المحتويات

المقدمة

المتطلبات الأساسية

المتطلبات

المكونات المستخدمة

الاصطلاحات

التكوين

الرسم التخطيطي للشبكة

التكوينات

التحقق من الصحة

استكشاف الأخطاء وإصلاحها

معلومات ذات صلة

المقدمة

يناقش هذا وثيقة كيف أن يشكل inter-switch خطوة بروتوكول خطوة بين cisco مادة حفازة 2948g-l3 ومادة حفازة 2900/3500xl أو 2970 sery مفتاح. عندما تقوم بتوصيل محول Catalyst 2948G-L3 بمحول، فإن مهام التكوين هي نفسها التي تقوم بتوصيل موجه بمحول ما. يستخدم مثال التكوين في هذا المستند المحول Catalyst 2948G-L3 كموجه ويستخدم المحول Catalyst 3500XL كمحول الطبقة 2 (L2). يمكنك إستبدال Catalyst 2900XL أو 2970 ب 3500XL، لأغراض هذا المستند.

أن يستعمل المفهوم من VLANs على المادة حفازة 2948g-l3، أنت ينبغي استعملت جسر مجموعة. كل جسر اعتبرت VLAN منفصل. تتوافق مجموعات الجسر هذه مع رقم شبكة VLAN الخاص بالمحول المتصل.

المتطلبات الأساسية

المتطلبات

قبل أن تحاول إجراء هذا التكوين، تأكد من توصيل كبل توصيل عكسي بين الطراز 2900/3500XL أو 2970 و 2948G-L3. بشكل نموذجي، تستخدم كبل توصيل متناظر بين موجه ومحول؛ ولكن باستخدام المحول Catalyst 2948G-L3، تستخدم كبل توصيل عكسي للاتصال بمحول آخر. هذا هو نفس كبل التوصيل العكسي الذي تستخدمه لاتصال من محول إلى محول.

يجب أن يكون لدى قراء هذا المستند معرفة بالمواضيع التالية:

- المادة حفازة 2940 و 2950/2955 sery لا يساند مفتاح ISL عملية كبسلة. أحلت لمعلومة على isl عملية كبسلة دعم وغيرها من trunking متطلب لمادة حفازة مفتاح، نظام متطلب أن يطبق trunking.

- وصل المادة حفازة 2948g-l3 إلى نهاية الحياة (EoL). للحصول على التفاصيل والمنتجات البديلة الموصى بها، راجع EoL / EoS للمحولات Cisco Catalyst 2948G-L3 و 4908G-L3 Switches.

المكونات المستخدمة

تستند المعلومات الواردة في هذا المستند إلى إصدارات البرامج التالية:

- برنامج IOS® الإصدار 12.0(25)W5(27) لمحول/موجه الطبقة 3 (L3) (CAT2948G-in-M) من Cisco

- برنامج IOS الإصدار 12.0(5)WC9 (C3500XL-C3H2S-M) من Cisco (FC1)

تم إنشاء المعلومات الواردة في هذا المستند من الأجهزة الموجودة في بيئة معملية خاصة. بدأت جميع الأجهزة المُستخدمة في هذا المستند بتكوين ممسوح (افتراضي). إذا كانت شبكتك مباشرة، فتأكد من فهمك للتأثير المحتمل لأي أمر.

الاصطلاحات

للحصول على مزيد من المعلومات حول اصطلاحات المستندات، ارجع إلى اصطلاحات تلميحات Cisco التقنية.

التكوين

يوفر هذا القسم معلومات تكوين الميزات الموضحة في هذا المستند.

ملاحظة: للعثور على معلومات إضافية حول الأوامر الواردة في هذا المستند، أستخدم أداة بحث الأوامر (للعملاء المسجلين فقط).

الرسم التخطيطي للشبكة

يستخدم هذا المستند إعداد الشبكة التالي:

إذا كنت تريد أن تكون أجهزة الكمبيوتر الثلاثة جميعها قادرة على إختبار اتصال بعضها البعض وأن تكون لها بوابة افتراضية، فيجب عليك إستخدام التوصيل باستخدام التوجيه والربط المدمجين (IRB).

المادة حفازة 2948g-l3 ال l3 أداة في هذا سيناريو. نظرا لأنه جهاز من المستوى الثالث، فلا يمكن أن يكون لديه واجهات من المستوى الثالث في الشبكة الفرعية نفسها. ولهذا السبب تحتاج إلى إستخدام مجموعات الجسر على الواجهات وربطها معا باستخدام واجهة افتراضية للجسر (BVI)، BVI 2.

ال BVI 2 عنوان التقصير مدخل ل all of the pcS وجهاز في VLAN 2 أو جسر مجموعة 2.

التكوينات

يستخدم هذا المستند التكوينات التالية:

- 2948G-L3

- الطراز 2900/3500xl أو 2970

2948G-L3

Building configuration...

Current configuration:

!

version 12.0

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname 2948G-L3

!

!

ip subnet-zero

bridge irb

!

!

!

interface FastEthernet1

!--- This interface is the ISL trunk to the switch.

no ip address

no ip directed-broadcast

!

interface FastEthernet1.1

encapsulation isl 1

no ip redirects

no ip directed-broadcast

bridge-group 1

!--- Use bridge-group 1 for the trunk subinterface. !--- You can not use an IP address here because of the subnet !--- overlap that would occur due to BVI 1, which is in the !--- same subnet.

!

interface FastEthernet1.2

encapsulation isl 2

no ip redirects

no ip directed-broadcast

bridge-group 2

!

interface FastEthernet2

no ip address

no ip directed-broadcast

bridge-group 2

!--- This port belongs to VLAN 2.

!

interface FastEthernet3

no ip address

no ip directed-broadcast

bridge-group 2

!--- This port belongs to VLAN 2.

!

interface FastEthernet4

no ip address

no ip directed-broadcast

bridge-group 1

!--- This port belongs to VLAN 1.

!

interface BVI1

ip address 10.1.1.1 255.255.0.0

!--- This is the IP address of BVI 1.

no ip directed-broadcast

no ip route-cache cef

!

interface BVI2

!--- This is the IP address of BVI 2.

ip address 10.2.2.2 255.255.0.0

no ip directed-broadcast

no ip route-cache cef

!

ip classless

!

bridge 1 protocol ieee

!--- Choose IEEE as the Spanning Tree Protocol.

bridge 1 route ip

!--- Allow routing to occur for IP.

bridge 2 protocol ieee

bridge 2 route ip

!

line con 0

transport input none

line aux 0

line vty 0 4

login

!

end

الطراز 2900/3500xl أو 2970

!--- First, add VLAN 2 to the VLAN database for a 2900/3500XL !--- switch:

3500XL# vlan database

3500XL(vlan)# vlan 2

VLAN 2 added:

Name: VLAN0002

3500XL(vlan)# exit

APPLY completed.

Exiting....

3500XL#

!--- The Catalyst 2970 gives you the option to configure VLANs !--- from the VLAN database or from global configuration mode:

2970# configure terminal

Enter configuration commands, one per line.  End with CNTL/Z.

2970(config)# vlan 2

2970(config-vlan)# end

2970#

!--- The switchport configurations on the Catalyst 2900/3500XL !--- and on the 2970 are identical, for the purposes of this !--- document. Remember that the Catalyst 2970 has 10/100/1000 !--- ports (1000Base-T), so the interfaces in this output !--- would instead be labeled Gigabit Ethernet 0/1, 0/2, !--- and so forth.

Current configuration:

!

version 12.0

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname 3500XL

!

interface FastEthernet0/1

switchport mode trunk

!--- This port is an ISL trunk.

!

interface FastEthernet0/2

switchport access vlan 2

!--- This port is in VLAN 2.

!

interface FastEthernet0/3

!--- This port is in the default VLAN 1.

!

interface FastEthernet0/4

!

!

interface VLAN1

ip address 10.1.1.100 255.255.0.0

!--- This is the IP address of the management interface.

no ip directed-broadcast

no ip route-cache

!

snmp-server engineID local 000000090200000AF484CC80

snmp-server community public RO

!

line con 0

exec-timeout 0 0

transport input none

stopbits 1

line vty 0 4

login

line vty 5 15

login

!

end

التحقق من الصحة

يوفر هذا القسم معلومات للتأكد من أن التكوين لديك يعمل بشكل صحيح.

يتم دعم بعض أوامر العرض بواسطة أداة مترجم الإخراج (العملاء المسجلون فقط)، والتي تتيح لك عرض تحليل إخراج أمر العرض.

- show interface fa0/1 switchport—تحقق من حالة خط الاتصال على 2900/3500xl أو 2970 وانظر شبكات VLAN النشطة.

3500XL# show interface fa0/1 switchport

Name: Fa0/1

Switchport: Enabled

Administrative mode: trunk

Operational Mode: trunk

Administrative Trunking Encapsulation: isl

Operational Trunking Encapsulation: isl

Negotiation of Trunking: Disabled

Access Mode VLAN: 0 ((Inactive))

Trunking Native Mode VLAN: 1 (default)

Trunking VLANs Enabled: ALL

Trunking VLANs Active: 1,2

Pruning VLANs Enabled: 2-1001

Priority for untagged frames: 0

Override vlan tag priority: FALSE

Voice VLAN: none

Appliance trust: none

Self Loopback: No

3500XL#

- show vlan— تحقق من تخصيص المنافذ على 2900/3500xl أو 2970 لشبكات VLAN الصحيحة.

3500XL# show vlan

VLAN Name                             Status    Ports

---- -------------------------------- --------- -------------------------------

1    default                          active    Fa0/3, Fa0/4, Fa0/5, Fa0/6,

Fa0/7, Fa0/8, Fa0/9, Fa0/10,

Fa0/11, Fa0/12, Fa0/13, Fa0/14,

Fa0/15, Fa0/16, Fa0/17, Fa0/18,

Fa0/19, Fa0/20, Fa0/21, Fa0/22,

Fa0/23, Fa0/24, Gi0/1, Gi0/2

2    VLAN0002                         active    Fa0/2

1002 fddi-default                     active

1003 token-ring-default               active

1004 fddinet-default                  active

1005 trnet-default                    active

VLAN Type  SAID       MTU   Parent RingNo BridgeNo Stp  BrdgMode Trans1 Trans2

---- ----- ---------- ----- ------ ------ -------- ---- -------- ------ ------

1    enet  100001     1500  -      -      -        -    -        0      0

2    enet  100002     1500  -      -      -        -    -        0      0

1002 fddi  101002     1500  -      -      -        -    -        0      0

1003 tr    101003     1500  -      -      -        -    -        0      0

1004 fdnet 101004     1500  -      -      -        ieee -        0      0

1005 trnet 101005     1500  -      -      -        ibm  -        0      0

3500XL#

- show interface bvi 1— تأكد من أن واجهات 2948G-L3 BVI وبروتوكول الخط قيد التشغيل على 2948G-L3.

2948G-L3# show interface bvi 1

BVI1 is up, line protocol is up

Hardware is BVI, address is 0001.c75c.680a (bia 0000.0000.0000)

Internet address is 10.1.1.1/16

MTU 1500 bytes, BW 10000 Kbit, DLY 5000 usec, rely 255/255, load 1/255

Encapsulation ARPA, loopback not set

ARP type: ARPA, ARP Timeout 04:00:00

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue 0/0 (size/max)

2948G-L3#

- show bridge 1—تحقق من إعادة توجيه الجسر 1. كما يمكنك التحقق من تمكين بروتوكول الشجرة المتفرعة وإعادة التوجيه باستخدام أمر show spanning-tree.

2948G-L3# show bridge 1

Total of 300 station blocks, 299 free

Codes: P - permanent, S - self

Bridge Group 1:

Address       Action   Interface

00ee.1e9f.50c0   forward   Fa1.1

2948G-L3#

استكشاف الأخطاء وإصلاحها

يوفر هذا القسم تلميحات وعينات إخراج للمساعدة في أستكشاف أخطاء التكوين وإصلاحها.

- تحقق من إمكانية إختبار الاتصال بالجهاز الآخر.

- تحقق من أنه يمكن لأجهزة الكمبيوتر إختبار اتصال أجهزة الكمبيوتر الأخرى في شبكات VLAN الأخرى.

- تأكد من صحة البوابة الافتراضية. في هذا السيناريو، تكون العبارة الافتراضية هي معرف فئة المورد (BVIs) الشخصي على الجيل 2948G-L3.

2948G-L3# ping 10.1.1.100

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.100, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/6/12 ms

2948G-L3# show arp

Protocol  Address          Age (min)  Hardware Addr   Type   Interface

Internet  10.2.2.2                -   0030.40d6.4008  ARPA   BVI2

Internet  10.1.1.1                -   0030.40d6.400a  ARPA   BVI1

Internet  10.1.1.100              1   00ee.1e9f.50c0  ARPA   BVI1

2948G-L3#

معلومات ذات صلة

- صفحات دعم منتجات شبكة LAN

- صفحة دعم تحويل شبكة LAN

- الدعم التقني والمستندات - Cisco Systems