة أخرى بعد كل إعادة تشغيل

أستخدم دعم TAC من Cisco

الطراز FP41xx/FP9300

إذا فشلت جميع العناصر المذكورة في هذا المستند، فعليك تجميع هذه المخرجات من واجهة سطر الأوامر الخاصة بالهيكل والاتصال ب Cisco TAC:

الناتج 1:

FPR4125-1# show license techsupport

الناتج 2:

FPR4125-1# scope monitoring

FPR4125-1 /monitoring # scope callhome

FPR4125-1 /monitoring/callhome # show detail expand

الناتج 3:

حزمة دعم هيكل FXOS

FPR4125-1# connect local-mgmt

FPR4125-1(local-mgmt)# show tech-support chassis 1 detail

الناتج 4 (موصى به بشدة):

التقاط الإيثاناليزر من واجهة سطر الأوامر (CLI) للهيكل

FP1xxx/FP21xx

الناتج 1:

ciscoasa# show tech-support license

الناتج 2:

ciscoasa# connect fxos admin

firepower-2140# connect local-mgmt

firepower-2140(local-mgmt)# show tech-support fprm detail

الأسئلة المتكررة (FAQs)

في الطراز FP21xx أين تقع علامة التبويب "الترخيص" في واجهة المستخدم الرسومية (GUI) الخاصة بالهيكل (FCM)؟

اعتبارا من 9. 13.x، يدعم FP21xx وضعي ASA:

- جهاز

- النظام الأساسي

في وضع الجهاز، لا توجد واجهة مستخدم للهيكل. في وضع النظام الأساسي، هناك واجهة مستخدم للهيكل، ولكن تم تكوين الترخيص من واجهة سطر الأوامر (CLI) الخاصة ب ASA أو ASDM.

ومن ناحية أخرى، على منصات FPR4100/9300، يجب تكوين الترخيص في FCM عبر واجهة المستخدم الرسومية (GUI) أو واجهة سطر الأوامر (CLI) الخاصة ب FXOS ويجب طلب مستحقات ASA من واجهة سطر الأوامر (CLI) الخاصة ب ASA أو ASDM.

المراجع:

- إدارة التراخيص ل ASA

- الأجهزة المنطقية ل Firepower 4100/9300

- التراخيص: ترخيص البرامج الذكية (ASAv، ASA on FirePOWER)

- نشر وضع النظام الأساسي ASA مع ASDM و FirePOWER Chassis Manager

كيف يمكنك تمكين ترخيص تشفير قوي؟

يتم تمكين هذه الوظيفة تلقائيا إذا كان للرمز المميز المستخدم في تسجيل FCM خيار السماح بوظائف التحكم في التصدير على المنتجات المسجلة مع تمكين هذا الرمز المميز.

كيف يمكنك تمكين ترخيص تشفير قوي إذا تم تعطيل الميزات التي يتم التحكم فيها عن طريق التصدير على مستوى FCM وما يتصل بذلك من تشفير-3DES-AES على مستوى ASA؟

إذا لم يتم تمكين هذا الخيار على الرمز المميز، فقم بإلغاء تسجيل FCM وقم بتسجيله مرة أخرى باستخدام رمز مميز تم تمكين هذا الخيار به.

ماذا يمكنك أن تفعل إذا لم يتوفر خيار السماح بوظائف التحكم في التصدير للمنتجات المسجلة مع هذا الرمز المميز عند إنشاء الرمز المميز؟

اتصل بفريق حساب Cisco.

هل هو إلزامي لتكوين ميزة التشفير القوي على مستوى ASA؟

يكون خيار ميزة التشفير القوي إلزاميا فقط إذا تم دمج FCM مع خادم قمر صناعي pre-2.3.0. هذا سيناريو واحد فقط عندما يجب تكوين هذه الميزة.

ما هي بروتوكولات IP التي يجب السماح بها في المسار بين إدارة قاعدة معلومات الإدارة (FCM) وسحابة الترخيص الذكي؟

يستخدم FXOS العنوان https://tools.cisco.com/ (المنفذ 443) للاتصال بسحابة الترخيص. تم حل العنوان https://tools.cisco.com/ إلى عناوين IP التالية:

- 72.163.4.38

- 173.37.145.8

لماذا تحصل على خطأ عدم التوافق؟

يمكن أن يصبح الجهاز خارج نطاق التوافق في هذه الحالات:

- الاستخدام الزائد (يستخدم الجهاز تراخيص غير متوفرة)

- انتهاء صلاحية الترخيص - انتهت صلاحية الترخيص المستند إلى الوقت

- نقص الاتصال - يتعذر على الجهاز الوصول إلى سلطة الترخيص لإعادة الترخيص

للتحقق مما إذا كان حسابك في حالة عدم توافق أو الاقتراب منها، يجب مقارنة الاستحقاقات المستخدمة حاليا من قبل هيكل FirePOWER مع تلك الموجودة في حسابك الذكي.

في حالة عدم التوافق، يمكنك إجراء تغييرات التكوين على الميزات التي تتطلب تراخيص خاصة، ولكن لا تتأثر العملية بأية طريقة أخرى. على سبيل المثال، يستمر تشغيل سياقات حد الترخيص القياسي الموجودة بالفعل، ويمكنك تعديل التكوين الخاص بها، ولكن لا يمكنك إضافة سياق جديد.

لماذا لا تزال تعاني من خطأ في عدم التوافق بعد إضافة التراخيص؟

وبشكل افتراضي، يتواصل الجهاز مع "سلطة الترخيص" كل 30 يوما للتحقق من الاستحقاقات. إذا كنت ترغب في تشغيله يدويا، يجب عليك اتباع الخطوات التالية:

بالنسبة للأنظمة الأساسية FPR1000/2100، يجب القيام بذلك عبر ASDM أو عبر CLI (واجهة سطر الأوامر):

ASA# license smart renew auth

بالنسبة لمنصات FPR4100/9300، يجب القيام بذلك عبر واجهة سطر الأوامر (CLI) لنظام FXOS:

FP4100# scope system

FP4100 /system # scope license

FP4100 /license # scope licdebug

FP4100 /license/licdebug # renew

لماذا لا يوجد ترخيص قيد الاستخدام على مستوى ASA؟

تأكد من تكوين إستحقاق ASA على مستوى ASA، على سبيل المثال:

ASA(config)# license smart

ASA(config-smart-lic)# feature tier standard

لماذا لا تزال التراخيص غير مستخدمة حتى بعد تكوين إستحقاق ASA؟

تكون هذه الحالة متوقعة إذا قمت بنشر زوج ASA Active/Standby لتجاوز الأعطال وتتحقق من إستخدام الترخيص على الجهاز الاحتياطي.

وفقا لدليل التكوين، يتم نسخ التكوين نسخا متماثلا إلى الوحدة الاحتياطية، ولكن الوحدة الاحتياطية لا تستخدم التكوين، وتظل في حالة التخزين المؤقت. تطلب الوحدة النشطة فقط التراخيص من الخادم. ويتم تجميع التراخيص في ترخيص واحد لتجاوز الفشل تتم مشاركته بواسطة زوج تجاوز الفشل، كما يتم تخزين هذا الترخيص المجمع مؤقتا على الوحدة الاحتياطية التي سيتم إستخدامها إذا أصبحت الوحدة النشطة في المستقبل. للرجوع إليه: تراخيص نظام مجموعة ASA أو تجاوز الأعطال.

ما الذي يمكنك فعله إذا لم يكن لدى FCM حق الوصول إلى الإنترنت؟

كبديل، يمكنك نشر مدير البرنامج الذكي من Cisco على PREM (المعروف سابقا باسم القمر الصناعي لمدير البرنامج الذكي من Cisco). هذا مكون في الترخيص الذكي من Cisco الذي يعمل بالاقتران مع مدير البرنامج الذكي من Cisco. وهو يوفر إمكانية رؤية في الوقت الفعلي تقريبا، كما يوفر إمكانات التقارير لتراخيص Cisco التي تشتريها وتستهلكها. كما يمنح المؤسسات الحساسة للأمان طريقة للوصول إلى مجموعة فرعية من وظائف Cisco SSM دون إستخدام اتصال إنترنت مباشر لإدارة قاعدة التثبيت الخاصة بها.

أين يمكنك العثور على مزيد من المعلومات حول مدير البرامج الذكية من Cisco على الكمبيوتر المحمول؟

يمكنك العثور على هذه المعلومات في دليل تكوين FXOS:

- تكوين خادم قمر صناعي للترخيص الذكي لهيكل Firepower 4100/9300

- تكوين تسجيل مدير هيكل FirePOWER إلى مدير برامج Smart على الإعداد

معلومات ذات صلة

- دليل تكوين واجهة سطر الأوامر للعمليات العامة Cisco ASA Series General Operations CLI

- إدارة التراخيص ل ASA

- الدعم التقني والمستندات - Cisco Systems