المحتويات

المقدمة

المتطلبات الأساسية

المتطلبات

المكونات المستخدمة

الاصطلاحات

التكوين

الرسم التخطيطي للشبكة

التكوينات

التحقق من الصحة

استكشاف الأخطاء وإصلاحها

أوامر استكشاف الأخطاء وإصلاحها

نموذج إخراج أستكشاف الأخطاء وإصلاحها

معلومات ذات صلة

المقدمة

يزود هذا وثيقة عينة تشكيل أن يطبق ISDN نسخة إحتياطية مع يطفو ساكن إستاتيكي مسحاج تخديد، ويزود أساسي تحشد معلومة ل هذا نوع التشكيل.

لمزيد من المعلومات حول عمليات التنفيذ الأكثر شيوعا للنسخ الاحتياطي ل ISDN، والمقارنات بين هذه العمليات، ارجع إلى المستند التالي: تقييم واجهات النسخ الاحتياطي، والمسارات الثابتة العائمة، ومراقبة المتصل للنسخ الاحتياطي ل DDR.

المتطلبات الأساسية

المتطلبات

لا توجد متطلبات خاصة لهذا المستند.

المكونات المستخدمة

تستند المعلومات الواردة في هذا المستند إلى إصدارات البرامج والمكونات المادية أدناه.

- موجهات Cisco 2500 التي تشغل برنامج Cisco IOS® Software، الإصدار 12.2(3) و 12.2(5)

تم إنشاء المعلومات المُقدمة في هذا المستند من الأجهزة الموجودة في بيئة معملية خاصة. بدأت جميع الأجهزة المُستخدمة في هذا المستند بتكوين ممسوح (افتراضي). إذا كنت تعمل في شبكة مباشرة، فتأكد من فهمك للتأثير المحتمل لأي أمر قبل استخدامه.

الاصطلاحات

للحصول على مزيد من المعلومات حول اصطلاحات المستندات، راجع اصطلاحات تلميحات Cisco التقنية.

التكوين

في هذا القسم، تُقدّم لك معلومات تكوين الميزات الموضحة في هذا المستند.

ملاحظة: للعثور على معلومات إضافية حول الأوامر المستخدمة في هذا المستند، أستخدم أداة بحث الأوامر (للعملاء المسجلين فقط).

الرسم التخطيطي للشبكة

يستخدم هذا المستند إعداد الشبكة الموضح في الرسم التخطيطي أدناه.

التكوينات

يستخدم هذا المستند التكوينات الموضحة أدناه.

- كريمسون (موجه Cisco 2500)

- كيفن (الموجه 2500 من Cisco)

كريمسون (موجه Cisco 2500)

krimson#show running-config

Building configuration...

!

version 12.2

service timestamps debug datetime msec

service timestamps log datetime msec

!

hostname krimson

!

username kevin password 0 <password>

!

isdn switch-type basic-net3

!

!

interface Loopback0

ip address 10.7.7.1 255.255.255.0

!

interface Serial0

ip address 10.1.2.1 255.255.255.0

!

interface BRI0

no ip address

encapsulation ppp

no ip route-cache

no ip mroute-cache

load-interval 30

dialer pool-member 1

isdn switch-type basic-net3

no fair-queue

no cdp enable

ppp authentication chap

!

interface Dialer0

ip address 10.9.9.1 255.255.255.0

encapsulation ppp

no ip route-cache

no ip mroute-cache

dialer pool 1

dialer remote-name kevin

dialer string 8114

dialer-group 1

no cdp enable

ppp authentication chap

!

ip classless

ip route 10.8.8.0 255.255.255.0 10.1.2.2

ip route 10.8.8.0 255.255.255.0 10.9.9.2 180

no ip http server

!

dialer-list 1 protocol ip permit

!

!

line con 0

exec-timeout 0 0

line aux 0

line vty 0 4

exec-timeout 0 0

password <password> login

!

end

كيفن (الموجه 2500 من Cisco)

kevin#show running-config

Building configuration...

Current configuration : 1205 bytes

!

version 12.2

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname kevin

!

username krimson password 0 <password>

!

isdn switch-type basic-net3

!

!

!

interface Loopback0

ip address 10.8.8.1 255.255.255.0

!

interface Serial0

ip address 10.1.2.2 255.255.255.0

clockrate 2000000

!

interface Serial1

no ip address

shutdown

!

interface BRI0

no ip address

encapsulation ppp

dialer pool-member 1

isdn switch-type basic-net3

no cdp enable

ppp authentication chap

!

interface Dialer0

ip address 10.9.9.2 255.255.255.0

encapsulation ppp

dialer pool 1

dialer remote-name krimson

dialer string 8113

dialer-group 1

no cdp enable

ppp authentication chap

!

!

dialer-list 1 protocol ip permit

!

!

line con 0

exec-timeout 0 0

line aux 0

line vty 0 4

exec-timeout 0 0

password <password> login

!

end

التحقق من الصحة

يوفر هذا القسم معلومات يمكنك إستخدامها للتأكد من أن التكوين يعمل بشكل صحيح.

يتم دعم بعض أوامر العرض بواسطة أداة مترجم الإخراج (العملاء المسجلون فقط)، والتي تتيح لك عرض تحليل إخراج أمر العرض.

- show ip route - يعرض إدخالات جدول توجيه IP.

- show interfaces - يعرض إحصائيات لجميع الواجهات التي تم تكوينها على الموجه أو خادم الوصول.

استكشاف الأخطاء وإصلاحها

يوفر هذا القسم معلومات يمكنك استخدامها لاستكشاف أخطاء التكوين وإصلاحها.

أوامر استكشاف الأخطاء وإصلاحها

يتم دعم بعض أوامر العرض بواسطة أداة مترجم الإخراج (العملاء المسجلون فقط)، والتي تتيح لك عرض تحليل إخراج أمر العرض.

ملاحظة: قبل إصدار أوامر تصحيح الأخطاء، يرجى الاطلاع على المعلومات المهمة في أوامر تصحيح الأخطاء.

- debug isdn q931 - يعرض معلومات حول إعداد المكالمات وإنزال إتصالات شبكة ISDN (الطبقة 3) بين الموجه المحلي (جانب المستخدم) والشبكة.

- debug isdn events - يعرض أحداث ISDN التي تحدث على جانب المستخدم (على الموجه) لواجهة ISDN. أحداث ISDN التي يمكن عرضها هي أحداث Q.931 (إعداد الاستدعاء وخفض إتصالات شبكة ISDN).

- debug dialer - يعرض معلومات تصحيح الأخطاء حول الحزم أو الأحداث على واجهة المتصل.

- debug ppp negotiation - يسبب الأمر debug ppp لعرض حزم PPP التي يتم إرسالها أثناء بدء تشغيل PPP، حيث يتم التفاوض مع خيارات PPP.

- debug ppp authentication - يسبب الأمر debug ppp لعرض رسائل بروتوكول المصادقة، بما في ذلك عمليات تبادل الحزم لبروتوكول المصادقة المتباينة (CHAP) وعمليات تبادل بروتوكول مصادقة كلمة المرور (PAP).

نموذج إخراج أستكشاف الأخطاء وإصلاحها

هنا، يمكننا إختبار وظيفة النسخ الاحتياطي باستخدام أوامر إيقاف التشغيل وno shutdown على الواجهة التسلسلية على الجانب البعيد. ويؤدي ذلك، بتوافق الآراء، إلى إختفاء المسار الرئيسي لبروتوكول الإنترنت إلى شبكة الوجهة المعنية.

دعنا أولا نلقي نظرة على الحالة الأولية للواجهة الأساسية وجدول توجيه ip:

جانب الاتصال:

krimson#show interface serial 0

Serial0 is up, line protocol is up

Hardware is HD64570

Internet address is 10.1.2.1/24

MTU 1500 bytes, BW 1544 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation HDLC, loopback not set

Keepalive set (10 sec)

Last input 00:00:07, output 00:00:07, output hang never

Last clearing of "show interface" counters never

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: weighted fair

Output queue: 0/1000/64/0 (size/max total/threshold/drops)

Conversations 0/1/256 (active/max active/max total)

Reserved Conversations 0/0 (allocated/max allocated)

Available Bandwidth 1158 kilobits/sec

5 minute input rate 1000 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

92 packets input, 7599 bytes, 0 no buffer

Received 62 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

99 packets output, 8991 bytes, 0 underruns

0 output errors, 0 collisions, 12 interface resets

0 output buffer failures, 0 output buffers swapped out

4 carrier transitions

DCD=up DSR=up DTR=up RTS=up CTS=up

krimson#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter

area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is 10.48.74.1 to network 0.0.0.0

10.0.0.0/8 is variably subnetted, 5 subnets, 2 masks

C 10.1.2.0/24 is directly connected, Serial0

S 10.8.8.0/24 [1/0] via 10.1.2.2

!--- The IP route for the destination network points to the primary link.

C 10.9.9.0/24 is directly connected, Dialer0

C 10.7.7.0/24 is directly connected, Loopback0

C 10.48.74.0/23 is directly connected, Ethernet0

S* 0.0.0.0/0 [254/0] via 10.48.74.1

تم إستدعاء الجانب:

kevin#show interface serial 0

Serial0 is up, line protocol is up

Hardware is HD64570

Internet address is 10.1.2.2/24

MTU 1500 bytes, BW 1544 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation HDLC, loopback not set

Keepalive set (10 sec)

Last input 00:00:00, output 00:00:08, output hang never

Last clearing of "show interface" counters never

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: weighted fair

Output queue: 0/1000/64/0 (size/max total/threshold/drops)

Conversations 0/1/256 (active/max active/max total)

Reserved Conversations 0/0 (allocated/max allocated)

Available Bandwidth 1158 kilobits/sec

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

106 packets input, 9432 bytes, 0 no buffer

Received 71 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

98 packets output, 8016 bytes, 0 underruns

0 output errors, 0 collisions, 4 interface resets

0 output buffer failures, 0 output buffers swapped out

1 carrier transitions

DCD=up DSR=up DTR=up RTS=up CTS=up

kevin#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter

area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is 10.48.74.1 to network 0.0.0.0

10.0.0.0/8 is variably subnetted, 4 subnets, 2 masks

C 10.1.2.0/24 is directly connected, Serial0

C 10.9.9.0/24 is directly connected, Dialer0

C 10.8.8.0/24 is directly connected, Loopback0

C 10.48.74.0/23 is directly connected, Ethernet0

S* 0.0.0.0/0 [254/0] via 10.48.74.1

kevin#

الآن يمكننا محاكاة فشل الارتباط باستخدام الأمر shutdown على الواجهة التسلسلية البعيدة:

krimson#

*Mar 4 15:25:18.302: %LINK-3-UPDOWN: Interface Serial0, changed state to

down

*Mar 4 15:25:19.302: %LINEPROTO-5-UPDOWN: Line protocol on Interface

Serial0, changed state to down

يمكننا أن نرى هنا أن الرابط الأساسي قد إنخفض.

krimson#show interface serial 0

Serial0 is down, line protocol is down

Hardware is HD64570

Internet address is 10.1.2.1/24

MTU 1500 bytes, BW 1544 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation HDLC, loopback not set

Keepalive set (10 sec)

Last input 00:00:22, output 00:00:32, output hang never

Last clearing of "show interface" counters never

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: weighted fair

Output queue: 0/1000/64/0 (size/max total/threshold/drops)

Conversations 0/1/256 (active/max active/max total)

Reserved Conversations 0/0 (allocated/max allocated)

Available Bandwidth 1158 kilobits/sec

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

108 packets input, 8526 bytes, 0 no buffer

Received 78 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

114 packets output, 9895 bytes, 0 underruns

0 output errors, 0 collisions, 12 interface resets

0 output buffer failures, 0 output buffers swapped out

5 carrier transitions

DCD=down DSR=down DTR=up RTS=up CTS=down

krimson#

تظهر تفاصيل جدول التوجيه الآن أن المسار الثابت العائم مثبت في جدول التوجيه:

krimson#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter

area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is 10.48.74.1 to network 0.0.0.0

10.0.0.0/8 is variably subnetted, 4 subnets, 2 masks

S 10.8.8.0/24 [180/0] via 10.9.9.2

C 10.9.9.0/24 is directly connected, Dialer0

C 10.7.7.0/24 is directly connected, Loopback0

C 10.48.74.0/23 is directly connected, Ethernet0

S* 0.0.0.0/0 [254/0] via 10.48.74.1

krimson#

على الموجه المستدعى، يمكننا محاكاة فشل الارتباط الأساسي الذي تم محاكاته باستخدام الأمر shutdown على الواجهة التسلسلية 0 المحلية:

kevin#configure terminal

Enter configuration commands, one per line. End with CNTL/Z.

kevin(config)#interface serial 0

kevin(config-if)#shutdown

*Mar 4 15:32:00.250: %LINK-5-CHANGED: Interface Serial0, changed state to

administratively down

*Mar 4 15:32:01.250: %LINEPROTO-5-UPDOWN: Line protocol on Interface

Serial0, changed state to down

*Mar 4 15:32:03.742: %SYS-5-CONFIG_I: Configured from console by console

الآن يمكننا أن نرى أن الرابط الأساسي ينخفض:

kevin#show interface serial 0

Serial0 is administratively down, line protocol is down

Hardware is HD64570

Internet address is 10.1.2.2/24

MTU 1500 bytes, BW 1544 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation HDLC, loopback not set

Keepalive set (10 sec)

Last input 00:01:28, output 00:01:18, output hang never

Last clearing of "show interface" counters never

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: weighted fair

Output queue: 0/1000/64/0 (size/max total/threshold/drops)

Conversations 0/1/256 (active/max active/max total)

Reserved Conversations 0/0 (allocated/max allocated)

Available Bandwidth 1158 kilobits/sec

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

114 packets input, 9895 bytes, 0 no buffer

Received 79 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

108 packets output, 8526 bytes, 0 underruns

0 output errors, 0 collisions, 4 interface resets

0 output buffer failures, 0 output buffers swapped out

1 carrier transitions

DCD=down DSR=down DTR=up RTS=up CTS=down

تقوم حركة مرور إختبار الاتصال المعرفة على أنها حركة مرور مثيرة للاهتمام بتهيئة المكالمة الصادرة عبر واجهة المتصل الاحتياطي 0.

krimson#ping 10.8.8.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.8.8.1, timeout is 2 seconds:

*Mar 4 15:27:39.618: BR0 DDR: rotor dialout [priority]

*Mar 4 15:27:39.622: BR0 DDR: Dialing cause ip (s=10.9.9.1, d=10.8.8.1)

*Mar 4 15:27:39.626: BR0 DDR: Attempting to dial 8114

*Mar 4 15:27:39.642: ISDN BR0: TX -> SETUP pd = 8 callref = 0x09

*Mar 4 15:27:39.646: Bearer Capability i = 0x8890

*Mar 4 15:27:39.654: Channel ID i = 0x83

*Mar 4 15:27:39.658: Called Party Number i = 0x80, '8114',

Plan:Unknown, Type:Unknown

*Mar 4 15:27:39.718: ISDN BR0: RX <- CALL_PROC pd = 8 callref = 0x89

*Mar 4 15:27:39.722: Channel ID i = 0x89

*Mar 4 15:27:39.974: ISDN BR0: RX <- CONNECT pd = 8 callref = 0x89

*Mar 4 15:27:39.990: %LINK-3-UPDOWN: Interface BRI0:1, changed state to up

*Mar 4 15:27:39.998: %DIALER-6-BIND: Interface BR0:1 bound to profile Di0

*Mar 4 15:27:40.010: BR0:1 PPP: Treating connection as a callout

*Mar 4 15:27:40.010: BR0:1 PPP: Phase is ESTABLISHING, Active Open [0 sess, 0 load]

*Mar 4 15:27:40.014: BR0:1 LCP: O .!!!CONFREQ [Closed] id 19 len 15

*Mar 4 15:27:40.018: BR0:1 LCP: AuthProto CHAP (0x0305C22305)

*Mar 4 15:27:40.022: BR0:1 LCP: MagicNumber 0x12D0A490 (0x050612D0A490)

*Mar 4 15:27:40.030: ISDN BR0: TX -> CONNECT_ACK pd = 8 callref = 0x09

*Mar 4 15:27:40.054: BR0:1 LCP: I CONFREQ [REQsent] id 9 len 15

*Mar 4 15:27:40.058: BR0:1 LCP: AuthProto CHAP (0x0305C22305)

*Mar 4 15:27:40.062: BR0:1 LCP: MagicNumber 0x12D6B638 (0x050612D6B638)

*Mar 4 15:27:40.066: BR0:1 LCP: O CONFACK [REQsent] id 9 len 15

*Mar 4 15:27:40.066: BR0:1 LCP: AuthProto CHAP (0x0305C22305)

*Mar 4 15:27:40.070: BR0:1 LCP: MagicNumber 0x12D6B638 (0x050612D6B638)

*Mar 4 15:27:40.074: BR0:1 LCP: I CONFACK [ACKsent] id 19 len 15

*Mar 4 15:27:40.078: BR0:1 LCP: AuthProto CHAP (0x0305C22305)

*Mar 4 15:27:40.082: BR0:1 LCP: MagicNumber 0x12D0A490 (0x050612D0A490)

*Mar 4 15:27:40.082: BR0:1 LCP: State is Open

*Mar 4 15:27:40.086: BR0:1 PPP: Phase is AUTHENTICATING, by both [0 sess, 0 load]

*Mar 4 !

Suc15:27:40.090: BR0:1 CHAP: O CHALLENGE id 7 len 28 from "krimson"

*Mar 4 15:27:40.106: BR0:1 CHAP: I CHALLENGE id 7 len 26 from "kevin"

*Mar 4 15:27:40.110: BR0:1 CHAP: O RESPONSE id 7 len 28 from "krimson"

*Mar 4 15:27:40.138: BR0:1 CHAP: I SUCCESS id 7 len 4

*Mar 4 15:27:40.150: BR0:1 CHAP: I RESPONSE id 7 len 26 from "kevin"

*Mar 4 15:27:40.158: BR0:1 CHAP: O SUCCESS id 7 len 4

*Mar 4 15:27:40.162: BR0:1 PPP: Phase is UP [0 sess, 0 load]

*Mar 4 15:27:40.166: BR0:1 IPCP: O CONFREQ [Not negotiated] id 2 len 10

*Mar 4 15:27:40.170: BR0:1 IPCP: Address 10.9.9.1 (0x03060A090901)

*Mar 4 15:27:40.186: BR0:1 IPCP: I CONFREQ [REQsent] id 2 len 10

*Mar 4 15:27:40.190: BR0:1 IPCP: Address 10.9.9.2 (0x03060A090902)

*Mar 4 15:27:40.190: BR0:1 IPCP: O CONFACK [REQsent] id 2 len 10

*Mar 4 15:27:40.194: BR0:1 IPCP: Address 10.9.9.2 (0x03060A090902)

*Mar 4 15:27:40.202: BR0:1 IPCP: I CONFACK [ACKsent] id 2 len 10

*Mar 4 15:27:40.206: BR0:1 IPCP: Address 10.9.9.1 (0x03060A090901)

*Mar 4 15:27:40.206: BR0:1 IPCP: State is Open

*Mar 4 15:27:40.214: BR0:1 DDR: dialer protocol up

*Mar 4 15:27:40.218: Di0 IPCP: Install route to 10.9.9.2

*Mar 4 15:27:41.162: %LINEPROTO-5-UPDOWN: Line protocol on Interface BRI0:1,

changed state to upcess rate is 80 percent (4/5), round-trip min/avg/max =

36/47/76 ms

krimson#

في نفس الوقت، تظهر الأخطاء التي يتم تشغيلها على الجانب المتصل الإخراج التالي لنفس الاستدعاء:

kevin#

*Mar 4 15:34:21.698: ISDN BR0: RX <- SETUP pd = 8 callref = 0x07

*Mar 4 15:34:21.706: Bearer Capability i = 0x8890

*Mar 4 15:34:21.714: Channel ID i = 0x89

*Mar 4 15:34:21.718: Calling Party Number i = 0xA1, '8113',

Plan:ISDN, Type:National

*Mar 4 15:34:21.734: Called Party Number i = 0xC1, '8114',

Plan:ISDN, Type:Subscriber(local)

*Mar 4 15:34:21.762: ISDN BR0: Event: Received a DATA call from 8113 on B1

at 64 Kb/s

*Mar 4 15:34:21.762: ISDN BR0: Event: Accepting the call id 0xC

*Mar 4 15:34:21.766: BR0:1: interface must be fifo queue, force fifo

*Mar 4 15:34:21.774: %DIALER-6-BIND: Interface BR0:1 bound to profile Di0

*Mar 4 15:34:21.786: %LINK-3-UPDOWN: Interface BRI0:1, changed state to up

*Mar 4 15:34:21.798: BR0:1 PPP: Treating connection as a callin

*Mar 4 15:34:21.802: BR0:1 PPP: Phase is ESTABLISHING, Passive Open [0 sess,

0 load]

*Mar 4 15:34:21.806: BR0:1 LCP: State is Listen

*Mar 4 15:34:21.818: ISDN BR0: TX -> CALL_PROC pd = 8 callref = 0x87

*Mar 4 15:34:21.826: Channel ID i = 0x89

*Mar 4 15:34:21.854: ISDN BR0: TX -> CONNECT pd = 8 callref = 0x87

*Mar 4 15:34:21.918: ISDN BR0: RX <- CONNECT_ACK pd = 8 callref = 0x07

*Mar 4 15:34:21.926: Channel ID i = 0x89

*Mar 4 15:34:21.978: BR0:1 LCP: I CONFREQ [Listen] id 19 len 15

*Mar 4 15:34:21.982: BR0:1 LCP: AuthProto CHAP (0x0305C22305)

*Mar 4 15:34:21.986: BR0:1 LCP: MagicNumber 0x12D0A490 (0x050612D0A490)

*Mar 4 15:34:21.990: BR0:1 LCP: O CONFREQ [Listen] id 9 len 15

*Mar 4 15:34:21.994: BR0:1 LCP: AuthProto CHAP (0x0305C22305)

*Mar 4 15:34:21.994: BR0:1 LCP: MagicNumber 0x12D6B638 (0x050612D6B638)

*Mar 4 15:34:21.998: BR0:1 LCP: O CONFACK [Listen] id 19 len 15

*Mar 4 15:34:22.002: BR0:1 LCP: AuthProto CHAP (0x0305C22305)

*Mar 4 15:34:22.006: BR0:1 LCP: MagicNumber 0x12D0A490 (0x050612D0A490)

*Mar 4 15:34:22.030: BR0:1 LCP: I CONFACK [ACKsent] id 9 len 15

*Mar 4 15:34:22.034: BR0:1 LCP: AuthProto CHAP (0x0305C22305)

*Mar 4 15:34:22.034: BR0:1 LCP: MagicNumber 0x12D6B638 (0x050612D6B638)

*Mar 4 15:34:22.038: BR0:1 LCP: State is Open

*Mar 4 15:34:22.042: BR0:1 PPP: Phase is AUTHENTICATING, by both [0 sess, 0

load]

*Mar 4 15:34:22.046: BR0:1 CHAP: O CHALLENGE id 7 len 26 from "kevin"

*Mar 4 15:34:22.050: BR0:1 CHAP: I CHALLENGE id 7 len 28 from "krimson"

*Mar 4 15:34:22.054: BR0:1 CHAP: Waiting for peer to authenticate first

*Mar 4 15:34:22.070: BR0:1 CHAP: I RESPONSE id 7 len 28 from "krimson"

*Mar 4 15:34:22.078: BR0:1 CHAP: O SUCCESS id 7 len 4

*Mar 4 15:34:22.082: BR0:1 CHAP: Processing saved Challenge, id 7

*Mar 4 15:34:22.090: BR0:1 CHAP: O RESPONSE id 7 len 26 from "kevin"

*Mar 4 15:34:22.114: BR0:1 CHAP: I SUCCESS id 7 len 4

*Mar 4 15:34:22.118: BR0:1 PPP: Phase is UP [0 sess, 0 load]

*Mar 4 15:34:22.122: BR0:1 IPCP: O CONFREQ [Not negotiated] id 2 len 10

*Mar 4 15:34:22.126: BR0:1 IPCP: Address 10.9.9.2 (0x03060A090902)

*Mar 4 15:34:22.130: BR0:1 IPCP: I CONFREQ [REQsent] id 2 len 10

*Mar 4 15:34:22.134: BR0:1 IPCP: Address 10.9.9.1 (0x03060A090901)

*Mar 4 15:34:22.138: BR0:1 IPCP: O CONFACK [REQsent] id 2 len 10

*Mar 4 15:34:22.142: BR0:1 IPCP: Address 10.9.9.1 (0x03060A090901)

*Mar 4 15:34:22.226: BR0:1 IPCP: I CONFACK [ACKsent] id 2 len 10

*Mar 4 15:34:22.230: BR0:1 IPCP: Address 10.9.9.2 (0x03060A090902)

*Mar 4 15:34:22.230: BR0:1 IPCP: State is Open

*Mar 4 15:34:22.242: BR0:1 DDR: dialer protocol up

*Mar 4 15:34:22.250: Di0 IPCP: Install route to 10.9.9.1

*Mar 4 15:34:23.114: %LINEPROTO-5-UPDOWN: Line protocol on Interface BRI0:1,

changed state to up

*Mar 4 15:34:27.794: %ISDN-6-CONNECT: Interface BRI0:1 is now connected to

8113 krimson

الحالة بعد "تشغيل" النسخة الاحتياطية:

krimson#show interface dialer 0

Dialer0 is up, line protocol is up (spoofing)

Hardware is Unknown

Internet address is 10.9.9.1/24

MTU 1500 bytes, BW 56 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

DTR is pulsed for 1 seconds on reset

Interface is bound to BR0:1

Last input never, output never, output hang never

Last clearing of "show interface" counters 00:13:26

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: weighted fair

Output queue: 0/1000/64/0 (size/max total/threshold/drops)

Conversations 0/1/16 (active/max active/max total)

Reserved Conversations 0/0 (allocated/max allocated)

Available Bandwidth 42 kilobits/sec

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

36 packets input, 2160 bytes

36 packets output, 2160 bytes

Bound to:

BRI0:1 is up, line protocol is up

Hardware is BRI

MTU 1500 bytes, BW 64 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

Keepalive set (10 sec)

Time to interface disconnect: idle 00:01:33

Interface is bound to Di0 (Encapsulation PPP)

LCP Open

Open: IPCP

Last input 00:00:26, output 00:00:01, output hang never

Last clearing of "show interface" counters never

Queueing strategy: fifo

Output queue 0/40, 0 drops; input queue 0/75, 0 drops

30 second input rate 0 bits/sec, 0 packets/sec

30 second output rate 0 bits/sec, 0 packets/sec

126 packets input, 3664 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

131 packets output, 3777 bytes, 0 underruns

0 output errors, 0 collisions, 15 interface resets

0 output buffer failures, 0 output buffers swapped out

28 carrier transitions

krimson#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter

area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is 10.48.74.1 to network 0.0.0.0

10.0.0.0/8 is variably subnetted, 5 subnets, 3 masks

C 10.9.9.2/32 is directly connected, Dialer0

S 10.8.8.0/24 [180/0] via 10.9.9.2

C 10.9.9.0/24 is directly connected, Dialer0

C 10.7.7.0/24 is directly connected, Loopback0

C 10.48.74.0/23 is directly connected, Ethernet0

S* 0.0.0.0/0 [254/0] via 10.48.74.1

على الجانب المتصل:

الحالة بعد "تشغيل" النسخة الاحتياطية.

kevin#show interface dialer 0

Dialer0 is up, line protocol is up (spoofing)

Hardware is Unknown

Internet address is 10.9.9.2/24

MTU 1500 bytes, BW 56 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

DTR is pulsed for 1 seconds on reset

Interface is bound to BR0:1

Last input never, output never, output hang never

Last clearing of "show interface" counters 00:16:18

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: weighted fair

Output queue: 0/1000/64/0 (size/max total/threshold/drops)

Conversations 0/1/16 (active/max active/max total)

Reserved Conversations 0/0 (allocated/max allocated)

Available Bandwidth 42 kilobits/sec

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

40 packets input, 2224 bytes

40 packets output, 2224 bytes

Bound to:

BRI0:1 is up, line protocol is up

Hardware is BRI

MTU 1500 bytes, BW 64 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

Keepalive set (10 sec)

Time to interface disconnect: idle 00:01:11

Interface is bound to Di0 (Encapsulation PPP)

LCP Open

Open: IPCP

Last input 00:00:48, output 00:00:00, output hang never

Last clearing of "show interface" counters never

Queueing strategy: fifo

Output queue 0/40, 0 drops; input queue 0/75, 0 drops

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

136 packets input, 3857 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

131 packets output, 3744 bytes, 0 underruns

0 output errors, 0 collisions, 12 interface resets

0 output buffer failures, 0 output buffers swapped out

35 carrier transitions

kevin#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter

area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is 10.48.74.1 to network 0.0.0.0

10.0.0.0/8 is variably subnetted, 4 subnets, 3 masks

C 10.9.9.0/24 is directly connected, Dialer0

C 10.8.8.0/24 is directly connected, Loopback0

C 10.9.9.1/32 is directly connected, Dialer0

C 10.48.74.0/23 is directly connected, Ethernet0

S* 0.0.0.0/0 [254/0] via 10.48.74.1

هنا، نقوم بمحاكاة إستعادة الارتباط الأساسي باستخدام الأمر no shutdown على الواجهة التسلسلية البعيدة:

krimson#

*Mar 4 15:28:58.726: %LINK-3-UPDOWN: Interface Serial0, changed state to up

*Mar 4 15:28:59.730: %LINEPROTO-5-UPDOWN: Line protocol on Interface

Serial0, changed state to up

تم قطع اتصال النسخة الاحتياطية بعد انتهاء مهلة الخمول.

krimson#show isdn active

--------------------------------------------------------------------------------

ISDN ACTIVE CALLS

--------------------------------------------------------------------------------

Call Calling Called Remote Seconds Seconds Seconds Charges

Type Number Number Name Used Left Idle

Units/Currency

--------------------------------------------------------------------------------

Out 8114 kevin 120 1 118 0

--------------------------------------------------------------------------------

krimson#

*Mar 4 15:29:41.738: BR0:1 DDR: idle timeout

*Mar 4 15:29:41.742: BR0 DDR: has total 0 call(s), dial_out 0, dial_in 0

*Mar 4 15:29:41.746: BR0:1 PPP: Treating connection as a callout

*Mar 4 15:29:41.750: %DIALER-6-UNBIND: Interface BR0:1 unbound from profile

Di0

*Mar 4 15:29:41.754: BR0:1 DDR: disconnecting call

*Mar 4 15:29:41.758: %ISDN-6-DISCONNECT: Interface BRI0:1 disconnected from

8114 kevin, call lasted 121 seconds

*Mar 4 15:29:41.774: ISDN BR0: TX -> DISCONNECT pd = 8 callref = 0x09

*Mar 4 15:29:41.782: Cause i = 0x8090 - Normal call clearing

*Mar 4 15:29:41.790: Di0 IPCP: Remove route to 10.9.9.2

*Mar 4 15:29:41.862: ISDN BR0: RX <- RELEASE pd = 8 callref = 0x89

*Mar 4 15:29:41.886: %LINK-3-UPDOWN: Interface BRI0:1, changed state to down

*Mar 4 15:29:41.894: BR0:1 IPCP: State is Closed

*Mar 4 15:29:41.894: BR0:1 PPP: Phase is TERMINATING [0 sess, 0 load]

*Mar 4 15:29:41.898: BR0:1 LCP: State is Closed

*Mar 4 15:29:41.898: BR0:1 PPP: Phase is DOWN [0 sess, 0 load]

*Mar 4 15:29:41.902: BR0:1 DDR: disconnecting call

*Mar 4 15:29:41.910: ISDN BR0: TX -> RELEASE_COMP pd = 8 callref = 0x09

*Mar 4 15:29:42.886: %LINEPROTO-5-UPDOWN: Line protocol on Interface BRI0:1,

changed state to down

تم الآن إستعادة الحالة الأولية.

krimson#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter

area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is 10.48.74.1 to network 0.0.0.0

10.0.0.0/8 is variably subnetted, 5 subnets, 2 masks

C 10.1.2.0/24 is directly connected, Serial0

S 10.8.8.0/24 [1/0] via 10.1.2.2

C 10.9.9.0/24 is directly connected, Dialer0

C 10.7.7.0/24 is directly connected, Loopback0

C 10.48.74.0/23 is directly connected, Ethernet0

S* 0.0.0.0/0 [254/0] via 10.48.74.1

معلومات ذات صلة

- صفحات دعم تقنية الطلب

- الدعم الفني - Cisco Systems