المحتويات

المقدمة

المتطلبات الأساسية

المتطلبات

المكونات المستخدمة

الاصطلاحات

معلومات أساسية

التكوين

الرسم التخطيطي للشبكة

تكوين IPSec باستخدام منفذ وصول أو خط اتصال من الطبقة 2

تكوين IPSec باستخدام منفذ موجه

التحقق من الصحة

استكشاف الأخطاء وإصلاحها

أوامر استكشاف الأخطاء وإصلاحها

معلومات ذات صلة

المقدمة

يصف هذا المستند كيفية إنشاء نفق IPSec LAN إلى LAN بين محول من السلسلة Cisco Catalyst 6500 Series مع الوحدة النمطية للخدمة (W) IPSec وجدار حماية Cisco PIX.

المتطلبات الأساسية

المتطلبات

لا توجد متطلبات خاصة لهذا المستند.

المكونات المستخدمة

تستند المعلومات الواردة في هذا المستند إلى إصدارات البرامج والمكونات المادية التالية:

- برنامج IOS® الإصدار 12.2(14)SY2 من Cisco ل Catalyst 6000 Series Supervisor Engine، مع الوحدة النمطية لخدمة IPSec VPN

- برنامج جدار حماية Cisco PIX، الإصدار 6.3(3)

تم إنشاء المعلومات الواردة في هذا المستند من الأجهزة الموجودة في بيئة معملية خاصة. بدأت جميع الأجهزة المُستخدمة في هذا المستند بتكوين ممسوح (افتراضي). إذا كانت شبكتك مباشرة، فتأكد من فهمك للتأثير المحتمل لأي أمر.

الاصطلاحات

للحصول على مزيد من المعلومات حول اصطلاحات المستندات، ارجع إلى اصطلاحات تلميحات Cisco التقنية.

معلومات أساسية

تحتوي الوحدة النمطية لخدمة Catalyst 6500 VPN Service module على منفذي Gigabit Ethernet (GE) بدون موصلات ظاهرة خارجيا. هذه المنافذ قابلة للتوجيه لأغراض التكوين فقط. المنفذ 1 هو دائما المنفذ الداخلي. يعالج هذا المنفذ حركة مرور البيانات من الشبكة الداخلية وإليها. يعالج الميناء الثاني (ميناء 2) كل حركة مرور من وإلى ال WAN أو الشبكات الخارجية. يتم تكوين هذين المنفذين دائما في وضع التوصيل 802.1Q. تستخدم الوحدة النمطية لخدمة VPN تقنية تسمى التضاريس في السلك (BITW) لتدفق الحزمة.

تتم معالجة الحزم بواسطة زوج من شبكات VLAN، وطبقة واحدة من الطبقة 3 داخل شبكة VLAN وطبقة واحدة من الطبقة 2 خارج شبكة VLAN. يتم توجيه الحزم، من الداخل إلى الخارج، من خلال طريقة تسمى منطق التعرف على العنوان المشفر (EARL) إلى شبكة VLAN الداخلية. بعد تشفير الحزم، تستخدم الوحدة النمطية لخدمة VPN الشبكة المحلية الظاهرية (VLAN) المقابلة خارج VLAN. في عملية فك التشفير، يتم ربط الحزم من الخارج إلى الداخل إلى الوحدة النمطية لخدمة VPN باستخدام شبكة VLAN الخارجية. بعد أن تقوم الوحدة النمطية لخدمة VPN بفك تشفير الحزمة وتخطيط شبكة VLAN إلى الشبكة المحلية الظاهرية (VLAN) المقابلة داخل، يقوم إيرل بتوجيه الحزمة إلى منفذ LAN المناسب. جمعت الطبقة 3 داخل VLAN والطبقة 2 خارج VLANs مع ال crypto يربط vlan أمر. هناك ثلاثة نوع الميناء في المادة حفازة 6500 sery مفتاح:

- المنافذ الموجهة- بشكل افتراضي، يتم توجيه جميع منافذ الإيثرنت في Cisco IOS. تحتوي هذه المنافذ على شبكة VLAN مخفية مرتبطة بها.

- منافذ الوصول— تحتوي هذه المنافذ على شبكة محلية ظاهرية (VLAN) خارجية أو بروتوكول خط اتصال شبكات VLAN (VTP) مرتبط بها. أنت يستطيع صحبت أكثر من واحد ميناء إلى VLAN يعين.

- منافذ خطوط الاتصال— تحمل هذه المنافذ العديد من شبكات VLAN الخارجية أو VTP، والتي يتم على أساسها تضمين جميع الحزم باستخدام رأس 802.1Q.

التكوين

في هذا القسم، تُقدّم لك معلومات تكوين الميزات الموضحة في هذا المستند.

ملاحظة: أستخدم أداة بحث الأوامر (للعملاء المسجلين فقط) للعثور على مزيد من المعلومات حول الأوامر المستخدمة في هذا المستند.

الرسم التخطيطي للشبكة

يستخدم هذا المستند إعداد الشبكة التالي:

تكوين IPSec باستخدام منفذ وصول أو خط اتصال من الطبقة 2

قم بإجراء هذه الخطوات لتكوين IPSec باستخدام التعليمات الخاصة بمنفذ وصول أو خط اتصال للطبقة 2 للواجهة المادية الخارجية.

1. أضفت ال VLANs داخلي إلى الميناء داخلي من ال VPN خدمة وحدة نمطية.

افترضت أن ال VPN خدمة وحدة نمطية على شق مكان 4. أستخدم شبكة VLAN 100 كشبكة VLAN الداخلية وشبكة VLAN 209 كشبكة VLAN الخارجية. شكلت ال VPN خدمة وحدة نمطية GE ميناء مثل هذا:

interface GigabitEthernet4/1

no ip address

flowcontrol receive on

flowcontrol send off

switchport

switchport trunk encapsulation dot1q

switchport trunk allowed vlan 1,100,1002-1005

switchport mode trunk

cdp enable

interface GigabitEthernet4/2

no ip address

flowcontrol receive on

flowcontrol send off

switchport

switchport trunk encapsulation dot1q

switchport trunk allowed vlan 1,209,1002-1005

switchport mode trunk

cdp enable

spanning-tree portfast trunk

2. أضفت ال VLAN 100 قارن والقارن حيث النفق يكون أنهيت (أي، في هذه الحالة، قارن VLAN 209، كما هو موضح هنا).

interface Vlan100

ip address 10.66.79.180 255.255.255.224

interface Vlan209

no ip address

crypto connect vlan 100

3. قم بتكوين المنفذ المادي الخارجي كمنفذ وصول أو خط اتصال (في هذه الحالة، FastEthernet 2/48، كما هو موضح هنا).

!--- This is the configuration that uses an access port.

interface FastEthernet2/48

no ip address

switchport

switchport access vlan 209

switchport mode access

!--- This is the configuration that uses a trunk port.

interface FastEthernet2/48

no ip address switchport

switchport trunk encapsulation dot1q

switchport mode trunk

4. قم بإنشاء NAT الالتفافي. قم بإضافة هذه الإدخالات إلى جملة NAT بدون إستثناء الحد الفاصل بين هذه الشبكات:

access-list inside_nat0_outbound permit ip 192.168.5.0 0.0.0.255

192.168.6.0 0.0.0.255

global (outside) 1 interface

nat (inside) 0 access-list inside_nat0_outbound

nat (inside) 1 192.168.5.0 255.255.255.0

5. قم بإنشاء تكوين التشفير وقائمة التحكم في الوصول (ACL) التي تحدد حركة المرور التي سيتم تشفيرها.

1. قم بإنشاء قائمة تحكم في الوصول (ACL) للتشفير (في هذه الحالة، ACL 100 - حركة مرور مثيرة للاهتمام) التي تحدد حركة المرور من الشبكة الداخلية 192.168.5.0/24 إلى الشبكة البعيدة 192.168.6.0/24، مثل هذا:

access-list 100 permit ip 192.168.5.0 0.0.0.255 192.168.6.0 0.0.0.255

2. قم بتعريف اقتراحات نهج اقتران أمان الإنترنت وبروتوكول إدارة المفاتيح (ISAKMP)، مثل هذا:

crypto isakmp policy 1

hash md5

authentication pre-share

group 2

3. أصدرت هذا أمر (في هذا مثال) أن يستعمل ويعين مفتاح مشترك مسبقا:

crypto isakmp key cisco address 10.66.79.73

4. قم بتحديد مقترحات IPSec، مثل ما يلي:

crypto ipsec transform-set cisco esp-des esp-md5-hmac

5. قم بإنشاء جملة خريطة التشفير، مثل هذا:

crypto map cisco 10 ipsec-isakmp

set peer 10.66.79.73

set transform-set cisco

match address 100

6. تطبيق خريطة التشفير على واجهة VLAN 100، مثل هذا:

interface vlan100

crypto map cisco

يتم إستخدام هذه التكوينات:

- Catalyst 6500

- جدار حماية PIX

Catalyst 6500

!--- Define the Phase 1 policy.

crypto isakmp policy 1

hash md5

authentication pre-share

group 2

crypto isakmp key cisco address 10.66.79.73

!

!

!--- Define the encryption policy for this setup.

crypto ipsec transform-set cisco esp-des esp-md5-hmac

!

!--- Define a static crypto map entry for the peer !--- with mode ipsec-isakmp. !--- This indicates that Internet Key Exchange (IKE) !--- is used to establish the IPSec !--- security associations (SAs) to protect the traffic !--- specified by this crypto map entry.

crypto map cisco 10 ipsec-isakmp

set peer 10.66.79.73

set transform-set cisco

match address 100

!

!

no spanning-tree vlan 100

!

!

!

interface FastEthernet2/1

ip address 192.168.5.1 255.255.255.0

!

!--- This is the outside Layer 2 port that allows !--- VLAN 209 traffic to enter.

interface FastEthernet2/48

no ip address

switchport

switchport trunk encapsulation dot1q

switchport mode trunk

!

interface GigabitEthernet4/1

no ip address

flowcontrol receive on

flowcontrol send off

switchport

switchport trunk encapsulation dot1q

!--- VLAN 100 is defined as the Interface VLAN (IVLAN).

switchport trunk allowed vlan 1,100,1002-1005

switchport mode trunk

cdp enable

!

interface GigabitEthernet4/2

no ip address

flowcontrol receive on

flowcontrol send off

switchport

switchport trunk encapsulation dot1q

!--- The Port VLAN (PVLAN) configuration is handled transparently by !--- the VPN service module without user configuration !--- or involvement. It also is not shown in the configuration. !--- Note: For every IVLAN, a corresponding PVLAN exists.

switchport trunk allowed vlan 1,209,1002-1005

switchport mode trunk

cdp enable

spanning-tree portfast trunk

!

interface Vlan1

no ip address

shutdown

!

!--- This is the IVLAN that is configured to intercept the traffic !--- destined to the secure port on which the inside port !--- of the VPN service module is the only port present.

interface Vlan100

ip address 10.66.79.180 255.255.255.224

crypto map cisco

!--- This is the secure port that is a virtual Layer 3 interface. !--- This interface purposely does not have a Layer 3 IP address !--- configured. This is normal for the BITW process. !--- The IP address is moved from this interface to the VLAN 100 to !--- accomplish BITW. This brings the VPN service module into !--- the packet path.

interface Vlan209

no ip address

crypto connect vlan 100

!

ip classless

global (outside) 1 interface

!--- NAT 0 prevents NAT for networks specified in the ACL inside_nat0_outbound.

nat (inside) 0 access-list inside_nat0_outbound

nat (inside) 1 192.168.5.0 255.255.255.0

!--- Configure the routing so that the device !--- is directed to reach its destination network.

ip route 0.0.0.0 0.0.0.0 10.66.79.161

!--- This access list (inside_nat0_outbound) is used with the nat zero command. !--- This prevents traffic which matches the access list from undergoing !--- network address translation (NAT). The traffic specified by this ACL is !--- traffic that is to be encrypted and !--- sent across the VPN tunnel. This ACL is intentionally !--- the same as (100). !--- Two separate access lists should always be used in this configuration. access-list inside_nat0_outbound permit ip 192.168.5.0 0.0.0.255 192.168.6.0 0.0.0.255

!--- This is the crypto ACL.

access-list 100 permit ip 192.168.5.0 0.0.0.255 192.168.6.0 0.0.0.255

جدار حماية PIX

SV2-8(config)# show run

: Saved

:

PIX Version 6.3(3)

interface ethernet0 auto

interface ethernet1 auto

interface ethernet2 auto shutdown

interface ethernet3 auto shutdown

interface ethernet4 auto shutdown

interface ethernet5 auto shutdown

interface ethernet6 auto shutdown

nameif ethernet0 outside security0

nameif ethernet1 inside security100

nameif ethernet2 intf2 security10

nameif ethernet3 intf3 security15

nameif ethernet4 intf4 security20

nameif ethernet5 intf5 security25

nameif ethernet6 intf6 security30

enable password 8Ry2YjIyt7RRXU24 encrypted

passwd 2KFQnbNIdI.2KYOU encrypted

hostname SV2-8

domain-name cisco.com

fixup protocol dns maximum-length 512

fixup protocol ftp 21

fixup protocol h323 h225 1720

fixup protocol h323 ras 1718-1719

fixup protocol http 80

fixup protocol ils 389

fixup protocol rsh 514

fixup protocol rtsp 554

fixup protocol sip 5060

fixup protocol sip udp 5060

fixup protocol skinny 2000

fixup protocol smtp 25

fixup protocol sqlnet 1521

fixup protocol tftp 69

names

!--- This is the traffic to the router.

access-list 100 permit ip 192.168.6.0 255.255.255.0 192.168.5.0 255.255.255.0

access-list nonat permit ip 192.168.6.0 255.255.255.0 192.168.5.0 255.255.255.0

pager lines 24

mtu outside 1500

mtu inside 1500

mtu intf2 1500

mtu intf3 1500

mtu intf4 1500

mtu intf5 1500

mtu intf6 1500

ip address outside 10.66.79.73 255.255.255.224

ip address inside 192.168.6.1 255.255.255.0

ip address intf2 127.0.0.1 255.255.255.255

no ip address intf3

no ip address intf4

no ip address intf5

no ip address intf6

ip audit info action alarm

ip audit attack action alarm

no failover

failover timeout 0:00:00

failover poll 15

no failover ip address outside

no failover ip address inside

no failover ip address intf2

no failover ip address intf3

no failover ip address intf4

no failover ip address intf5

no failover ip address intf6

pdm history enable

arp timeout 14400

global (outside) 1 interface

nat (inside) 0 access-list nonat

nat (inside) 1 192.168.6.0 255.255.255.0 0 0

route outside 0.0.0.0 0.0.0.0 10.66.79.65 1

timeout xlate 3:00:00

timeout conn 1:00:00 half-closed 0:10:00 udp 0:02:00 rpc 0:10:00 h225 1:00:00

timeout h323 0:05:00 mgcp 0:05:00 sip 0:30:00 sip_media 0:02:00

timeout uauth 0:05:00 absolute

aaa-server TACACS+ protocol tacacs+

aaa-server RADIUS protocol radius

aaa-server LOCAL protocol local

no snmp-server location

no snmp-server contact

snmp-server community public

no snmp-server enable traps

floodguard enable

!--- These are IPSec policies.

sysopt connection permit-ipsec

crypto ipsec transform-set cisco esp-des esp-md5-hmac

crypto map cisco 10 ipsec-isakmp

crypto map cisco 10 match address 100

crypto map cisco 10 set peer 10.66.79.180

crypto map cisco 10 set transform-set cisco

crypto map cisco interface outside

!--- These are IKE policies.

isakmp enable outside

isakmp key ******** address 10.66.79.180 netmask 255.255.255.255

isakmp policy 1 authentication pre-share

isakmp policy 1 encryption des

isakmp policy 1 hash md5

isakmp policy 1 group 2

isakmp policy 1 lifetime 86400

telnet timeout 5

ssh timeout 5

console timeout 0

terminal width 80

Cryptochecksum:244c86c9beab00bda8f790502ca74db9

: end

تكوين IPSec باستخدام منفذ موجه

أنجزت هذا steps أن يشكل IPSec مع مساعدة من طبقة 3 مسحاج تخديد ميناء للقارن خارجي طبيعي.

1. أضفت ال VLANs داخلي إلى الميناء داخلي من ال VPN خدمة وحدة نمطية.

افترضت أن ال VPN خدمة وحدة نمطية على شق مكان 4. أستخدم شبكة VLAN 100 كشبكة VLAN الداخلية وشبكة VLAN 209 كشبكة VLAN الخارجية. شكلت ال VPN خدمة وحدة نمطية GE ميناء مثل هذا:

interface GigabitEthernet4/1

no ip address

flowcontrol receive on

flowcontrol send off

switchport

switchport trunk encapsulation dot1q

switchport trunk allowed vlan 1,100,1002-1005

switchport mode trunk

cdp enable

interface GigabitEthernet4/2

no ip address

flowcontrol receive on

flowcontrol send off

switchport

switchport trunk encapsulation dot1q

switchport trunk allowed vlan 1,209,1002-1005

switchport mode trunk

cdp enable

spanning-tree portfast trunk

2. أضفت ال VLAN 100 قارن والقارن حيث النفق يكون أنهيت (أي، في هذه الحالة، FastEthernet2/48، كما هو موضح هنا).

interface Vlan100

ip address 10.66.79.180 255.255.255.224

interface FastEthernet2/48

no ip address

crypto connect vlan 100

3. قم بإنشاء NAT الالتفافي. قم بإضافة هذه الإدخالات إلى جملة NAT بدون إستثناء الحد الفاصل بين هذه الشبكات:

access-list inside_nat0_outbound permit ip 192.168.5.0 0.0.0.255

192.168.6.0 0.0.0.255

global (outside) 1 interface

nat (inside) 0 access-list inside_nat0_outbound

nat (inside) 1 192.168.5.0 255.255.255.0

4. قم بإنشاء تكوين التشفير وقائمة التحكم في الوصول (ACL) التي تحدد حركة المرور التي سيتم تشفيرها.

1. قم بإنشاء قائمة تحكم في الوصول (ACL) (في هذه الحالة، ACL 100) التي تحدد حركة المرور من الشبكة الداخلية 192.168.5.0/24 إلى الشبكة البعيدة 192.168.6.0/24، مثل هذا:

access-list 100 permit ip 192.168.5.0 0.0.0.255 192.168.6.0 0.0.0.255

2. قم بتحديد مقترحات نهج ISAKMP، مثل هذا:

crypto isakmp policy 1

hash md5

authentication pre-share

group 2

3. أصدرت هذا أمر (في هذا مثال) أن يستعمل ويعين مفتاح مشترك مسبقا:

crypto isakmp key cisco address 10.66.79.73

4. قم بتحديد مقترحات IPSec، مثل ما يلي:

crypto ipsec transform-set cisco esp-des esp-md5-hmac

5. قم بإنشاء جملة خريطة التشفير، مثل هذا:

crypto map cisco 10 ipsec-isakmp

set peer 10.66.79.73

set transform-set cisco

match address 100

5. تطبيق خريطة التشفير على واجهة VLAN 100، مثل هذا:

interface vlan100

crypto map cisco

يتم إستخدام هذه التكوينات:

- Catalyst 6500

- جدار حماية PIX

Catalyst 6500

!--- Define the Phase 1 policy.

crypto isakmp policy 1

hash md5

authentication pre-share

group 2

crypto isakmp key cisco address 10.66.79.73

!

!

!--- Define the encryption policy for this setup.

crypto ipsec transform-set cisco esp-des esp-md5-hmac

!

!--- Define a static crypto map entry for the peer !--- with mode ipsec-isakmp. !--- This indicates that IKE is used to establish the !--- IPSec SAs to protect the traffic !--- specified by this crypto map entry.

crypto map cisco 10 ipsec-isakmp

set peer 10.66.79.73

set transform-set cisco

match address 100

!

!

no spanning-tree vlan 100

!

!

!

interface FastEthernet2/1

ip address 192.168.5.1 255.255.255.0

!

!--- This is the secure port that is configured in routed port mode. !--- This routed port mode does not have a Layer 3 IP address !--- configured. This is normal for the BITW process. !--- The IP address is moved from this interface to the VLAN 100 to !--- accomplish BITW. This brings the VPN service module into !--- the packet path. This is the Layer 2 port VLAN on which the !--- outside port of the VPN service module also belongs.

!

interface FastEthernet2/48

no ip address

crypto connect vlan 100

!

interface GigabitEthernet4/1

no ip address

flowcontrol receive on

flowcontrol send off

switchport

switchport trunk encapsulation dot1q

!--- VLAN 100 is defined as the IVLAN.

switchport trunk allowed vlan 1,100,1002-1005

switchport mode trunk

cdp enable

!

interface GigabitEthernet4/2

no ip address

flowcontrol receive on

flowcontrol send off

switchport

switchport trunk encapsulation dot1q

!--- The PVLAN configuration is handled transparently by the !--- VPN service module without user configuration !--- or involvement. It also is not shown in the configuration. !--- Note: For every IVLAN, a corresponding PVLAN exists.

switchport trunk allowed vlan 1,209,1002-1005

switchport mode trunk

cdp enable

spanning-tree portfast trunk

!

interface Vlan1

no ip address

shutdown

!

!--- This is the IVLAN that is configured to intercept the traffic !--- destined to the secure port on which the inside port of the !--- VPN service module is the only port present.

interface Vlan100

ip address 10.66.79.180 255.255.255.224

crypto map cisco

!--- This is the secure port that is a virtual Layer 3 interface. !--- This interface purposely does not have a Layer 3 IP address !--- configured. This is normal for the BITW process. !--- The IP address is moved from this interface to the VLAN 100 to !--- accomplish BITW. This brings the VPN service module into !--- the packet path.

!

ip classless

global (outside) 1 interface

!--- NAT 0 prevents NAT for networks specified in the ACL inside_nat0_outbound.

nat (inside) 0 access-list inside_nat0_outbound

nat (inside) 1 192.168.6.0 255.255.255.0

!--- Configure the routing so that the device !--- is directed to reach its destination network.

ip route 0.0.0.0 0.0.0.0 10.66.79.161

!

!--- This access list (inside_nat0_outbound) is used with the nat zero command. !--- This prevents traffic which matches the access list from undergoing !--- network address translation (NAT). The traffic specified by this ACL is !--- traffic that is to be encrypted and !--- sent across the VPN tunnel. This ACL is intentionally !--- the same as (100). !--- Two separate access lists should always be used in this configuration.

access-list inside_nat0_outbound permit ip 192.168.5.0 0.0.0.255 192.168.6.0 0.0.0.255

!--- This is the crypto ACL.

access-list 100 permit ip 192.168.5.0 0.0.0.255 192.168.6.0 0.0.0.255

جدار حماية PIX

SV2-8(config)# show run

: Saved

:

PIX Version 6.3(3)

interface ethernet0 auto

interface ethernet1 auto

interface ethernet2 auto shutdown

interface ethernet3 auto shutdown

interface ethernet4 auto shutdown

interface ethernet5 auto shutdown

interface ethernet6 auto shutdown

nameif ethernet0 outside security0

nameif ethernet1 inside security100

nameif ethernet2 intf2 security10

nameif ethernet3 intf3 security15

nameif ethernet4 intf4 security20

nameif ethernet5 intf5 security25

nameif ethernet6 intf6 security30

enable password 8Ry2YjIyt7RRXU24 encrypted

passwd 2KFQnbNIdI.2KYOU encrypted

hostname SV2-8

domain-name cisco.com

fixup protocol dns maximum-length 512

fixup protocol ftp 21

fixup protocol h323 h225 1720

fixup protocol h323 ras 1718-1719

fixup protocol http 80

fixup protocol ils 389

fixup protocol rsh 514

fixup protocol rtsp 554

fixup protocol sip 5060

fixup protocol sip udp 5060

fixup protocol skinny 2000

fixup protocol smtp 25

fixup protocol sqlnet 1521

fixup protocol tftp 69

names

!--- This is the traffic to the router.

access-list 100 permit ip 192.168.6.0 255.255.255.0 192.168.5.0 255.255.255.0

access-list nonat permit ip 192.168.6.0 255.255.255.0 192.168.5.0 255.255.255.0

pager lines 24

mtu outside 1500

mtu inside 1500

mtu intf2 1500

mtu intf3 1500

mtu intf4 1500

mtu intf5 1500

mtu intf6 1500

ip address outside 10.66.79.73 255.255.255.224

ip address inside 192.168.6.1 255.255.255.0

ip address intf2 127.0.0.1 255.255.255.255

no ip address intf3

no ip address intf4

no ip address intf5

no ip address intf6

ip audit info action alarm

ip audit attack action alarm

no failover

failover timeout 0:00:00

failover poll 15

no failover ip address outside

no failover ip address inside

no failover ip address intf2

no failover ip address intf3

no failover ip address intf4

no failover ip address intf5

no failover ip address intf6

pdm history enable

arp timeout 14400

global (outside) 1 interface

nat (inside) 0 access-list nonat

nat (inside) 1 192.168.6.0 255.255.255.0 0 0

route outside 0.0.0.0 0.0.0.0 10.66.79.65 1

timeout xlate 3:00:00

timeout conn 1:00:00 half-closed 0:10:00 udp 0:02:00 rpc 0:10:00 h225 1:00:00

timeout h323 0:05:00 mgcp 0:05:00 sip 0:30:00 sip_media 0:02:00

timeout uauth 0:05:00 absolute

aaa-server TACACS+ protocol tacacs+

aaa-server RADIUS protocol radius

aaa-server LOCAL protocol local

no snmp-server location

no snmp-server contact

snmp-server community public

no snmp-server enable traps

floodguard enable

!--- These are IPSec policies.

sysopt connection permit-ipsec

crypto ipsec transform-set cisco esp-des esp-md5-hmac

crypto map cisco 10 ipsec-isakmp

crypto map cisco 10 match address 100

crypto map cisco 10 set peer 10.66.79.180

crypto map cisco 10 set transform-set cisco

crypto map cisco interface outside

!--- These are IKE policies.

isakmp enable outside

isakmp key ******** address 10.66.79.180 netmask 255.255.255.255

isakmp policy 1 authentication pre-share

isakmp policy 1 encryption des

isakmp policy 1 hash md5

isakmp policy 1 group 2

isakmp policy 1 lifetime 86400

telnet timeout 5

ssh timeout 5

console timeout 0

terminal width 80

Cryptochecksum:244c86c9beab00bda8f790502ca74db9

: end

التحقق من الصحة

يوفر هذا القسم المعلومات للتأكد من أن التكوين لديك يعمل بشكل صحيح.

تدعم أداة مترجم الإخراج (للعملاءالمسجلين فقط) بعض أوامر show. استخدم أداة مترجم الإخراج (OIT) لعرض تحليل مُخرَج الأمر show .

- show crypto ipSec— يعرض الإعدادات المستخدمة من قبل رسائل IPSec الحالية.

- show crypto isakmp sa— يعرض جميع شبكات IKE الحالية في نظير.

- show crypto vlan— يعرض شبكة VLAN المرتبطة بتكوين التشفير.

- show crypto eli— يعرض إحصائيات الوحدة النمطية لخدمة VPN.

للحصول على معلومات إضافية حول التحقق من IPSec واستكشاف أخطائه وإصلاحها، ارجع إلى أستكشاف أخطاء أمان IP وإصلاحها - فهم أوامر تصحيح الأخطاء واستخدامها.

استكشاف الأخطاء وإصلاحها

يوفر هذا القسم معلومات أستكشاف أخطاء التكوين وإصلاحها.

أوامر استكشاف الأخطاء وإصلاحها

ملاحظة: قبل إصدار أوامر debug، راجع المعلومات المهمة في أوامر تصحيح الأخطاء.

- debug crypto ipSec—يعرض مفاوضات IPSec للمرحلة 2.

- debug crypto isakmp—يعرض مفاوضات ISAKMP للمرحلة 1.

- debug crypto engine—يعرض حركة مرور البيانات التي يتم تشفيرها.

- مسح التشفير isakmp—يعمل على مسح أسماء مناطق الوصول (SAs) المتعلقة بالمرحلة الأولى.

- مسح التشفير sa—يمسح أسماء مناطق الوصول (SA) المتعلقة بالمرحلة 2.

للحصول على معلومات إضافية حول التحقق من IPSec واستكشاف أخطائه وإصلاحها، ارجع إلى أستكشاف أخطاء أمان IP وإصلاحها - فهم أوامر تصحيح الأخطاء واستخدامها.

معلومات ذات صلة

- صفحة دعم IPSec

- تكوين أمان شبكة IPSec

- تكوين بروتوكول أمان Internet Key Exchange

- الدعم الفني - Cisco Systems